\begin{table}%t5
\caption{\label{peaked_lines}Lines not identified as CN within the 3857$-$3880~\AA\  range. Most are not yet identified.}
\par
%\centering
\small
\begin{tabular}{ll} 
\hline\hline 
%& \\[-8pt]
$\lambda$ (\AA)&Identification\\
\hline 
3857.36\\
3857.50\\
3857.58\\
3858.16\\
3858.90\\
3859.02\\
3859.46\\
3861.03\\
3861.68\\
3862.73\\
3863.71\\
3864.41\\
3865.40 \\
3866.19\\
3866.28\\
3867.08\\
3867.92\\
3868.27\\
3873.14\\
3875.95&  CH R$_1$ $J^{\prime\prime}=3.5$\\
3877.09 \\
3877.20 \\
3877.47&  CH R$_2$ $J^{\prime\prime}=1.5$\\
3877.56 \\
3877.65 \\
3878.00\\
3878.40&  CH R$_1$ $J^{\prime\prime}=2.5$\\
3878.49 \\
3878.57 \\
3878.91 \\
3879.36 \\
\hline
\end{tabular}
\end{table}