\begin{table}%ta.3
\caption{\label{table:photo-hd72106}Photometric flux measurements of HD~72106~B. The value that is marked with the symbol ``$\downarrow$'' is an upper limit.}
%\centerline
 {\small  \begin{tabular}{llr}
\hline\hline
      Wavelength [${\rm \mu m}$] & Flux [Jy] & Ref. \\
\hline
      $0.36$ & $0.80$ & { 1} \\
      $0.44$ & $1.67$ & { 1} \\
      $0.55$ & $1.45$ & { 1} \\
      $0.79$ & $1.32$ & { 1} \\
      $0.90$ & $0.89$ & { 1} \\
      $1.23	$ & $0.61	 $ & { 3} \\
      $1.25$ & $0.67 \pm 0.01$ & { 2} \\
      $1.63	$ & $0.45	 $ & { 3} \\
      $1.65$ & $0.50 \pm 0.02$ & { 2} \\ 
      $2.19	$ & $0.41	 $ & { 3} \\
      $2.20$ & $0.43 \pm 0.01$ & { 2} \\ 
      $3.78	$ & $0.39	 $ & { 3} \\
      $4.66	$ & $0.44	 $ & { 3} \\
      $8.36	$ & $1.74	 $ & { 3} \\
      $9.67	$ & $1.45	 $ & { 3} \\
      $12.0	$ & $2.23\pm0.13 $ & { 3, 4} \\
      $25	$ & $3.62\pm0.21 $ & { 3} \\
      $60	$ & $1.88\pm0.11 $ & { 4} \\
      $100	$ & $16.8^{\downarrow}$ & { 4} \\
      \hline
    \end{tabular}}
\medskip
 References~-- {1}:~Torres et~al. (\cite{torres}); {2}:~2~MASS catalogue~(Cutri et~al. \cite{cutri}); {3}: Gezari et~al. (\cite{gezari}); {4}:~IRAS catalogue~(\cite{iras}).
  \end{table}