\begin{table}%t5
\caption{\label{table:5}\textit{Spitzer} and \textit{MSX} fluxes of IRAS post-AGB star and PN~candidates with counterparts in the 2MASS PSC.}           
\par
%%\centering

\small      
\begin{tabular}{rccccccccc}  
\hline\hline 
\multicolumn{1}{c}{} & 
\multicolumn{4}{c}{Spitzer} & 
\multicolumn{1}{c}{} & 
\multicolumn{4}{c}{\textit{MSX}} \\ 
\cline{2-5}
\cline{7-10} 
\\
\multicolumn{1}{r}{} & 
\multicolumn{1}{c}{3.6 $\mu$m} & 
\multicolumn{1}{c}{4.5 $\mu$m} & 
\multicolumn{1}{c}{5.8 $\mu$m} & 
\multicolumn{1}{c}{8 $\mu$m} & 
\multicolumn{1}{c}{} & 
\multicolumn{1}{c}{8.28 $\mu$m} & 
\multicolumn{1}{c}{12.13 $\mu$m} & 
\multicolumn{1}{c}{14.65 $\mu$m} & 
\multicolumn{1}{c}{21.3 $\mu$m} \\ 
\multicolumn{1}{c}{} & 
\multicolumn{1}{c}{[{\rm Jy}]} & 
\multicolumn{1}{c}{[{\rm Jy}]} & 
\multicolumn{1}{c}{[{\rm Jy}]} & 
\multicolumn{1}{c}{[{\rm Jy}]} & 
\multicolumn{1}{c}{} & 
\multicolumn{1}{c}{[{\rm Jy}]} & 
\multicolumn{1}{c}{[{\rm Jy}]} & 
\multicolumn{1}{c}{[{\rm Jy}]} & 
\multicolumn{1}{c}{[{\rm Jy}]} \\
\hline 
IRAS~00509$+$6623 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~1.18 $\pm$ 0.05 & 2.75 $\pm$ 0.19 & 2.45 $\pm$ 0.18 & 3.50 $\pm$ 0.27 \\
IRAS~08242$-$3828 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~8.9 $\pm$ 0.4   & 11.3 $\pm$ 0.6  & 12.9 $\pm$ 0.8  & 20.7 $\pm$ 1.2  \\
IRAS~09055$-$4629 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.26 $\pm$ 0.01 & 0.78 $\pm$ 0.05 & 0.86 $\pm$ 0.06 & 1.98 $\pm$ 0.13 \\
IRAS~09102$-$5101 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.14 $\pm$ 0.01 & $\cdots$~~~~~ & 1.06 $\pm$ 0.08 & 1.63 $\pm$ 0.13 \\
IRAS~09119$-$5150 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.30 $\pm$ 0.02 & 1.05 $\pm$ 0.09 & 1.26 $\pm$ 0.09 & 2.14 $\pm$ 0.16 \\
IRAS~09500$-$5236 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.23 $\pm$ 0.01 & $\cdots$~~~~~ & 0.88 $\pm$ 0.07 & $\cdots$~~~~~ \\
IRAS~09378$-$5117 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.76 $\pm$ 0.03 & 2.17 $\pm$ 0.13 & 3.89 $\pm$ 0.24 & 4.92 $\pm$ 0.31 \\
IRAS~11339$-$6004 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.67 $\pm$ 0.03 & 2.37 $\pm$ 0.14 & 3.28 $\pm$ 0.21 & 5.65 $\pm$ 0.35 \\
IRAS~11488$-$6432 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~1.03 $\pm$ 0.04 & 1.49 $\pm$ 0.10 & 1.72 $\pm$ 0.11 & 2.02 $\pm$ 0.15 \\
IRAS~11544$-$6408 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & 10.34 $\pm$ 0.42 & 24.6 $\pm$ 1.2  & 34.1 $\pm$ 2.1  & 34.0 $\pm$ 2.0  \\
IRAS~12262$-$6417 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~1.86 $\pm$ 0.08 & 2.55 $\pm$ 0.15 & 2.64 $\pm$ 0.17 & 5.01 $\pm$ 0.32 \\
IRAS~12309$-$5928 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~1.31 $\pm$ 0.05 & 2.00 $\pm$ 0.12 & 2.34 $\pm$ 0.15 & 3.90 $\pm$ 0.25 \\
IRAS~13356$-$6249 &   $\cdots$~~~~~ &   $\cdots$~~~~~ & 0.747 $\pm$ 0.022 & 0.882 $\pm$ 0.030 & & ~1.49 $\pm$ 0.06 & 7.6 $\pm$ 0.4   & 22.1 $\pm$ 1.4  &  103 $\pm$ 6    \\
IRAS~13398$-$5951 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~1.57 $\pm$ 0.06 & 2.70 $\pm$ 0.15 & 3.37 $\pm$ 0.21 & 4.81 $\pm$ 0.30 \\
IRAS~13421$-$6125 & 0.273 $\pm$ 0.031 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~7.14 $\pm$ 0.29 & 14.6 $\pm$ 0.7  & 22.4 $\pm$ 1.4  & 22.0 $\pm$ 1.3  \\
IRAS~13483$-$5905 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~1.07 $\pm$ 0.04 & 4.45 $\pm$ 0.23 & 10.0 $\pm$ 0.6  & 10.8 $\pm$ 0.7  \\
IRAS~14104$-$5819 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~3.64 $\pm$ 0.15 & 4.59 $\pm$ 0.24 &  7.8 $\pm$ 0.5  &  9.2 $\pm$ 0.6  \\
IRAS~15038$-$5533 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.63 $\pm$ 0.03 & 1.25 $\pm$ 0.09 & 1.61 $\pm$ 0.11 & 2.15 $\pm$ 0.16 \\
IRAS~15144$-$5812 &  0.35 $\pm$ 0.07  &  3.35 $\pm$ 0.21  &  4.41 $\pm$ 0.11  &   $\cdots$~~~~~ & & ~5.13 $\pm$ 0.21 & 6.53 $\pm$ 0.33 & 8.8 $\pm$ 0.5   & 26.6 $\pm$ 1.6  \\
IRAS~15408$-$5657 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & &  65.9 $\pm$ 2.7  &  102 $\pm$ 5    & 112 $\pm$ 7     &  123 $\pm$ 7    \\
IRAS~15408$-$5413 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & &   135 $\pm$ 6~   &  231 $\pm$ 12   & 257 $\pm$ 16    &  298 $\pm$ 18   \\
IRAS~16228$-$5014 &   $\cdots$~~~~~ &   $\cdots$~~~~~ & 0.690 $\pm$ 0.020 & 0.463 $\pm$ 0.011 & & ~0.22 $\pm$ 0.01 & 0.76 $\pm$ 0.07 & 1.35 $\pm$ 0.09 & 11.4 $\pm$ 0.7  \\
IRAS~16517$-$3626 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.75 $\pm$ 0.03 & 1.65 $\pm$ 0.13 & 2.39 $\pm$ 0.16 & 5.45 $\pm$ 0.35 \\
IRAS~16518$-$3425 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.35 $\pm$ 0.02 & $\cdots$~~~~~ & 1.95 $\pm$ 0.14 &  6.7 $\pm$ 0.4  \\
IRAS~16567$-$3838 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~5.88 $\pm$ 0.24 & 8.5 $\pm$ 0.4   & 11.1 $\pm$ 0.7  & 13.4 $\pm$ 0.8  \\
IRAS~16584$-$3710 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.43 $\pm$ 0.02 & 0.95 $\pm$ 0.10 & 1.96 $\pm$ 0.13 & 4.00 $\pm$ 0.26 \\
IRAS~17010$-$3810 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.55 $\pm$ 0.02 & 2.21 $\pm$ 0.13 & 4.08 $\pm$ 0.25 &  8.2 $\pm$ 0.5  \\
IRAS~17021$-$3109 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~1.06 $\pm$ 0.05 & 2.99 $\pm$ 0.21 &  6.3 $\pm$ 0.4  &  9.1 $\pm$ 0.6  \\
IRAS~17021$-$3054 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.42 $\pm$ 0.02 & $\cdots$~~~~~ & 3.32 $\pm$ 0.23 & 4.51 $\pm$ 0.32 \\
IRAS~17149$-$3053 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.41 $\pm$ 0.02 & 2.02 $\pm$ 0.13 & 3.93 $\pm$ 0.25 &  8.2 $\pm$ 0.5  \\
IRAS~17175$-$2819 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & &  12.7 $\pm$ 0.5  &   61 $\pm$ 3    &  128 $\pm$ 8    &  247 $\pm$ 15   \\
IRAS~17233$-$2602 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~1.94 $\pm$ 0.08 & 4.32 $\pm$ 0.23 &  7.4 $\pm$ 0.5  &  7.9 $\pm$ 0.5  \\
IRAS~17348$-$2906 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &  2.54 $\pm$ 0.07  &   $\cdots$~~~~~ & & ~1.92 $\pm$ 0.08 & 3.30 $\pm$ 0.18 & 3.92 $\pm$ 0.24 &  7.7 $\pm$ 0.5  \\
IRAS~17359$-$2902 &0.0520 $\pm$ 0.0020&0.0522 $\pm$ 0.0017&0.0610 $\pm$ 0.0024& 0.261 $\pm$ 0.007 & & ~0.44 $\pm$ 0.02 & 1.70 $\pm$ 0.11 & 3.27 $\pm$ 0.21 & 10.0 $\pm$ 0.6  \\
IRAS~17360$-$2142 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.26 $\pm$ 0.01 &  1.3 $\pm$ 0.6  & 2.31 $\pm$ 0.15 &  8.9 $\pm$ 0.5  \\
IRAS~17385$-$3332 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.19 $\pm$ 0.01 & 0.73 $\pm$ 0.08 & 1.78 $\pm$ 0.12 &  7.7 $\pm$ 0.5  \\
IRAS~17499$-$3520 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.76 $\pm$ 0.03 & 2.40 $\pm$ 0.15 & 3.65 $\pm$ 0.23 & 10.3 $\pm$ 0.6  \\
IRAS~17516$-$2525 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & &  40.5 $\pm$ 1.7  & 43.9 $\pm$ 2.2  & 44.7 $\pm$ 2.7  &   89 $\pm$ 5    \\
IRAS~17540$-$2753 &0.0590 $\pm$ 0.0020&0.0483 $\pm$ 0.0027&0.0580 $\pm$ 0.0018& 0.292 $\pm$ 0.010 & & ~0.38 $\pm$ 0.02 & 1.41 $\pm$ 0.10 & 3.74 $\pm$ 0.24 & 10.0 $\pm$ 0.6  \\
IRAS~17548$-$2753 &0.0367 $\pm$ 0.0015&0.0462 $\pm$ 0.0019&0.0480 $\pm$ 0.0014& 0.136 $\pm$ 0.004 & & ~0.23 $\pm$ 0.01 & 1.00 $\pm$ 0.09 & 3.60 $\pm$ 0.23 & 11.4 $\pm$ 0.7  \\
IRAS~17550$-$2800 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &  1.90 $\pm$ 0.06  &   $\cdots$~~~~~ & & ~2.29 $\pm$ 0.09 & 2.17 $\pm$ 0.13 & 3.00 $\pm$ 0.19 & 4.28 $\pm$ 0.28 \\
IRAS~17580$-$3111 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~1.24 $\pm$ 0.05 & 3.62 $\pm$ 0.18 &  6.9 $\pm$ 0.4  & 13.2 $\pm$ 0.8  \\
IRAS~17582$-$2619 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.38 $\pm$ 0.02 & 1.65 $\pm$ 0.11 & 3.45 $\pm$ 0.22 &  7.0 $\pm$ 0.4  \\
IRAS~18015$-$1352 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~1.46 $\pm$ 0.06 & 2.39 $\pm$ 0.14 & 2.48 $\pm$ 0.16 & 3.42 $\pm$ 0.22 \\
IRAS~18049$-$2118 &   $\cdots$~~~~~ &  3.90 $\pm$ 0.34  &  11.4 $\pm$ 0.8   &   $\cdots$~~~~~ & & ~8.31 $\pm$ 0.34 & 13.4 $\pm$ 0.7  & 17.6 $\pm$ 1.1  & 18.3 $\pm$ 1.1  \\
IRAS~18071$-$1727 & 0.147 $\pm$ 0.006 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~8.22 $\pm$ 0.34 & 28.7 $\pm$ 1.4  & 51.5 $\pm$ 3.1  & 57.5 $\pm$ 3.5  \\
IRAS~18105$-$1935 & 0.370 $\pm$ 0.021 &   $\cdots$~~~~~ &  2.22 $\pm$ 0.05  &  4.32 $\pm$ 0.11  & & ~3.78 $\pm$ 0.15 &  8.3 $\pm$ 0.4  & 12.0 $\pm$ 0.7  & 15.0 $\pm$ 0.9  \\
IRAS~18113$-$2503 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.69 $\pm$ 0.03 & 2.53 $\pm$ 0.14 & 5.48 $\pm$ 0.33 &  9.6 $\pm$ 0.6  \\
IRAS~18199$-$1442 & 0.542 $\pm$ 0.04  &  2.83 $\pm$ 0.15  &   $\cdots$~~~~~ &   $\cdots$~~~~~ & &  15.7 $\pm$ 0.6  & 22.3 $\pm$ 1.1  & 29.8 $\pm$ 1.8  & 28.4 $\pm$ 1.7  \\
IRAS~18229$-$1127 &0.0368 $\pm$ 0.0029&0.0434 $\pm$ 0.0024& 0.161 $\pm$ 0.007 & 0.515 $\pm$ 0.04  & & ~0.50 $\pm$ 0.02 & 1.18 $\pm$ 0.09 & 1.92 $\pm$ 0.12 & 17.4 $\pm$ 1.1  \\
IRAS~18236$-$0447 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.67 $\pm$ 0.03 & 1.40 $\pm$ 0.10 & 2.70 $\pm$ 0.17 & 2.73 $\pm$ 0.19 \\
IRAS~18355$-$0712 &0.0416 $\pm$ 0.0019&0.0689 $\pm$ 0.0019&0.1011 $\pm$ 0.0021&0.227 $\pm$ 0.004  & & ~0.27 $\pm$ 0.01 & 1.55 $\pm$ 0.08 & 3.86 $\pm$ 0.24 &  9.4 $\pm$ 0.6  \\
IRAS~18361$-$1203 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~1.57 $\pm$ 0.06 & 2.63 $\pm$ 0.15 & 3.29 $\pm$ 0.21 & 4.31 $\pm$ 0.27 \\
IRAS~18434$-$0042 &0.0078 $\pm$ 0.0004&0.0113 $\pm$ 0.0007&0.0266 $\pm$ 0.0010&0.1249 $\pm$ 0.0031& & ~0.14 $\pm$ 0.01 & 0.62 $\pm$ 0.07 & 1.48 $\pm$ 0.10 & 2.81 $\pm$ 0.18 \\
IRAS~18454$+$0001 &0.0105 $\pm$ 0.0004&0.0106 $\pm$ 0.0003&0.0319 $\pm$ 0.0009& 0.099 $\pm$ 0.004 & & ~0.12 $\pm$ 0.01 & 0.41 $\pm$ 0.03 & 1.24 $\pm$ 0.08 &  9.5 $\pm$ 0.6  \\
IRAS~18470$+$0015 & 0.216 $\pm$ 0.009 & 0.447 $\pm$ 0.018 & 0.807 $\pm$ 0.022 &   $\cdots$~~~~~ & & ~2.15 $\pm$ 0.09 & 4.64 $\pm$ 0.23 &  6.1 $\pm$ 0.4  &  8.8 $\pm$ 0.5  \\
IRAS~18485$+$0642 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.99 $\pm$ 0.04 & 3.42 $\pm$ 0.18 &  7.8 $\pm$ 0.5  & 14.9 $\pm$ 0.9  \\
IRAS~18524$+$0544 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.19 $\pm$ 0.01 & $\cdots$~~~~~ & 1.44 $\pm$ 0.10 & 3.43 $\pm$ 0.22 \\
IRAS~18576$+$0341 &   2.3 $\pm$ 0.4   &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & &  10.6 $\pm$ 0.4  & 45.5 $\pm$ 2.3  &   89 $\pm$ 5    &  277 $\pm$ 17   \\
IRAS~19006$+$1022 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.56 $\pm$ 0.02 & $\cdots$~~~~~ & 1.47 $\pm$ 0.10 & 2.93 $\pm$ 0.20 \\
IRAS~19075$+$0432 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~4.51 $\pm$ 0.19 & 5.34 $\pm$ 0.27 &  8.6 $\pm$ 0.5  & 17.0 $\pm$ 1.0  \\
\hline
IRAS~19083$+$0119 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.54 $\pm$ 0.02 & 2.18 $\pm$ 0.13 & 5.08 $\pm$ 0.31 & 11.1 $\pm$ 0.7  \\
IRAS~19094$+$1627 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.32 $\pm$ 0.02 & 0.75 $\pm$ 0.08 & 1.34 $\pm$ 0.10 & 2.40 $\pm$ 0.17 \\
IRAS~19134$+$2131 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~1.22 $\pm$ 0.05 & 5.06 $\pm$ 0.27 &  8.9 $\pm$ 0.5  & 10.1 $\pm$ 0.6  \\
IRAS~19176$+$1251 &0.0071 $\pm$ 0.0003&0.0124 $\pm$ 0.0005&0.0189 $\pm$ 0.0006& 0.162 $\pm$ 0.005 & & ~0.32 $\pm$ 0.01 & 1.13 $\pm$ 0.08 & 2.06 $\pm$ 0.13 &  8.1 $\pm$ 0.5  \\
IRAS~19181$+$1806 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.22 $\pm$ 0.01 & $\cdots$~~~~~ & 0.80 $\pm$ 0.07 & 2.63 $\pm$ 0.18 \\
IRAS~19193$+$1804 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.11 $\pm$ 0.01 & $\cdots$~~~~~ & 1.95 $\pm$ 0.13 & 5.17 $\pm$ 0.32 \\
IRAS~19319$+$2214 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~2.23 $\pm$ 0.09 & 3.52 $\pm$ 0.19 & 4.82 $\pm$ 0.30 & 5.27 $\pm$ 0.33 \\
IRAS~19374$+$2359 & 0.430 $\pm$ 0.011 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & &  13.8 $\pm$ 0.6  &23.72 $\pm$ 1.19 & 33.7 $\pm$ 2.1  &   68 $\pm$ 4    \\
IRAS~20174$+$3222 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.87 $\pm$ 0.04 & 2.81 $\pm$ 0.16 & 3.32 $\pm$ 0.21 & 11.5 $\pm$ 0.7  \\
IRAS~20214$+$3749 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~1.23 $\pm$ 0.05 & 1.93 $\pm$ 0.12 & 2.18 $\pm$ 0.14 & 2.60 $\pm$ 0.18 \\
IRAS~20244$+$3509 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.76 $\pm$ 0.03 & 1.08 $\pm$ 0.09 & 1.53 $\pm$ 0.11 & 3.03 $\pm$ 0.20 \\
IRAS~20461$+$3853 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~0.82 $\pm$ 0.03 & 2.48 $\pm$ 0.14 & 3.01 $\pm$ 0.19 &  6.8 $\pm$ 0.4  \\
IRAS~21525$+$5643 &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ &   $\cdots$~~~~~ & & ~2.28 $\pm$ 0.09 & 5.25 $\pm$ 0.27 &  6.8 $\pm$ 0.4  &  9.9 $\pm$ 0.6  \\
\hline                
\end{tabular}
\end{table}