\begin{table}%t5
\caption{\label{photo}The mean $V$ magnitude and the 1-$\sigma$ standard deviation.}             
\par
%\centering
\par
\begin{tabular}{l c c}   
\hline\hline       
\par
Star & Mean $V$ magnitude & 1-$\sigma$ error\\
\hline                    
HD~46~056 & 8.132 & 0.006\\
HD~46~149 & 7.598 & 0.006\\
HD~46~150 & 6.720 & 0.021\\
HD~46~202 & 7.946 & 0.048\\
HD~46~223 & 7.270 & 0.006\\
HD~46~485 & 8.255 & 0.011\\
HD~46~573 & 7.925 & 0.008\\
HD~46~966 & 6.854 & 0.019\\
HD~48~279 & 7.596 & 0.026\\
\hline
\end{tabular} 
\end{table}