\begin{table}%t6
\caption{\label{Table6}Temperature and iron abundance measurements for all clusters by counts
region.}
\par
%%\centering

\small
\begin{tabular}{ c c  l   l   l   l  l  l  l l  } 
\hline \hline
\multicolumn{10}{c }{Temperatures and Iron Abundance Measurements}\\ 
  \multicolumn{2}{c}{cluster information} &
  \multicolumn{4}{c}{temperatures in keV} & \multicolumn{4}{c}{iron
    abundances in $Z_{\bigodot}$} \\ 
 \multicolumn{1}{ c  }{cluster name}  & \multicolumn{1}{ c  }{ $ \it z$} &
\multicolumn{1}{c }{region \# 1} & \multicolumn{1}{c }{region \#2} & \multicolumn{1}{c }{region \# 3} &
\multicolumn{1}{c }{region \# 4} & \multicolumn{1}{c}{region \#1} &
\multicolumn{1}{c}{region \#2} & \multicolumn{1}{c}{region \#3} &
\multicolumn{1}{c}{region \#4}  \\ 
\hline
Abell 1413 & 0.142 & $6.0 \pm 0.4$ &
$7.8 \pm 0.7$ & $7.4 \pm 0.7$ &
$5.5 \pm 0.4$  & $0.46 \pm 0.14$ &
$0.41 \pm 0.16$ & $0.49 \pm 0.11$ &
$0.73 \pm 0.14$\\
Abell 2204  & 0.152 & $3.9 \pm 0.1$ &
$6.7 \pm 0.3$ & $10.2 \pm 0.7$ &
$12.1 \pm 0.8$ & $0.98 \pm 0.09$ &
$0.57 \pm 0.09$ & $0.41 \pm 0.11$ &
$0.25 \pm 0.06$\\ 
Abell 665 & 0.182 & $7.7 \pm 0.7$ & $7.9 \pm 0.7$ & $8.5 \pm 0.7
$ & $8.1 \pm 0.6$ &  $0.32 \pm 0.12 $ & $0.39 \pm 0.13 $ & $0.47 \pm
0.14$ & $0.31 \pm 0.10$ \\ 
RX J0439.0+0520  & 0.208 & $3.1 \pm 0.2 $ &
$4.5 \pm 0.3$ & $4.8 \pm 0.5$ &
$4.2 \pm 0.5$  & $0.50 \pm 0.19$ &
$0.94 \pm 0.28$ & $0.44 \pm 0.13$ &
$0 +0.32$\\ 
Abell 773 & 0.217 & $7.3 \pm 1.0 $ & $9.1 ^{+1.9}_{\rm -1.3}$ &
$9.6^{+1.8}_{\rm -1.1}$ & $8.1_{\rm -1.1}^{+1.3}$ & $0.43 \pm 0.22$ & $0.27 \pm 0.23$ & $0.68 \pm
0.28$ & $0.07 _{\rm -0.07}^{+0.25}$\\ 
Abell 1763 & 0.223 & $7.5 \pm 0.4$ & $8.3 \pm 0.4$ & $7.0 \pm
0.3 $ & $6.6 \pm 0.3$ & $0.47 \pm 0.08 $ & $0.30 \pm 0.08$ & $0.30 \pm
0.06$ & $0.26 \pm 0.05$\\ 
Abell 2390 & 0.228 & $7.3 \pm 0.2$ & $9.4 \pm 0.3$ & $10.0 \pm 0.5 $ &
$9.7 \pm 0.4 $ & $0.43 \pm 0.05$ & $0.43 \pm 0.06$ & $0.29 \pm
0.06$ & $0.17 \pm 0.05$\\
Abell 1835 & 0.253 & $5.0 \pm 0.1$ & $6.8 \pm 0.1$ & $7.2 \pm 0.1$ &
$7.4 \pm 0.1$ & $0.46 \pm 0.02$ & $0.37 \pm 0.02$ & $0.26 \pm
0.02$ & $0.23 \pm 0.02$\\ 
Abell 697 & 0.282 & $9.4 \pm 0.9 $ & $9.6 \pm 1.0$ & $ 9.3 \pm
1.0$ & $ 9.1 \pm 1.0$ & $0.50 \pm 0.16$ & $0.37 \pm 0.15$ & $0.54 \pm 0.11$ & $0.31 \pm 0.09$\\
Abell 611  & 0.288 & $6.7 \pm 0.4$ &
$7.0 \pm 0.5$ & $7.5 \pm 0.6$ &
$6.5 \pm 0.5$ & $0.45 \pm 0.12$ &
$0.24 \pm 0.10$ & $0.21 \pm 0.11$ &
$0.34 \pm 0.07$\\
MS 1008.1-1224  & 0.306 & $5.9 \pm 0.5$ &
$5.8 \pm 0.6$ & $7.4 \pm 0.8$ & $
6.5 \pm 0.7$ & $0.50 \pm 0.14$ &
$0.35 \pm 0.10$ & $0.37 \pm 0.10$ & $0.04^{+0.10}_{\rm -0.04}$\\ 
MS 2137.3-2353  & 0.313 & $4.1 \pm 0.1$ &
$5.1 \pm 0.2$ & $5.9 \pm 0.3$ &
$5.8 \pm 0.5$ & $0.42 \pm 0.06$ &
$0.32 \pm 0.06$ & $0.32 \pm 0.07$ &
$0.35 \pm 0.06$\\
Abell 1995 & 0.319 & $8.3 \pm 0.7$ & $9.9 \pm 0.8$ & $8.6 \pm
0.8$ & $8.8 \pm 1.0$  & $0.33 \pm 0.12$ & $0.04_{\rm -0.04}^{+0.11}$ & $0.36 \pm 0.10$ & $0.36 \pm 0.11$ \\
ZWCL 1358+6245  & 0.328 & $4.5 \pm 0.2$ &
$8.9 \pm 0.7$ & $8.5 \pm 1.2$ &
$9.4 \pm 1.8$ & $0.45 \pm 0.10$ &
$0.42 \pm 0.14$ & $0.27 \pm 0.18$ & $0.69_{\rm -0.38}^{+0.10}$\\ 
RX J0256.5+0006  & 0.360 & $5.5 \pm 0.4$ &
$5.4 \pm 0.5 $ & $4.4 \pm 0.4$ &
$3.7 \pm 0.2$ & $0.31 \pm 0.13 $& $0.39 \pm 0.14$ & $0.23 \pm 0.10 $& $0.38 \pm 0.14$\\ 
RX J0318.2-0301  & 0.370 & $4.0 \pm 0.3$ &
$5.5 \pm 0.5$ & $5.3 \pm 0.6$ &
$6.3 \pm 0.8$ & $0.55 \pm 0.12$ &
$0.27 \pm 0.14$ & $0.21 \pm 0.14$ & $ 0.29 \pm 0.17$\\ 
RX J0426.1+1655  & 0.380 & $4.5 \pm 0.4$ &
$6.4 \pm 1.0$ & $4.9 \pm 0.7 $ &
$5.0 \pm 0.7$ & $0.47 \pm 0.15$ &
$0.06_{\rm -0.06}^{+0.18}  $ & $0.07_{\rm -0.07}^{+0.16} $ &
$0.38 \pm 0.22$\\
MACS J2228.5+2036 & 0.412 & $7.6 \pm 1.3 $ & $9.9 \pm 2.2$ &
$7.9 \pm 1.4$ & $ 6.9 \pm 0.8$ & $0.56 \pm 0.21 $ & $ 0.26 \pm 0.19$ &
$0.29 \pm 0.15$ & $0.52 \pm 0.13$ \\
MACS J2214.9-1359  & 0.483 & $8.0 \pm 1.2 $&
$9.1 \pm 1.7$ & $12.7_{\rm -2.8}^{+5.3}$ &$
8.4 \pm 1.5$ &  $0.27 \pm 0.21 $&
$0.23 \pm 0.22$ & $0.17_{\rm -0.17}^{+0.20}$ & $ 0.13_{\rm -0.13}^{+0.18}$ \\ 
MACS J1311.0-0310  & 0.490 & $4.7 \pm 0.5 $&
$6.8 \pm 0.9$ & $7.4 \pm 1.3$ &$
4.8 \pm 0.6$ & $0.19 \pm 0.15 $&
$1.36_{\rm -0.23}^{+0.51} $ & $0.09_{\rm -0.09}^{+0.20}$ & $ 0.22 \pm 0.17$ \\ 
MS 0015.9+1609  & 0.541 & $9.3 \pm 0.8 $&
$9.9 \pm 1.0$ & $10.5_{\rm -0.7}^{+1.5}$ &$
10.3 \pm 1.1$  & $0.61 \pm 0.14$&
$0.22 \pm 0.08$ & $0.09 \pm 0.09$ & $0.16 \pm 0.09$ \\ 
MACS 1423.8+2404  & 0.545 & $4.1 \pm 0.1$&
$5.8 \pm 0.2$ & $7.1 \pm 0.3$ &$
6.9 \pm 0.5$   & $0.66 \pm 0.08 $&
$0.48 \pm 0.07$ & $0.34 \pm 0.05$ & $0.47 \pm 0.07$\\
MS 0451.6-0305  & 0.550 & $9.9 \pm 0.8 $&
$8.9 \pm 0.6$ & $9.0 \pm 0.7$ &$
7.3 \pm 0.6$  & $0.64 \pm 0.14 $&
$0.28 \pm 0.10$ & $0.16 \pm 0.10$ & $0.49 \pm 0.13$ \\
 MACS J2129.4-0741  & 0.570 & $7.0 \pm 1.1 $&
$7.2 \pm 1.2$ & $7.6 \pm 1.2$ &$
5.2 \pm 0.7$ & $0.45 \pm 0.24$&
$0.33 \pm 0.20 $ & $0.41 \pm 0.23$ &$
0.65 \pm 0.17$ \\
MS 2053.7-0449 & 0.583 & $4.7 \pm 0.7 $ & $4.5 \pm 0.6$ & $5.6
\pm 1.1 $ & $ 3.4 \pm 0.6$ & $0.32 \pm 0.24$ & $0.23 \pm 0.20$ & $0.26 \pm
0.23$ & $0.59 \pm 0.41$\\
MACS J0647.7+7015  & 0.584 & $14.9^{+4.5}_{\rm -3.0} $&
$11.7_{\rm -2.2}^{+3.6}$ & $10.7_{\rm -2.7}^{+1.7}$ &$
9.5 \pm 1.6$ & $0.43 \pm 0.39 $&
$0.40 \pm 0.25$ & $0.39 \pm 0.22$ & 0+0.18 \\
RX J1120.1+4318 & 0.600 & $5.4 \pm 0.4 $ &
$5.2 \pm 0.4$ & $5.0 \pm 0.4$ &
$4.9 \pm 0.5$ & $0.54 \pm 0.10$ & $0.51 \pm 0.18$ & $0.26
\pm 0.12$ & $0 + 0.16 $ \\
MACS J0744.8+3927  & 0.686 & $5.3 \pm 0.6$ &
$8.7 \pm 1.7$ & $9.0 \pm 1.6$ &
$5.9 \pm 0.7$ & $0.97_{\rm -0.17}^{+0.40}$ &
$0.18 \pm 0.23$ & $0.20 \pm 0.18$ & $0.24 \pm 0.13$\\
MS 1137.5+6625  & 0.782 & $7.0_{\rm -0.7}^{+1.0}$ &
$7.5 \pm 1.0$ & $8.5 \pm 1.4$ &
$5.6 \pm 0.7$ & $0.43 \pm 0.18$ & 0 + 0.26 &
$0.38 \pm 0.21$ & $0.24 \pm 0.13 $\\ 
 RX J1716.9+6708  & 0.813 & $10.5_{\rm -2.6}^{+3.2}$ &
$4.6_{\rm -0.5}^{+1.1}$ & $4.3 \pm 0.8$ &
N/A  & $0.37 \pm 0.33$ &
$0.23 \pm 0.21$ & $0.88 \pm 0.27$ & N/A \\
CL J1226.9+3332  & 0.890 & $12.7 \pm 0.8$ &
$11.5 \pm 0.8$ & $10.9 \pm 0.7$ &
$9.3 \pm 0.5$ & $0.34 \pm 0.11 $ &
$0.29 \pm 0.11 $ & $0.08_{\rm -0.08}^{+0.11}$ & $0.06_{\rm -0.06}^{+0.13}  $\\[2pt]
\hline
\end{tabular}
\end{table}