\begin{table}%t9
%%\centering

\par
\caption{\label{tab5}Photometric elements of EV~Cnc.}
\small \begin{tabular}{cccc} 
\par
\hline \hline
Parameter    & Model~A~~~ & Model B~~~ & ~Model~C \\
\hline
$i$ ${({^\circ})}$   & 46.7        &48.6       &41.8(5)         \\
$\Omega _{1}$   & 3.30        & 3.133     & 2.709       \\
$q$    & 0.69        &0.59       & 0.40(1)       \\
$T_{\rm h}$ (K)   & 6900        &6900       & 6900          \\
$T_{\rm c}$ (K)     & 5630        &5830       & 5200 (165)    \\
$\left(\frac{L_{\rm c}}{L_{\rm c} +L_{\rm h}}\right)_V$    & 0.92        &   &  0.382       \\
$\left(\frac{L_{\rm c}}{L_c +L_h}\right)_R$  & 0.89  & &  0.443       \\
$\left(\frac{L_{\rm c}}{L_{\rm c} +L_{\rm h}}\right)_I$  & 0.86    &    &  0.484       \\
$\bar{r}_{\rm c}$  & 0.40        & 0.38      &  0.452(2) \\
$\bar{r}_{\rm h}$                                         & 0.33        & 0.29      &  0.300(3)          \\
Spot parameters   : &&       &        \\
three spots on secondary: &&       &        \\
Colatitude   ${({^\circ})}$                           &     &&49(3),119(6),87(4)                   \\
Longitude    ${({^\circ})}$                           &     &&203(10),177(12),11(3)   \\
Spot radius  ${({^\circ})}$ &  &&21(3),28(4),16(2)\\
Spot temperature $T_{\rm spot}/T_{\rm star}$  &     &&0.89(3), 0.88(2),1.15(2) \\
rms   & &&0.012\\ 
\hline
\end{tabular}
\end{table}