\begin{table}%t2
%\centering
\par
\begin{minipage}[t]{17cm}
\caption{Experimental oscillator strengths of the \ion{Ca}{i} 4p--5s triplet}
\label{Osctable}
\renewcommand{\footnoterule}{}
%\centering
\par
\begin{tabular}{l c c c c c c c r c c}
\hline\hline
Transition & $\sigma$ \footnote{Wavenumber uncertainty, ${\rm d}\sigma = 0.002~{\rm cm}^{-1}$.} & $\lambda_{{\rm air}}$ & $BF$ & $BF$ Unc. & $A_{ul}$ & $A_{ul}$ Unc.\footnote{The uncertainty in $A_{ul}$ can be expressed in dex for the log($gf$) value where $\pm$0.01~dex is approximately $\pm$2.5\%.} & \multicolumn{4}{c}{log($gf$)\footnote{Log($gf$) references: S$\&$O'N refers to Smith ~\& O'Neill (\cite{Smith75}), FF$\&$T refers to Froese Fischer ~\& Tachiev (\cite{Froese03}) and K$\&$B refers to Kurucz ~\& Bell (\cite{Kurucz95}).}} \\ \cline{8-11}
& (cm$^{-1}$) & (\AA ) & & (\%) & (10$^7$ s$^{-1})$ & (\%) & This work & S$\&$O'N & FF$\&$T & K$\&$B \\
\hline
\\[-3mm]
4s4p $^{3}$P$_{2}$--4s5s $^{3}$S$_{1}$ & 16223.560 & 6162.1698 & 0.546 & 2 & 3.957 & 9 & $-0.17$ & $-0.09$ & $-0.09$ & 0.10 \\
4s4p $^{3}$P$_{1}$--4s5s $^{3}$S$_{1}$ & 16329.440 & 6122.2143 & 0.339 & 2 & 2.457 & 9 & $-0.38$ & $-0.32$ & $-0.32$ & $-0.41$ \\
4s4p $^{3}$P$_{0}$--4s5s $^{3}$S$_{1}$ & 16381.609 & 6102.7172 & 0.115 & 3 & 0.833 & 9 & $-0.85$ & $-0.79$ & $-0.80$ & $-0.89$ \\
\hline
\end{tabular}
\end{minipage}
\end{table}