\begin{table}%t3
\caption{\label{limbcoeff}Coefficients of the limb-darkening model of \citet{claret00} used in
  the MCMC fits to the photometry.}
\small%\centering
\par
\begin{tabular}{lcccc}
\hline\hline
Dataset & $a_1$ & $a_2$ & $a_3$ & $a_4$ \\
\hline
WASP & 0.7265 & --0.7958 & 1.5198 & --0.6284 \\
LT & 0.7740 & --0.8258 & 1.2850 & --0.5339\\
\hline
\end{tabular}
\par
\end{table}