\begin{table}%t2
\caption{\label{tab2}Extinction-corrected emission line fluxes (high-resolution FORS observations).}
\small%%\centerline

 {
\begin{tabular}{lrrrrrrr} 
\hline\hline
 &  \multicolumn{2}{c}{0335--052E} &&  \multicolumn{4}{c}{0335--052W} \\ 
 \cline{2-3} \cline{5-8} 
Line                            & Nos. $1+2$         &  No. 7          &&         No. 1   &         No. 2   &        No. 3     &         No. 4     \\ 
\hline
3727 [O {\sc ii}]               &21.81 $\pm$ 0.34 &24.98 $\pm$ 0.53 &&75.20 $\pm$ 2.55 &30.15 $\pm$ 2.20 &79.16 $\pm$ 7.95  &41.95 $\pm$ 4.46 \\
3750 H12                        &3.08 $\pm$ 0.07  &5.84 $\pm$ 0.49  &&      ...      &      ...      &      ...       &     ...       \\
3771 H11                        &3.92 $\pm$ 0.08  &6.32 $\pm$ 0.45  &&      ...      &      ...      &      ...       &     ...       \\
3797 H10                        &5.39 $\pm$ 0.10  &7.28 $\pm$ 0.43  &&5.65 $\pm$ 0.11  &9.14 $\pm$ 1.96  &      ...       &     ...       \\
3820 He {\sc i}                 &1.06 $\pm$ 0.04  &0.91 $\pm$ 0.19  &&      ...      &      ...      &      ...       &     ...       \\
3835 H9                         &7.30 $\pm$ 0.13  &9.16 $\pm$ 0.39  &&7.02 $\pm$ 0.13  &9.96 $\pm$ 1.81  &      ...       &     ...       \\
3869 [Ne {\sc iii}]             &26.98 $\pm$ 0.41 &15.86 $\pm$ 0.35 &&11.31 $\pm$ 0.98 &12.43 $\pm$ 1.07 &      ...       &     ...       \\
3889 He {\sc i} + H8            &16.96 $\pm$ 0.26 &20.75 $\pm$ 0.48 &&19.92 $\pm$ 1.02 &24.69 $\pm$ 1.61 &      ...       &24.83 $\pm$ 3.90 \\
3968 [Ne {\sc iii}] + H7        &25.56 $\pm$ 0.39 &23.30 $\pm$ 0.50 &&13.52 $\pm$ 0.96 &23.38 $\pm$ 1.51 &      ...       &25.28 $\pm$ 4.25 \\
4026 He {\sc i}                 &1.79 $\pm$ 0.04  &1.94 $\pm$ 0.19  &&      ...      &      ...      &      ...       &     ...       \\
4069 [S  {\sc ii}]              &0.39 $\pm$ 0.03  &      ...      &&      ...      &      ...      &      ...       &     ...       \\
4076 [S  {\sc ii}]              &     ...       &      ...      &&      ...      &      ...      &      ...       &     ...       \\
4101 H$\delta$                  &27.11 $\pm$ 0.40 &27.10 $\pm$ 0.52 &&26.61 $\pm$ 1.09 &27.17 $\pm$ 1.51 &32.76 $\pm$ 6.79  &24.80 $\pm$ 3.80 \\
4227 [Fe {\sc iv}]              &0.25 $\pm$ 0.04  &      ...      &&      ...      &      ...      &      ...       &     ...        \\ 
4340 H$\gamma$                  &47.61 $\pm$ 0.69 &46.39 $\pm$ 0.76 &&45.94 $\pm$ 1.28 &46.85 $\pm$ 1.50 &44.10 $\pm$ 4.96  &43.27 $\pm$ 2.76 \\
4363 [O {\sc iii}]              &11.33 $\pm$ 0.17 &6.15 $\pm$ 0.18  &&3.33 $\pm$ 0.58  &5.09 $\pm$ 0.72  &      ...       &2.51 $\pm$ 0.80  \\
4388 He {\sc i}                 &0.40 $\pm$ 0.02  &      ...      &&      ...      &      ...      &      ...       &     ...        \\ 
4471 He {\sc i}                 &3.77 $\pm$ 0.06  &3.54 $\pm$ 0.13  &&3.55 $\pm$ 0.32  &4.52 $\pm$ 0.71  &      ...       &     ...        \\
4658 [Fe {\sc iii}]             &0.32 $\pm$ 0.02  &0.40 $\pm$ 0.09  &&      ...      &      ...      &      ...       &     ...       \\
4686 He {\sc ii}                &1.33 $\pm$ 0.03  &1.33 $\pm$ 0.14  &&      ...      &      ...      &      ...       &     ...        \\
4711 [Ar {\sc iv}] + He {\sc i} &1.72 $\pm$ 0.03  &0.80 $\pm$ 0.09  &&      ...      &      ...      &      ...       &     ...        \\
4740 [Ar {\sc iv}]              & 0.92 $\pm$ 0.02 &0.44 $\pm$ 0.12  &&      ...      &      ...      &      ...       &     ...        \\
4861 H$\beta$                   &100.00 $\pm$ 1.42&100.00 $\pm$ 1.51&&100.00 $\pm$ 2.01&100.00 $\pm$ 2.34&100.00 $\pm$ 5.42 &100.00 $\pm$ 3.40 \\
4921 He {\sc i}                 &0.91 $\pm$ 0.02  &0.87 $\pm$ 0.10  &&      ...      &      ...      &      ...       &     ...        \\
4959 [O {\sc iii}]              &101.50 $\pm$ 1.44&64.87 $\pm$ 0.99 &&43.23 $\pm$ 1.02 &49.24 $\pm$ 1.33 &22.91 $\pm$ 2.56  &23.50 $\pm$ 1.43 \\
4988 [Fe {\sc iii}]             &0.38 $\pm$ 0.01  &0.60 $\pm$ 0.08  &&      ...      &      ...      &      ...       &     ...        \\ 
5007 [O {\sc iii}]              &303.19 $\pm$ 4.31&194.48 $\pm$ 2.89&&130.20 $\pm$ 2.52&147.95 $\pm$ 3.21&71.23 $\pm$ 3.74  &75.37 $\pm$ 2.42 \\
5016 He {\sc i}                 &2.09 $\pm$ 0.03  &2.06 $\pm$ 0.10  &&2.99 $\pm$ 0.41  &2.50 $\pm$ 0.58  &      ...       &     ...       \\
5199 [N {\sc i}]                &0.28 $\pm$ 0.01  &      ...      &&      ...      &      ...      &      ...       &     ...       \\
5518 [Cl {\sc iii}]             &0.09 $\pm$ 0.02  &      ...      &&      ...      &      ...      &      ...       &     ...        \\
5538 [Cl {\sc iii}]             &0.07 $\pm$ 0.02  &      ...      &&      ...      &      ...      &      ...       &     ...        \\
5755 [N {\sc ii}]               &0.06 $\pm$ 0.01  &      ...      &&      ...      &      ...      &      ...       &     ...        \\
5876 He {\sc i}                 &10.48 $\pm$ 0.16 &9.09 $\pm$ 0.22  &&9.02 $\pm$ 0.75  &10.34 $\pm$ 0.87 &      ...       &     ...        \\
6300 [O {\sc i}]                &0.69 $\pm$ 0.02  &0.75 $\pm$ 0.12  &&      ...      &      ...      &      ...       &     ...        \\
6312 [S {\sc iii}]              &0.59 $\pm$ 0.02  &0.51 $\pm$ 0.12  &&      ...      &      ...      &      ...       &     ...        \\
6364 [O {\sc i}]                &0.22 $\pm$ 0.01  &      ...      &&      ...      &      ...      &      ...       &     ...        \\
6548 [N {\sc ii}]               &0.28 $\pm$ 0.02  &      ...      &&      ...      &      ...      &      ...       &     ...        \\
6563 H$\alpha$                  &272.75 $\pm$ 4.20&274.56 $\pm$ 4.43&&279.19 $\pm$ 5.65&274.11 $\pm$ 6.27&289.06 $\pm$ 11.70&273.47 $\pm$ 8.17 \\
6583 [N {\sc ii}]               &0.97 $\pm$ 0.02  &0.85 $\pm$ 0.13  &&3.40 $\pm$ 0.49  &      ...      &      ...       &     ...        \\
6678 He  {\sc i}                &2.63 $\pm$ 0.05  &2.55 $\pm$ 0.15  &&2.54 $\pm$ 0.44  &      ...      &      ...       &     ...        \\
6716 [S {\sc ii}]               &1.89 $\pm$ 0.04  &2.58 $\pm$ 0.13  &&6.89 $\pm$ 0.59  &      ...      &      ...       &     ...        \\
6731 [S {\sc ii}]               &1.62 $\pm$ 0.03  &1.95 $\pm$ 0.14  &&4.08 $\pm$ 0.48  &      ...      &      ...       &     ...        \\
7065 He  {\sc i}                &4.46 $\pm$ 0.08  &2.15 $\pm$ 0.13  &&2.20 $\pm$ 0.41  &      ...      &      ...       &     ...        \\
7136 [Ar {\sc iii}]             &1.57 $\pm$ 0.03  &1.47 $\pm$ 0.14  &&      ...      &      ...      &      ...       &     ...        \\
7281 He  {\sc i}                &0.60 $\pm$ 0.02  &0.75 $\pm$ 0.14  &&      ...      &      ...      &      ...       &     ...        \\
7320 [O {\sc ii}]               &0.57 $\pm$ 0.02  &0.77 $\pm$ 0.18  &&      ...      &      ...      &      ...       &     ...        \\
7330 [O {\sc ii}]               &0.41 $\pm$ 0.02  &0.34 $\pm$ 0.11  &&      ...      &      ...      &      ...       &     ...        \\
$C$(H$\beta$)                   &    0.135      &     0.090     &&     0.485     &    0.180      &     0.115      &    0.040       \\
$EW$(H$\beta$))$^a$                    &     337       &      305      &&      93       &     161       &      53        &     103        \\
$F$(H$\beta$)$^b$               &     220.3     &      16.2     &&      1.4      &     1.2       &      0.5       &     0.8        \\
$EW$(abs)                         &     0.0       &      4.6      &&      0.0      &     4.0       &      2.0       &     5.8        \\
\hline
\end{tabular}}
\medskip
$^a$ in \AA;
$^b$~in units 10$^{-16}$~erg~s$^{-1}$~cm$^{-2}$.
\end{table}