\begin{table}%t5
\caption{\label{osn_tab2}Observed phase shifts and amplitude ratios for HD~261387 (V3) where the respective errors are given in the second line.}
%\centering
\small
\begin{tabular}{ccrrrr}
\hline\hline
\multicolumn{1}{c}{$u-y$} & \multicolumn{1}{c}{$v-y$} & \multicolumn{1}{c}{$b-y$} &
\multicolumn{1}{c}{$u/y$} &  \multicolumn{1}{c}{$v/y$} & \multicolumn{1}{c}{$b/y$} \\
 \multicolumn{1}{c}{[deg]} & \multicolumn{1}{c}{[deg]} & \multicolumn{1}{c}{[deg]} &  & &   \\
\hline
 --5.4  &  --0.3 &  --4.0 &  1.33 &  1.44 &  1.24 \\
 22.7  &  17.0 &  18.7 &    53  &   43  &   41 \\
\hline
\end{tabular}
\end{table}