\begin{table}%t8
%%\centering

\par
\caption{\label{tab4}Photometric elements of the over contact binary AH~Cnc. See text for the details.}
\small \begin{tabular}{lllllllllll}
\hline \hline 
Parameter & $W$ & $SS$ & $Y$ & $ZZD$ & $YA$ & $Q1$ & $Q2$ & $P$ & $PS1$  & $PS2$ \\
\hline
Geometric parameters:&&&&&&&&&&\\
$i$ ${({^\circ})}$&65&86&86& 82.8 & 87.6 & 90.0 &90.0& 89.5  & 88.2 & 88.2(7) \\
$\Omega_{1,2}$ &-- &-- &2.078 &2.037 &2.008 &2.130&2.088& 2.023   & 2.093  & 2.093(3)\\
$q$ & 0.75&0.157&0.159    &0.149 &0.144 &0.160&0.168  & 0.130   & 0.168 & 0.168(2) \\
$f$ (\%)  & 85 &70 &49 &65   &87 &37&59  & & 56  & 56  \\
Radiative parameters:&&&&&&&&&&\\
$T_1$ (K)& & &6300 &  &6300 &6300 &6300 & 6300 & 6300& 6300  \\
$T_2$ (K)  &  & &6100     &6354 &6525 &6179 &6265   & 6368    & 6275  & 6275(90)	\\
Albedo$^*$ ($A_1 = A_2$)                                &         &   &0.5  &  &0.5   &0.5   &0.5    & 0.5     &0.5 	            & 0.5\\
Gravity brightening$^*$ ($g_1=g_2$)                   &         &    &0.32 & &0.32 &0.32 &0.32   & 0.25    &0.32	            & 0.32\\
$\left(\frac{l_1}{l_{\rm total}}\right)$ :&&&&&&&&&&\\
~~~~~~~~~~~~~~~~~~$_V$                                &         &   &0.850    &0.830  & &	 0.844  & 0.819	& & 0.790 	        & 0.783     \\
~~~~~~~~~~~~~~~~~~$_R$                                &         &         &         &                &0.827      &	        &	    &         & 0.792 	        & 0.780      \\
~~~~~~~~~~~~~~~~~~$_I$&   &   &  &   &   &  &  &  & 0.795  & 0.783    \\
$\left(\frac{l_3}{l_{\rm total}}\right)$ :&&&&&&&&&&\\
~~~~~~~~~~~~~~~~~~$_V$                                &         &         &         &                &           &	        &0.007  &         & 0.034      	    & 0.036     \\
~~~~~~~~~~~~~~~~~~$_R$                                &         &         &         &                &           &	        &	    &         & 0.031     	    & 0.040      \\
~~~~~~~~~~~~~~~~~~$_I$                                &         &         &         &                &           &	        &	    &         & 0.026     	    & 0.035    \\
Fractional radii             &&&&&&&&&&\\
$\bar{r}_{1}$                                         &         &         & 0.561   &0.572           &0.586      &0.5555    &0.5603 &         & 0.5584          & 0.5584(14)      \\
$\bar{r}_{2}$                                         &         &         &0.258    &0.260           &0.271      &0.2505    &0.2658 &         & 0.2531          & 0.2630(60)     \\
Spot parameters: &&&&&&&&&&\\
Colatitude   ${({^\circ})}$                           &         &         &         &                &           &	        &	    &         & 113(5)	        & 98(6)	    \\
Longitude    ${({^\circ})}$                           &         &         &         &                &           &	        &	    &         & 121(7)	        & 105(9)	       \\
Spot radius  ${({^\circ})}$                           &         &         &         &                &           &	        &	    &         & 35(2)	        & 24(3)		   \\
Spot temperature ($T_{\rm spot}/T_{\rm star}$)                &         &         &         &                &           &	        &	    &         & 0.91(1)	        & 0.92(1)		   \\
rms&                                                     &          &         &         &               &           &           &    & 0.018      &    0.031           \\
\hline
\end{tabular}
\end{table}