\begin{table}%t3
%%\centering

\par
\caption{\label{m67tab2}New times of the primary and secondary minima for AH~Cnc and EV~Cnc in HJD-2~400~000.} 
\small \begin{tabular}{llll}
\hline \hline
& Times of minima  & Error  &  Filter   \\
\hline
AH Cnc& &   \\
&53~426.39314  &$\pm$0.00008    &    $R_c$       \\
&53~489.29283  &$\pm$0.00008    &   $R_c$         \\
&53~683.58142  &$\pm$0.00006    &   $R_c$        \\
&53~750.62330  &$\pm$0.00025    &   $I$           \\
&53~750.62366  &$\pm$0.00019    &   $V$            \\
&53~750.62366  &$\pm$0.00014    &   $R$            \\
EV~Cnc&  & &  \\
&53~425.4532         &$\pm$0.0003    &     $R_c$           \\
&53~426.3392         &$\pm$0.0002    &     $R_c$            \\
&53~682.6029         &$\pm$0.0003    &     $R_c$         \\
\hline
\end{tabular}
\end{table}