\begin{table}%t1
\caption{\label{table}A summary of measured intensity, calculated nonthermal velocity~($\xi$), flux ratio and electron density for the plume~(P) and interplume~(I-P) obtained from \ion{Fe}{xii} ($T_{i}=1.3$~$\times$ $10^{6}$~K) and \ion{Fe}{xiii} ($T_{i}=1.6$~$\times$ $10^{6}$~K) at different locations.}
\par
%%\centering

\small
\begin{tabular}{c c c c c c c c c c c c c c c c c}
\hline\hline
%&&&&&&&&&&&&&&&& \\[-8pt]
Above limb & \multicolumn{2}{c}{$I$(195.12 \AA)} & \multicolumn{2}{c}{$\xi$} & \multicolumn{2}{c}{\ion{Fe}{xii} ratio} & \multicolumn{2}{c}{$\log N_{\rm e}/{\rm cm}^{-3}$} & \multicolumn{2}{c}{$I$(202.04 \AA)} & \multicolumn{2}{c}{$\xi$} & \multicolumn{2}{c}{\ion{Fe}{xiii} ratio} & \multicolumn{2}{c}{$\log N_{\rm e}/{\rm cm}^{-3}$} \\
(arcsec) & \multicolumn{2}{c}{erg cm$^{2}$s$^{-1}$sr$^{-1}$} & \multicolumn{2}{c}{km$~$s$^{-1}$} & \multicolumn{2}{c}{$10^{-2}$}& & & \multicolumn{2}{c}{erg cm$^{2}$ s$^{-1}$ sr$^{-1}$} & \multicolumn{2}{c}{km$~$s$^{-1}$} &\multicolumn{2}{c}{$10^{-2}$}& & \\
& I-P & P & I-P & P & I-P & P & I-P & P & I-P & P & I-P & P & I-P & P & I-P & P \\ 
\hline
   0.00 &  52.45 & 164.67 & 34.6 & 36.9 & 20.25 & 22.71 & 8.84 & 8.95 &  34.35 &  93.85 & 20.7 & 24.9 & 50.52 & 64.70 & 9.35 & 9.53 \\ 
   1.00 &  62.02 & 235.34 & 29.3 & 38.4 & 19.27 & 24.54 & 8.80 & 9.03 &  41.81 & 137.62 & 26.1 & 27.9 & 38.72 & 84.76 & 9.19 & 9.78 \\ 
   2.00 &  69.19 & 338.49 & 28.3 & 39.6 & 21.29 & 25.57 & 8.89 & 9.07 &  48.19 & 190.09 & 22.2 & 27.6 & 22.87 & 86.29 & 8.92 & 9.80 \\ 
   3.00 &  75.52 & 466.16 & 29.7 & 35.1 & 17.08 & 26.58 & 8.69 & 9.11 &  52.97 & 249.19 & 29.2 & 28.1 & 17.85 & 87.73 & 8.80 & 9.82 \\ 
   4.00 &  78.00 & 591.03 & 26.7 & 33.5 & 15.42 & 27.77 & 8.61 & 9.15 &  57.13 & 304.34 & 25.9 & 28.0 & 19.98 & 88.91 & 8.85 & 9.84 \\ 
   5.00 &  77.34 & 675.66 & 24.7 & 29.2 & 14.12 & 29.85 & 8.54 & 9.23 &  60.63 & 341.56 & 31.7 & 28.8 & 15.58 & 87.72 & 8.73 & 9.82 \\ 
   6.00 &  77.36 & 723.83 & 24.5 & 27.3 & 17.29 & 31.22 & 8.70 & 9.28 &  64.50 & 361.62 & 35.6 & 28.6 & 10.73 & 86.09 & 8.57 & 9.80 \\ 
   7.00 &  79.45 & 706.95 & 26.0 & 25.5 & 14.13 & 32.34 & 8.54 & 9.32 &  65.34 & 363.00 & 29.4 & 25.5 & 23.97 & 82.00 & 8.94 & 9.75 \\ 
   8.00 &  79.13 & 664.77 & 23.0 & 25.2 & 17.20 & 32.43 & 8.70 & 9.32 &  65.01 & 347.64 & 29.3 & 24.1 & 15.04 & 77.39 & 8.72 & 9.68 \\ 
   9.00 &  81.20 & 592.35 & 30.8 & 25.1 & 18.07 & 31.95 & 8.74 & 9.31 &  66.42 & 318.12 & 28.2 & 24.1 &  6.45 & 71.80 & 8.34 & 9.61 \\ 
  10.00 &  80.88 & 505.33 & 32.0 & 24.1 & 13.21 & 31.79 & 8.49 & 9.30 &  67.35 & 277.62 & 29.7 & 25.3 & 16.50 & 63.80 & 8.76 & 9.52 \\ 
  12.00 &  80.63 & 339.73 & 29.9 & 22.1 & 13.02 & 29.52 & 8.48 & 9.22 &  66.44 & 183.97 & 29.8 & 25.9 &  7.67 & 42.09 & 8.41 & 9.24 \\ 
  15.00 &  78.40 & 201.39 & 30.5 & 28.4 & 11.05 & 19.71 & 8.36 & 8.82 &  65.57 & 125.56 & 33.0 & 28.2 & 12.94 & 25.23 & 8.65 & 8.96 \\ 
  18.00 &  73.91 & 165.77 & 30.8 & 30.4 & 11.85 & 15.40 & 8.41 & 8.61 &  67.02 & 113.20 & 30.8 & 26.6 & 14.58 & 22.32 & 8.70 & 8.90 \\ 
  21.00 &  71.94 & 144.86 & 34.3 & 29.4 & 10.61 & 12.68 & 8.34 & 8.46 &  61.95 & 103.00 & 31.1 & 27.9 & 21.06 & 13.27 & 8.88 & 8.66 \\ 
  24.00 &  68.51 & 131.47 & 33.0 & 27.3 & 12.33 & 13.57 & 8.44 & 8.51 &  60.72 &  97.82 & 31.6 & 28.2 & 18.04 & 10.72 & 8.80 & 8.57 \\ 
  27.00 &  66.44 & 121.21 & 33.1 & 28.4 & 10.90 & 11.48 & 8.35 & 8.39 &  59.08 &  95.80 & 33.7 & 30.7 &  6.55 & 12.26 & 8.34 & 8.63 \\ 
  30.00 &  63.69 & 116.30 & 34.2 & 27.0 &  9.80 & 10.66 & 8.28 & 8.34 &  56.08 &  89.60 & 31.6 & 31.2 &  0.70 & 16.14 & 7.50 & 8.75 \\ 
  36.00 &  57.09 & 100.84 & 31.9 & 29.7 & 10.15 & 11.06 & 8.31 & 8.36 &  52.96 &  81.91 & 32.2 & 29.4 &  8.66 & 11.76 & 8.47 & 8.61 \\ 
  41.00 &  53.43 &  93.63 & 31.7 & 27.3 & 12.38 &  9.21 & 8.44 & 8.24 &  50.69 &  76.62 & 35.4 & 30.1 & 12.21 & 13.79 & 8.62 & 8.68 \\ 
  46.00 &  52.43 &  86.73 & 35.8 & 28.1 &  7.16 &  9.12 & 8.08 & 8.24 &  48.36 &  71.34 & 35.6 & 32.9 &  5.60 &  7.19 & 8.27 & 8.39 \\ 
  51.00 &  48.57 &  81.15 & 33.5 & 33.0 & 10.38 & 10.60 & 8.32 & 8.34 &  46.97 &  70.03 & 35.1 & 32.0 &  5.76 &  8.00 & 8.29 & 8.43 \\ 
  56.00 &  46.51 &  74.57 & 36.5 & 32.6 & 11.52 &  9.66 & 8.39 & 8.27 &  43.59 &  61.55 & 35.0 & 31.9 & 16.10 & 13.13 & 8.75 & 8.66 \\ 
  61.00 &  42.88 &  65.98 & 34.4 & 31.4 &  8.86 & 11.49 & 8.22 & 8.39 &  40.57 &  57.00 & 36.3 & 31.5 &  6.72 &  8.19 & 8.36 & 8.44 \\ 
  66.00 &  39.34 &  61.77 & 37.4 & 32.6 & 10.24 & 10.56 & 8.31 & 8.33 &  39.13 &  52.93 & 34.3 & 32.6 &  4.94 & 11.07 & 8.22 & 8.58 \\ 
  71.00 &  40.04 &  57.45 & 40.4 & 33.3 &  9.55 &  8.65 & 8.27 & 8.20 &  36.33 &  50.11 & 35.7 & 32.6 &  2.08 &  8.64 & 7.82 & 8.47 \\ 
  77.00 &  36.04 &  52.79 & 37.4 & 34.8 & 10.70 &  9.90 & 8.34 & 8.29 &  34.49 &  46.50 & 39.7 & 35.4 & 14.54 & 19.55 & 8.70 & 8.84 \\ 
  84.00 &  31.71 &  46.21 & 37.4 & 32.6 &  8.86 &  9.20 & 8.22 & 8.24 &  29.95 &  41.55 & 40.9 & 35.8 & 10.53 & 10.27 & 8.56 & 8.55 \\ 
  91.00 &  29.47 &  41.63 & 38.5 & 35.8 &  6.55 &  6.95 & 8.03 & 8.06 &  26.83 &  36.19 & 38.6 & 35.8 &  4.22 & 14.17 & 8.15 & 8.69 \\ 
  98.00 &  26.06 &  36.87 & 39.1 & 35.6 &  8.68 &  9.05 & 8.20 & 8.23 &  24.20 &  32.70 & 44.6 & 40.2 &  5.23 &  9.89 & 8.24 & 8.53 \\ 
 105.00 &  24.47 &  34.22 & 43.1 & 34.1 & 11.04 & 10.78 & 8.36 & 8.35 &  22.11 &  29.07 & 35.3 & 32.3 &  6.19 &  9.02 & 8.32 & 8.49 \\ 
 112.00 &  23.00 &  31.14 & 37.4 & 34.6 &  9.39 &  6.49 & 8.25 & 8.02 &  21.09 &  29.55 & 41.2 & 38.9 & 14.96 & --2.76 & 8.72 & **** \\ 
 122.50 &  20.49 &  28.04 & 43.0 & 39.0 & 14.76 &  9.86 & 8.57 & 8.29 &  17.72 &  24.00 & 40.2 & 37.4 &  6.88 &  5.61 & 8.37 & 8.27 \\ 
 136.50 &  16.80 &  22.50 & 41.1 & 39.8 &  8.02 &  5.26 & 8.15 & 7.89 &  14.61 &  19.07 & 37.5 & 37.4 &  5.24 & 12.69 & 8.24 & 8.64 \\ 
 150.50 &  14.68 &  18.72 & 42.7 & 40.3 &  5.66 &  8.82 & 7.94 & 8.21 &  12.31 &  15.80 & 44.0 & 39.5 &  0.05 &  6.85 & 7.50 & 8.36 \\ 
\hline
\end{tabular}
\end{table}