\begin{table}
%%\centering

%\begin{tabular}{lll} 
%\hline
%Date [HJD] & Flux & $\sigma_{flux}$ \\ \hline 
%2454876.25586 & 0.990296 & 0.000488 \\
%2454876.25717 & 0.990875 & 0.000515 \\
%2454876.25849 & 0.994472 & 0.000568 \\
%2454876.25980 & 0.992544 & 0.000504 \\
%2454876.26112 & 0.984488 & 0.000469 \\
%2454876.26244 & 0.992818 & 0.000513 \\
%2454876.26375 & 0.990964 & 0.000499 \\
%2454876.26507 & 0.988873 & 0.000474 \\
%2454876.26639 & 0.993689 & 0.000475 \\
%... & .. &  ... \\ \hline
%\end{tabular}
%\caption{Photometric times series for HD~80606 from the OHP 1.2-m (full table available electronically)}
%\label{ohp_tab}
%\end{table}