\begin{table}%t6
\caption{\label{tab:able}Mean elemental abundances for the program stars, followed
by the standard deviation, when applicable, and the number of
lines on which the abundance is based.}
%\centering
\par
\begin{tabular}{ccccccc}
\hline\hline
[X/Fe] & 2714\_5 & 4756\_12 & 4756\_14 & 4756\_28 & 4756\_38 & 4756\_69 \\
\hline
Mg  & $-$0.02 (01)            & $-$0.02 (01)            & $-$0.05 (01)            &  $-$0.06 (01)           & $-$0.05 (01)            & $-$0.07 (01) \\ 
Si  & +0.03 $\pm$ 0.12 (07)   & +0.04 $\pm$ 0.09 (07)   & +0.10 $\pm$ 0.07 (07)   & +0.10 $\pm$ 0.09 (07)   & +0.01 $\pm$ 0.06 (06)   & +0.02 $\pm$ 0.04 (06) \\
Ca  & +0.04 $\pm$ 0.04 (06)   & +0.07 $\pm$ 0.10 (07)   & +0.03 $\pm$ 0.05 (05)   & $-$0.05 $\pm$ 0.04 (05) & +0.04 $\pm$ 0.09 (07)   & +0.04 $\pm$ 0.09 (07) \\
Sc  & $-$0.05 (02)            & +0.01 (02)              & +0.19 (02)              & +0.02 (02)              & +0.03 (02)              & +0.07 (02) \\
Ti  & $-$0.03 $\pm$ 0.09 (08) & $-$0.04 $\pm$ 0.11 (09) & $-$0.03 $\pm$ 0.16 (09) & $-$0.06 $\pm$ 0.05 (07) & $-$0.04 $\pm$ 0.10 (09) & $-$0.06 $\pm$ 0.04 (07) \\
\ion{V}{i}  & +0.04 $\pm $0.11 (08)   & +0.03 $\pm$ 0.14 (08)   & +0.09 $\pm$ 0.12 (08)   & +0.01 $\pm$ 0.15 (08)   & $-$0.06 $\pm$ 0.08 (07) & $-$0.05 $\pm$ 0.07 (06) \\
\ion{V}{ii} & +0.08 (02)              & +0.19 (02)              & +0.39 (02)              & +0.22 (02)              & +0.16 (02)              & +0.19 (02) \\
\ion{Cr}{i} & $-$0.01 $\pm$ 0.16 (13) & +0.03 $\pm$ 0.08 (15)   & +0.11 $\pm$ 0.10 (13)   & $-$0.04 $\pm$ 0.18 (15) & +0.05 $\pm$ 0.08 (15)   & +0.03 $\pm$ 0.09 (14) \\
\ion{Cr}{ii} & +0.06 $\pm$ 0.11 (04)  & +0.16 $\pm$ 0.10 (04)   & +0.27 $\pm$ 0.08 (04)   & +0.20 $\pm$ 0.12 (04)   & +0.14 $\pm$ 0.06 (04)   & +0.21 $\pm$ 0.11 (04) \\
Co  & +0.05 $\pm$ 0.13 (08)   & +0.05 $\pm$ 0.11 (08)   & +0.12 $\pm$ 0.15 (08)   & +0.05 $\pm$ 0.19 (08)   & +0.02 $\pm$ 0.14 (08)   & +0.06 $\pm$ 0.14 (08) \\
Ni  & +0.01 $\pm$ 0.06 (09)   & $-$0.02 $\pm$ 0.05 (10) & +0.03 $\pm$ 0.09 (09)   & $-$0.01 $\pm$ 0.05 (07) & $-$0.02 $\pm$ 0.05 (11) & $-$0.01 $\pm$ 0.05 (10) \\
%Y   & $-$0.06 (02)            & +0.02 (02)              & +0.20 (02)              & +0.10 (02)              & +0.05 (02)              & +0.09 (02) \\
%Ce  &  0.00 (02)              & +0.05 (02)              & +0.18 (02)              & +0.08 (02)              & +0.02 (01)              & +0.12 (01) \\
%Eu  & +0.34 (01)              & +0.30 (01)              & +0.31 (01)              & +0.23 (01)              & +0.23 (01)              & +0.39 (01) \\
\hline
[X/Fe] & 3532\_19 & 3532\_100 & 3532\_122 & 3532\_596 & 3532\_670 & 3680\_13 \\
\hline
Mg   & $-$0.07 (01)            & $-$0.03 (01)            & $-$0.03 (01)            &  0.00 (01)              &     --                  & $-$0.23 (01) \\
Si   & +0.06 $\pm$ 0.06 (07)   & +0.14 $\pm$ 0.09 (07)   & +0.08 $\pm$ 0.16 (07)   & +0.09 $\pm$ 0.11 (07)   & +0.14 $\pm$ 0.11 (06)   & +0.10 $\pm$ 0.09 (07) \\
Ca   & +0.10 $\pm$ 0.12 (07)   & +0.02 $\pm$ 0.06 (05)   & +0.15 $\pm$ 0.12 (07)   & +0.13 $\pm$ 0.11 (07)   & +0.04 $\pm$ 0.04 (03)   & +0.01 $\pm$ 0.04 (05) \\
Sc   & $-$0.04 (02)            & $-$0.07 (02)            & $-$0.08 (02)            & +0.04 (02)              & +0.12 (02)              & +0.08 (02) \\
Ti   & $-$0.01 $\pm$ 0.08 (08) & $-$0.04 $\pm$ 0.08 (07) & $-$0.03 $\pm$ 0.13 (09) & $-$0.02 $\pm$ 0.10 (09) & +0.01 $\pm$ 0.09 (06)   & $-$0.01 $\pm$ 0.04 (07) \\
\ion{V}{i}  & $-$0.01 $\pm$ 0.09 (07) & $-$0.04 $\pm$ 0.13 (08) & +0.05 $\pm$ 0.10 (07)   & +0.02 $\pm$ 0.14 (08)   & +0.16 $\pm$ 0.16 (07)   & +0.09 $\pm$ 0.15 (08) \\
\ion{V}{ii}  & +0.16 (02)              & +0.14 (02)              & +0.16 (01)              & +0.14 (02)              & +0.36 (02)              & +0.24 (02) \\
\ion{Cr}{i}  &  0.00 $\pm$ 0.10 (13)   & $-$0.04 $\pm$ 0.11 (13) & +0.06 $\pm$ 0.17 (15)   & +0.03 $\pm$ 0.06 (11)   & $-$0.01 $\pm$ 0.13 (12) &  0.00 $\pm$ 0.13 (13) \\
\ion{Cr}{ii} & +0.17 $\pm$ 0.08 (04)   & +0.12 $\pm$ 0.06 (04)   & +0.06 $\pm$ 0.11 (04)   & +0.19 $\pm$ 0.05 (04)   & +0.28 $\pm$ 0.21 (04)   & +0.18 $\pm$ 0.06 (04) \\
Co   & +0.03 $\pm$ 0.13 (08)   & +0.01 $\pm$ 0.14 (08)   & +0.12 $\pm$ 0.14 (08)   & +0.10 $\pm$ 0.18 (08)   & +0.13 $\pm$ 0.25 (07)   & +0.14 $\pm$ 0.19 (08) \\
Ni   & $-$0.01 $\pm$ 0.07 (09) &  0.00 $\pm$ 0.07 (09)   & $-$0.01 $\pm$ 0.08 (10) & $-$0.01 $\pm$ 0.09 (09) & +0.16 $\pm$ 0.15 (09)   & +0.02 $\pm$ 0.08 (09) \\
%Y    & +0.12 (02)              & +0.07 (02)              & +0.02 (02)              & +0.07 (02)              & +0.14 (02)              & +0.08 (02) \\
%Ce   & +0.06 (02)              & +0.06 (02)              & +0.02 (02)              & +0.02 (02)              & +0.23 (02)              & +0.12 (02) \\
%Eu   & +0.35 (01)              & +0.28 (01)              & +0.15 (01)              & +0.10 (01)              & +0.26 (01)              & +0.25 (01) \\
\hline
[X/Fe] & 5822\_1 & 5822\_201 & 5822\_240 & 5822\_316 & 5822\_443 & 6134\_30 \\
\hline
Mg   &    --                   & $-$0.01 (01)          &     --                  & $-$0.02 (01)            & +0.03 (01)              &  0.00 (01) \\
Si   & +0.13 $\pm$ 0.12 (07)   & +0.06 $\pm$ 0.07 (07) & +0.11 $\pm$ 0.09 (06)   & $-$0.04 $\pm$ 0.04 (06) & +0.17 $\pm$ 0.08 (07)   & +0.03 $\pm$ 0.10 (07) \\
Ca   & $-$0.02 $\pm$ 0.06 (03) & +0.03 $\pm$ 0.15 (07) &  0.00 $\pm$ 0.08 (03)   &  0.00  $\pm$ 0.06 (06)  & +0.06 $\pm$ 0.14 (06)   & +0.06 $\pm$ 0.14 (06) \\
Sc   & +0.03 (02)              &  0.00 (02)            & +0.03 (02)              & $-$0.17 (02)            & +0.06 (02)              & +0.10 (02) \\
Ti   & $-$0.02 $\pm$ 0.08 (07) & +0.04 $\pm$ 0.04 (07) & $-$0.01 $\pm$ 0.08 (07) & $-$0.02 $\pm$ 0.10 (09) & $-$0.04 $\pm$ 0.06 (07) & $-$0.04 $\pm$ 0.06 (08) \\
\ion{V}{i}  & +0.11 $\pm$ 0.16 (08)   & +0.05 $\pm$ 0.14 (08) & +0.12 $\pm$ 0.15 (07)   &  0.00 $\pm$ 0.08 (07)   & +0.02 $\pm$ 0.13 (08)   & $-$0.04 $\pm$ 0.05 (07) \\
\ion{V}{ii}  & +0.28 (02)              & +0.11 (02)            & +0.27 (02)              & +0.13 (02)              & +0.26 (02)              & +0.17 (02) \\
\ion{Cr}{i}  & $-$0.03 $\pm$ 0.17 (14) & +0.06 $\pm$ 0.10 (15) & +0.02 $\pm$ 0.07 (10)   & +0.03 $\pm$ 0.10 (15)   & +0.04 $\pm$ 0.10 (13)   & +0.04 $\pm$ 0.09 (10) \\
\ion{Cr}{ii} & +0.11 $\pm$ 0.15 (04)   & +0.16 $\pm$ 0.09 (04) & +0.16 $\pm$ 0.12 (04)   & +0.19 $\pm$ 0.12 (04)   & +0.19 $\pm$ 0.06 (04)   & +0.20 $\pm$ 0.13 (04) \\
Co   & +0.06 $\pm$ 0.20 (08)   & +0.10 $\pm$ 0.15 (08) & +0.12 $\pm$ 0.20 (08)   & +0.03 $\pm$ 0.15 (07)   & +0.08 $\pm$ 0.15 (08)   & +0.11 $\pm$ 0.16 (07) \\
Ni   & +0.05 $\pm$ 0.09 (09)   & +0.01 $\pm$ 0.06 (09) & +0.08 $\pm$ 0.13 (09)   & $-$0.03 $\pm$ 0.05 (09) & +0.05 $\pm$ 0.05 (08)   & +0.03 $\pm$ 0.10 (10) \\
\hline
[X/Fe] & 6134\_99 & 6134\_202 & 6281\_3 & 6281\_4 & 6633\_78 & 6633\_100 \\
\hline
Mg   & $-$0.02 (01)            & +0.01 (01)              & +0.04 (01)              & +0.02 (01)              &    --                   & $-$0.06 (01) \\
Si   & +0.09 $\pm$ 0.08 (07)   & +0.16 $\pm$ 0.11 (07)   & +0.13 $\pm$ 0.07 (07)   & +0.10 $\pm$ 0.07 (07)   & +0.10 $\pm$ 0.09 (06)   & +0.04 $\pm$ 0.08 (07) \\
Ca   & +0.05 $\pm$ 0.08 (06)   & +0.09 $\pm$ 0.16 (05)   & +0.10 $\pm$ 0.11 (06)   & +0.11 $\pm$ 0.10 (06)   & $-$0.03 $\pm$ 0.08 (03) & $-$0.01 $\pm$ 0.05 (06) \\
Sc   & +0.11 (02)              & +0.02 (02)              & $-$0.02 (02)            & $-$0.01 (02)            & +0.12 (02)              & +0.11 (02) \\
Ti   &  0.00 $\pm$ 0.07 (07)   & $-$0.06 $\pm$ 0.07 (07) & +0.01 $\pm$ 0.10 (07)   & $-$0.03 $\pm$ 0.12 (09) & +0.05 $\pm$ 0.07 (07)   & $-$0.03 $\pm$ 0.10 (09) \\
\ion{V}{i}   & +0.10 $\pm$ 0.13 (08)   & +0.05 $\pm$ 0.16 (08)   & $-$0.02 $\pm$ 0.08 (07) & +0.04 $\pm$ 0.12 (08)   & +0.16 $\pm$ 0.16 (07)   & $-$0.04 $\pm$ 0.07 (07) \\
\ion{V}{ii}  & +0.28 (02)              & +0.20 (02)              & +0.15 (02)              & +0.12 (02)              & +0.40 (02)              & +0.30 (02) \\
\ion{Cr}{i} & +0.09 $\pm$ 0.11 (13)   & +0.06 $\pm$ 0.14 (13)   & +0.01 $\pm$ 0.08 (13)   & +0.02 $\pm$ 0.10 (13)   &  0.00 $\pm$ 0.15 (12)   & +0.03 $\pm$ 0.11 (13) \\
\ion{Cr}{ii} & +0.22 $\pm$ 0.10 (04)   &  0.00 $\pm$ 0.13 (04)   & +0.15 $\pm$ 0.06 (04)   & +0.14 $\pm$ 0.06 (04)   & +0.27 $\pm$ 0.12 (04)   & +0.25 $\pm$ 0.09 (04) \\
Co   & +0.08 $\pm$ 0.17 (08)   & +0.14 $\pm$ 0.14 (07)   & +0.07 $\pm$ 0.18 (09)   & +0.02 $\pm$ 0.14 (08)   & +0.17 $\pm$ 0.23 (08)   & +0.07 $\pm$ 0.16 (08) \\
Ni   & +0.05 $\pm$ 0.08 (09)   & +0.07 $\pm$ 0.08 (09)   & +0.01 $\pm$ 0.06 (08)   & +0.06 $\pm$ 0.06 (08)   & +0.09 $\pm$ 0.14 (09)   & $-$0.03 $\pm$ 0.08 (10) \\
\hline
\end{tabular}
\end{table}