\begin{table}%t2
%\centering
\par
\caption{3D corrections for the \ion{S}{i} 922.8 nm line. \label{3dcor}}
\begin{tabular}{lrrr}
\hline\hline
\teff & $\log g$ & [Fe/H] & Corr. \\
\hline
5000 & 4.0 & 0.0 & 0.141 \\
5000 & 4.0 & --1.0 & 0.140 \\
4920 & 3.5 & 0.0 & 0.146 \\
4930 & 3.5 & --1.0 & 0.167 \\
\hline
\end{tabular}
\end{table}