\begin{table}%t3
\caption{\label{tab:ew}Equivalent widths.}
%\centering
\small
\begin{tabular}{lcccccccccc}
\hline\hline
%&&&&&&&&&& \\[-8pt]
       & $\lambda$({\AA}) & $\chi$(eV) & log($gf$) & S 10--14 & S 11--13 & S 11--37 & S 12--28 & S 14--98 & S 15--19 &  HD 88609    \\
\hline
  Na I & 5889.95 &  0.00 &  0.12 & 124.6 & 158.3 & 153.0 & 168.6 & 165.0 & 153.6 & 179.4 \\
  Na I & 5895.92 &  0.00 & --0.18 & 90.7  & 149.4 & 137.3 & 142.2 & 149.9 & 137.6 & 156.9\\
  Mg I & 4571.10 &  0.00 & --5.39 & 52.7  & 62.3  & 61.1  & 79.9  & ... & ... & 81.1\\
  Mg I & 4702.99 &  4.33 & --0.38 & ... & ... & ... & ... & ... & ... & 63.6\\
  Mg I & 5172.68 &  2.71 & --0.45 & 163.1 & 175.4 & 158.7 & 190.9 & 152.8 & 184.1 & 195.5\\
  Mg I & 5183.60 &  2.72 & --0.24 & 175.1 & 182.3 & 164.9 &  229.6 & 201.9 & 190.4 & 223.2\\
  Mg I & 5528.40 &  4.35 & --0.34 & 54.4 & 52.7 & 56.2 & 67.3 & 55.7 & 55.4 & 69.2\\
  Ca I & 5588.75 &  2.53 &  0.20 & ...& ...& ...& 51.8 & ...& 45.0 & 43.3 \\
  Ca I & 6102.72 &  1.88 & --0.79 & ...& ...& ...& ...& 55.1 & 27.1 & 31.2 \\
  Ca I & 6122.22 &  1.89 & --0.31 & 44.4 & 60.7 & 47.6 & 51.4 & 58.8 & 40.7 & 60.0 \\
  Ca I & 6162.17 &  1.90 & --0.09 & 66.8 & 65.9 & 60.2 & 79.1 & 75.8 & 73.8 & 73.9 \\
  Ca I & 6462.57 &  2.52 &  0.31 & ...& ...& ...& 52.2 & ...& 32.5 & 50.6 \\
  Ti I & 4981.73 &  0.85 &  0.56 & ...& ...& 37.1 & 57.4 & 81.0 & 47.8 & 52.9 \\
  Ti I & 4991.06 &  0.84 &  0.44 & ...& ...& ...& 45.8 & ...& ...& 49.2 \\
  Ti I & 5007.21 &  0.82 &  0.17 & 48.4 & 35.0 & ...& 41.9 & 44.2 & ...& 41.7 \\
  Ti I & 5192.97 &  0.02 & --0.95 & ...& 30.5 & ...& ...& ...& ...& 31.9 \\
  Cr I & 5206.04 &  0.94 &  0.02 & 62.6 & 81.4 & 73.5 & 92.8 & 78.9 & 56.5 & 76.5 \\
  Cr I & 5208.42 &  0.94 &  0.16 & 97.2 & 91.8 & 79.9 & 104.4 & 90.1 & 66.8 & 102.5 \\
  Mn I & 4823.50 &  2.32 &  0.14 & ...& ...& ...& 28.1 & ...& ...& 15.7 \\
  Fe I & 4871.32 &  2.87 & --0.36 & 64.7 & ...& 50.6 & 79.8 & 128.2 & 50.0 & 66.1 \\
  Fe I & 4872.14 &  2.88 & --0.57 & 60.8 & ...& ...& 73.1 & ...& 45.9 & 55.9 \\
  Fe I & 4890.75 &  2.88 & --0.39 & 67.8 & 80.1 & 74.8 & 95.2 & ...& 42.2 & ...\\
  Fe I & 4891.49 &  2.85 & --0.11 & 82.7 & ...& 60.8 & 95.0 & ...& ...& 80.9 \\
  Fe I & 4918.99 &  2.85 & --0.34 & 72.6 & 88.3 & 76.0 & 82.0 & 82.2 & 61.3 & 69.8 \\
  Fe I & 4920.50 &  2.83 &  0.07 & 106.1 & 114.3 & 92.7 & 98.1 & 89.7 & 79.5 & 92.2 \\
  Fe I & 4938.81 &  2.88 & --1.08 & ...& ...& ...& 47.9 & ...& ...& 32.5 \\
  Fe I & 4939.69 &  0.86 & --3.25 & 56.8 & ...& ...& 78.1 & 78.5 & ...& 63.2 \\
  Fe I & 4957.60 &  2.81 &  0.23 & ...& 106.1 & ...& ...& 105.6 & 85.0 & 112.4 \\
  Fe I & 4994.13 &  0.92 & --3.08 & ...& ...& 72.5 & ...& ...& ...& 74.8 \\
  Fe I & 5006.12 &  2.83 & --0.64 & 48.8 & 52.7 & 65.6 & ...& 68.3 & 46.5 & 57.6 \\
  Fe I & 5012.07 &  0.86 & --2.64 & 84.5 & 112.2 & 104.3 & 132.2 & 105.2 & 86.9 & 105.1 \\
  Fe I & 5041.76 &  1.49 & --2.20 & 68.3 & 71.2 & 79.0 & 104.1 & 86.8 & 53.2 & 83.4 \\
  Fe I & 5049.82 &  2.28 & --1.42 & 72.6 & 69.1 & 66.9 & 73.5 & 75.8 & 41.4 & 62.6 \\
  Fe I & 5051.63 &  0.92 & --2.80 & 92.7 & 102.9 & 101.2 & 110.0 & 70.6 & ...& 93.9 \\
  Fe I & 5068.77 &  2.94 & --1.23 & ...& 48.4 & 46.8 & 28.0 & ...& ...& 29.0 \\
  Fe I & 5079.22 &  2.20 & --2.07 & 42.0 & ...& ...& 54.0 & ...& ...& 33.8 \\
  Fe I & 5079.74 &  0.99 & --3.22 & 74.1 & 97.6 & ...& 85.2 & ...& 41.8 & 59.5 \\
  Fe I & 5083.34 &  0.96 & --2.96 & 77.2 & 106.6 & 80.6 & 90.1 & ...& 61.1 & 79.0 \\
  Fe I & 5123.72 &  1.01 & --3.07 & 75.3 & 86.1 & ...& 77.9 & ...& 37.6 & 70.6 \\
  Fe I & 5125.12 &  4.22 & --0.14 & 25.6 & ...& ...& ...& ...& ...& ...\\
  Fe I & 5127.36 &  0.92 & --3.31 & ...& 74.3 & 71.2 & 79.4 & 75.8 & 42.8 & 62.4 \\
  Fe I & 5133.69 &  4.18 &  0.14 & 34.8 & ...& ...& ...& ...& ...& 23.0 \\
  Fe I & 5142.93 &  0.96 & --3.08 & 87.0 & 91.4 & 76.1 & 79.3 & 79.8 & 48.8 & 69.8 \\
  Fe I & 5150.84 &  0.99 & --3.07 & 68.2 & 64.0 & 46.3 & 75.0 & ...& 45.9 & ...\\
  Fe I & 5151.91 &  1.01 & --3.32 & 57.0 & 73.2 & 58.7 & 64.5 & ...& 41.3 & 52.3 \\
  Fe I & 5162.27 &  4.18 &  0.02 & ...& ...& ...& 30.1 & ...& ...& 19.0 \\
  Fe I & 5166.28 &  0.00 & --4.20 & 92.0 & 80.2 & 77.0 & 110.2 & 83.5 & 73.7 & 86.4 \\
  Fe I & 5171.60 &  1.49 & --1.79 & 94.5 & 121.2 & 90.0 & 106.6 & 89.0 & 91.3 & 104.3 \\
  Fe I & 5191.46 &  3.04 & --0.55 & 63.7 & 59.5 & 63.3 & 54.7 & 44.0 & ...& 47.9 \\
  Fe I & 5192.34 &  3.00 & --0.42 & 60.3 & 70.0 & 61.3 & 62.3 & ...& ...& 56.3 \\
  Fe I & 5194.94 &  1.56 & --2.09 & 84.2 & 95.7 & 73.1 & ...& 72.1 & 52.4 & 83.1 \\
  Fe I & 5198.71 &  2.22 & --2.13 & ...& ...& ...& 50.3 & ...& ...& 25.9 \\
  Fe I & 5202.34 &  2.18 & --1.84 & 79.2 & 86.0 & ...& 57.0 & 104.4 & ...& 47.0 \\
  Fe I & 5216.27 &  1.61 & --2.15 & 79.9 & 99.3 & 69.1 & 83.4 & 65.3 & 49.2 & 74.3 \\
  Fe I & 5225.53 &  0.11 & --4.79 & 47.0 & 67.0 & ...& 42.1 & 61.0 & ...& ...\\
  Fe I & 5232.94 &  2.94 & --0.06 & 84.9 & 88.2 & 96.1 & 85.5 & 60.7 & 58.0 & 81.8 \\
  Fe I & 5250.65 &  2.20 & --2.05 & 38.0 & 65.1 & ...& 47.1 & ...& 28.5 & 31.1 \\
  Fe I & 5266.56 &  3.00 & --0.39 & 76.0 & 81.8 & 76.4 & ...& ...& 32.7 & 60.6 \\
  Fe I & 5269.54 &  0.86 & --1.32 & 174.5 & 156.3 & 149.2 & 180.1 & ...& 148.4 & ...\\
  Fe I & 5270.36 &  1.61 & --1.51 & 113.7 & 129.1 & 109.2 & 141.6 & ...& 108.3 & 133.6 \\
  Fe I & 5281.79 &  3.04 & --1.02 & ...& 48.8 & ...& 50.4 & ...& ...& 34.0 \\
  Fe I & 5324.18 &  3.21 & --0.24 & 80.8 & 80.3 & 66.9 & 77.3 & ...& 53.7 & 60.4 \\
  Fe I & 5328.04 &  0.92 & --1.47 & 138.7 & 175.0 & 132.1 & 160.6 & 122.3 & 159.4 & 158.7 \\
  Fe I & 5328.53 &  1.56 & --1.85 & 109.0 & 124.8 & 101.6 & 98.7 & 100.7 & 78.8 & 100.2 \\
  Fe I & 5332.90 &  1.56 & --2.94 & 61.3 & 67.1 & 45.4 & 43.1 & 36.1 & ...& 35.5 \\
  Fe I & 5339.93 &  3.27 & --0.68 & ...& 49.3 & ...& 37.8 & 67.8 & 26.0 & ...\\
\hline
  Fe I & 5341.02 &  1.61 & --2.06 & 98.8 & 106.5 & 75.3 & 105.5 & 103.3 & 81.6 & 89.4 \\
  Fe I & 5371.49 &  0.96 & --1.64 & ...& 170.5 & 137.5 & 154.9 & 154.7 & 120.5 & 147.8 \\
  Fe I & 5397.13 &  0.92 & --1.99 & 138.6 & 140.0 & 99.3 & 164.3 & 127.6 & 125.3 & 134.8 \\
  Fe I & 5405.77 &  0.99 & --1.84 & 92.8 & 157.5 & ...& 156.0 & 120.0 & 117.4 & 137.2 \\
  Fe I & 5429.70 &  0.96 & --1.88 & 127.2 & 141.9 & 123.6 & 141.6 & 153.4 & 107.8 & 140.3 \\
  Fe I & 5434.52 &  1.01 & --2.12 & 98.8 & 131.6 & 97.7 & 134.6 & 133.6 & 103.8 & 123.5 \\ 
  Fe I & 5446.92 &  0.99 & --1.93 & 127.1 & 145.6 & 131.6 & ...& 129.1 & 114.5 & ...\\
  Fe I & 5455.61 &  1.01 & --2.09 & 145.9 & 160.8 & 134.2 & 150.6 & 154.3 & 122.2 & 138.4 \\
  Fe I & 5497.52 &  1.01 & --2.85 & 88.7 & 106.4 & 87.1 & 100.2 & 104.5 & 70.8 & 86.3 \\
  Fe I & 5501.46 &  0.96 & --2.95 & 86.8 & 94.8 & 95.8 & 85.6 & 56.5 & 58.2 & 79.8 \\
  Fe I & 5506.78 &  0.99 & --2.80 & 95.0 & 117.2 & 94.9 & 106.4 & 97.7 & 82.3 & 92.5 \\
  Fe I & 5569.62 &  3.42 & --0.54 & ...& ...& ...& 34.0 & ...& 29.5 & 26.9 \\
  Fe I & 5572.84 &  3.40 & --0.31 & ...& 36.2 & ...& ...& 40.1 & ...& 38.4 \\
  Fe I & 5586.76 &  3.37 & --0.14 & 58.9 & 71.3 & 47.3 & 57.9 & 57.5 & ...& 50.0 \\
  Fe I & 5615.64 &  3.33 & --0.14 & 64.0 & 66.6 & 55.8 & 71.8 & 42.9 & 55.0 & 60.9 \\
  Fe I & 6136.62 &  2.45 & --1.40 & 59.1 & 61.7 & 60.2 & ...& ...& 37.9 & 53.4 \\
  Fe I & 6137.69 &  2.59 & --1.40 & 50.1 & 71.8 & 50.4 & 62.4 & 57.7 & 20.3 & 44.1 \\
  Fe I & 6191.56 &  2.43 & --1.60 & 70.5 & 55.6 & 53.2 & 61.1 & 62.9 & 35.1 & 51.2 \\
  Fe I & 6230.72 &  2.56 & --1.28 & ...& ...& ...& 75.7 & ...& ...& 55.4 \\
  Fe I & 6335.33 &  2.20 & --2.23 & 37.5 & 54.2 & 28.0 & 45.3 & 32.5 & ...& 29.0 \\ 
  Fe I & 6393.60 &  2.43 & --1.62 & 47.3 & ...& 50.6 & 60.7 & 50.5 & ...& 48.0 \\
  Fe I & 6421.35 &  2.28 & --2.03 & 39.9 & ...& ...& 32.2 & ...& ...& 35.2 \\
  Fe I & 6430.85 &  2.18 & --2.01 & 64.5 & ...& 54.2 & 42.2 & ...& 31.0 & 45.5 \\
  Fe I & 6677.99 &  2.69 & --1.47 & 55.7 & 69.1 & 38.3 & 49.7 & ...& ...& 37.9 \\
  Ni I & 4714.41 &  3.38 &  0.26 & ...& ...& 48.8 & ...& ...& ...& 20.9 \\
  Ni I & 5137.07 &  1.68 & --1.99 & ...& ...& ...& 32.9 & ...& ...& 21.1 \\
  Ni I & 5476.90 &  1.83 & --0.89 & ...& 95.3 & 78.6 & ...& ...& ...& ...\\
  Sc II & 4415.56 &  0.60 & --0.67 &...&...&...& 68.5 &...& 70.2 & 63.7 \\
  Sc II & 5031.02 &  1.36 & --0.40 &...&...&...& 32.6 &...&...& 31.5 \\
  Sc II & 5526.79 &  1.77 &  0.02 &...& 35.7 & 35.9 & 35.9 & 27.9 &...& 31.4 \\
  Ti II & 4443.79 &  1.08 & --0.72 & 102.0 & 101.4 & 138.6 & 99.8 &...&...& 110.8 \\
  Ti II & 4444.55 &  1.12 & --2.24 &...&...& 61.0 & 26.7 &...&...& 40.2 \\
  Ti II & 4450.48 &  1.08 & --1.50 &...& 123.5 & 102.2 & 67.2 &...&...& 84.0 \\
  Ti II & 4468.51 &  1.13 & --0.60 & 91.7 & 144.5 &...& 96.6 &...&...& 111.0 \\
  Ti II & 4501.27 &  1.12 & --0.77 &...& 76.4 &...& 85.2 & 128.9 & 73.1 & 113.2 \\
  Ti II & 4563.76 &  1.22 & --0.69 &...& 114.2 & 82.8 & 113.2 & 94.7 &...& 112.6 \\
  Ti II & 4571.97 &  1.57 & --0.32 &...&...&...& 88.7 &...&... & 98.6 \\
  Ti II & 4589.96 &  1.24 & --1.62 & 50.2 &...&...& 80.8 &...&... & 66.5 \\
  Ti II & 4657.20 &  1.24 & --2.24 &...&...&...& 50.3 &...&... & 31.2 \\
  Ti II & 4805.08 &  2.06 & --0.96 & 46.9 & 40.2 &...&...&...&... & 39.4 \\
  Ti II & 5154.07 &  1.57 & --1.78 &...& 50.5 &...& 40.9 & 45.3 &...& 37.0 \\
  Ti II & 5185.91 &  1.88 & --1.37 &...&...&...& 37.7 & 66.2 &...& 30.0 \\
  Ti II & 5226.54 &  1.57 & --1.23 & 62.0 &...&...& 76.9 &...&...& 62.4 \\
  Ti II & 5336.79 &  1.58 & --1.59 & 40.9 &...&...& 43.7 & 87.2 &...& 44.5 \\
  Fe II & 4508.29 &  2.86 & --2.31 &...&...&...& 47.3 &...&...& 41.0 \\
  Fe II & 4583.84 &  2.81 & --1.74 &...& 103.8 &...& 75.1 &...&...& 71.8 \\
  Fe II & 4923.93 &  2.89 & --1.21 & 76.3 & 111.3 & 73.2 & 97.2 & 106.3 & 82.5 & 97.4 \\
  Fe II & 5018.43 &  2.89 & --1.23 &...&...& 63.0 &...&...&...& 107.6 \\
  Fe II & 5197.58 &  3.23 & --2.35 & 56.9 &...& 43.2 & 41.9 & 66.2 &...& 27.9 \\
  Fe II & 5234.63 &  3.22 & --2.15 & 51.5 & 43.2 & 37.0 & 37.2 &...& 23.1 & 33.0 \\
  Fe II & 5275.99 &  3.20 & --2.13 & 46.3 & 50.3 & 55.3 & 61.5 &...& 23.1 & 39.8 \\
  Fe II & 5316.62 &  3.15 & --2.02 & 68.2 & 63.5 & 58.5 & 56.2 & 72.1 & 53.6 & 65.3 \\
  Ba II & 4934.08 &  0.00 & --0.15 & 50.7 & 89.0 & 86.5 & 158.3 & 90.3 & 177.9 & 85.7 \\
  Ba II & 5853.69 &  0.60 & --0.91 &...&...&...& 39.1 &...& 69.8 & 8.1 \\
  Ba II & 6141.73 &  0.70 & --0.08 & 42.5 & 45.3 & 27.9 & 83.3 & 25.5 & 119.8 & 38.9 \\
\hline
\end{tabular}
\end{table}