\begin{table}
%\centering
\par
\caption{X-ray properties of the sources detected by \chandra\ in the ``Daddi field''.}
\small
\begin{tabular}{cccccccccc}
\hline \hline  %[0.1cm]
\multicolumn{1}{c}{XID} & 
\multicolumn{1}{c}{RA} & 
\multicolumn{1}{c}{Dec} & 
\multicolumn{1}{c}{$\theta$} & 
\multicolumn{1}{c}{Counts} &
\multicolumn{1}{c}{Expo} & 
\multicolumn{1}{c}{$F$(0.5--8~keV)} & 
\multicolumn{1}{c}{$F$(0.5--2~keV)} & 
\multicolumn{1}{c}{$F$(2--8~keV)} & 
\multicolumn{1}{c}{$HR$} \\
\multicolumn{1}{c}{} & 
\multicolumn{1}{c}{(deg)} & 
\multicolumn{1}{c}{(deg)} & 
\multicolumn{1}{c}{(\arcmin)} & 
\multicolumn{1}{c}{(0.5--8~keV)} & 
\multicolumn{1}{c}{(ks)} & 
\multicolumn{1}{c}{(\cgs)} &
\multicolumn{1}{c}{(\cgs)} &
\multicolumn{1}{c}{(\cgs)} &
\multicolumn{1}{c}{} \\  [0.1cm]
\hline\noalign{\smallskip} %[0.15cm]
{\phn\phn}1   &    222.123840 & 9.042500  &  9.5 &  39.4  &  22.2 & 1.63E-14  &   6.00E-15    &   1.41E-14    &   $-0.07\pm0.27$  \\ [0.05cm]
{\phn\phn}2   &    222.128250 & 8.998556  &  9.3 &  22.4  &  22.2 & 9.25E-15  &   4.98E-15    & $<$5.29E-15   & $<$$-0.43$          \\ [0.05cm]
{\phn\phn}3   &    222.133453 & 9.063889  &  9.2 &  24.0  &  22.6 & 9.71E-15  &   3.80E-15    &   7.84E-15    &   $-0.14\pm0.36$  \\ [0.05cm]  
{\phn\phn}4   &    222.142288 & 9.018167  &  8.4 &  41.6  &  23.2 & 1.65E-14  &   7.75E-15    &   9.71E-15    &   $-0.38\pm0.24$  \\ [0.05cm]
{\phn\phn}5   &    222.147797 & 9.060167  &  8.3 &  36.6  &  22.1 & 1.52E-14  &   6.36E-15    &   1.11E-14    &   $-0.22\pm0.27$  \\ [0.05cm]
{\phn\phn}6   &    222.169083 & 8.978500  &  8.4 & 105.7  &  33.4 & 2.90E-14  &   1.48E-14    &   1.39E-14    &   $-0.49\pm0.14$  \\ [0.05cm]
{\phn\phn}7   &    222.169205 & 9.075861  &  7.4 &  12.3  &  23.2 & 4.84E-15  & $<$7.96E-16   &   7.47E-15    & $>$$0.53$           \\ [0.05cm]
{\phn\phn}8   &    222.169998 & 8.962806  &  9.0 &  20.9  &  37.2 & 5.14E-15  &   2.13E-15    &   3.83E-15    &   $-0.20\pm0.44$  \\ [0.05cm]
{\phn\phn}9   &    222.176331 & 9.033833  &  6.4 &  19.3  &  22.9 & 7.71E-15  &   4.83E-15    & $<$4.34E-15   & $<-0.52$          \\ [0.05cm]
{\phn}10      &    222.177078 & 9.001167  &  6.5 &   9.6  &  24.7 & 3.56E-15  & $<$7.45E-16   &   5.01E-15    & $>$$0.40$           \\ [0.05cm]
{\phn}11      &    222.184799 & 9.003861  &  6.0 &   8.9  &  25.2 & 3.23E-15  &   1.88E-15    & $<$3.88E-15   & $<$$-0.15$          \\ [0.05cm]
{\phn}12      &    222.186707 & 8.962855  &  8.4 &  17.8  &  40.7 & 4.00E-15  &   1.72E-15    &   2.80E-15    &   $-0.26\pm0.50$  \\ [0.05cm]
{\phn}13      &    222.188461 & 9.083556  &  6.6 &  15.5  &  21.9 & 6.50E-15  &   3.57E-15    & $<$3.17E-15   & $<$$-0.52$          \\ [0.05cm]
{\phn}14      &    222.190536 & 9.141583  &  8.9 &  31.9  &  17.4 & 1.68E-14  &   1.04E-14    & $<$9.81E-15   & $<$$-0.48$          \\ [0.05cm] 
{\phn}15      &    222.194290 & 9.112861  &  7.5 &  31.0  &  24.5 & 1.16E-14  &   4.12E-15    &   1.06E-14    &   $-0.05\pm0.30$  \\ [0.05cm] 
{\phn}16      &    222.210922 & 9.037639  &  4.4 &   5.6  &  26.7 & 1.93E-15  & $<$6.85E-16   & $<$1.99E-15   &                   \\ [0.05cm] 
{\phn}17      &    222.214828 & 8.899639  &  8.8 &  81.5  &  43.9 & 1.70E-14  &   1.29E-15    &   2.84E-14    &   $0.78\pm0.14$   \\ [0.05cm] 
{\phn}18      &    222.217667 & 8.985028  &  6.4 &  16.5  &  44.7 & 3.36E-15  &   1.62E-15    & $<$2.71E-15   & $<$$-0.25$          \\ [0.05cm] 
{\phn}19      &    222.227463 & 8.947083  &  6.6 &  19.2  &  46.6 & 3.77E-15  &   1.60E-15    &   2.72E-15    &   $-0.26\pm0.40$  \\ [0.05cm] 
{\phn}20      &    222.231247 & 8.902083  &  8.1 &  20.6  &  45.1 & 4.19E-15  &   9.26E-16    &   5.38E-15    &   $0.35\pm0.41$   \\ [0.05cm] 
{\phn}21      &    222.233994 & 8.926028  &  7.0 &  79.9  &  47.4 & 1.55E-14  &   6.76E-15    &   1.06E-14    &   $-0.29\pm0.17$  \\ [0.05cm] 
{\phn}22      &    222.235077 & 9.090778  &  4.9 &  15.6  &  23.4 & 6.10E-15  &   2.33E-15    &   5.18E-15    &   $-0.14\pm0.44$  \\ [0.05cm]
{\phn}23      &    222.237701 & 9.022778  &  6.8 & 116.0  &  69.6 & 1.53E-14  &   4.71E-15    &   1.59E-14    &   $0.10\pm0.15$   \\ [0.05cm] 
{\phn}24      &    222.240295 & 9.047250  &  5.1 &   8.5  &  44.6 & 1.75E-15  &   1.09E-15    & $<$2.47E-15   & $<$$-0.11$          \\ [0.05cm] 
{\phn}25      &    222.244080 & 9.129583  &  6.7 &  17.4  &  25.3 & 6.30E-15  &   3.10E-15    & $<$4.12E-15   & $<$$-0.36$          \\ [0.05cm]    
{\phn}26      &    222.247833 & 8.966861  &  5.2 &  86.0  &  48.2 & 1.64E-14  &   7.77E-15    &   9.45E-15    &   $-0.41\pm0.15$  \\ [0.05cm]
{\phn}27      &    222.248123 & 9.127222  &  6.5 &  43.6  &  25.5 & 1.57E-14  &   4.32E-15    &   1.80E-14    &   $0.19\pm0.24$   \\ [0.05cm]
{\phn}28      &    222.249084 & 8.893778  &  7.7 &  18.4  &  36.6 & 4.61E-15  &   1.16E-15    &   5.53E-15    &   $0.26\pm0.42$   \\ [0.05cm]
{\phn}29      &    222.250549 & 9.023861  &  6.4 &  14.2  &  66.2 & 1.97E-15  &   8.25E-16    & $<$2.85E-15   & $<$0.11           \\ [0.05cm]
{\phn}30      &    222.253876 & 8.912417  &  6.8 &  22.6  &  48.8 & 4.24E-15  &   2.06E-15    &   2.32E-15    &   $-0.43\pm0.35$  \\ [0.05cm]
{\phn}31      &    222.262787 & 8.984556  &  5.1 &  24.4  &  59.8 & 3.73E-15  &   1.89E-15    &   1.82E-15    &   $-0.50\pm0.34$  \\ [0.05cm]
{\phn}32      &    222.262878 & 9.025694  &  5.9 &  20.4  &  65.8 & 2.84E-15  &   6.65E-16    &   3.57E-15    &   $0.31\pm0.40$   \\ [0.05cm]
{\phn}33      &    222.263046 & 9.069306  &  5.5 &   9.4  &  51.3 & 1.68E-15  & $<$7.90E-16   &   2.64E-15    & $>$$0.07$           \\ [0.05cm]
{\phn}34      &    222.263214 & 9.043528  &  6.2 &  55.8  &  60.9 & 8.38E-15  &   3.67E-15    &   5.76E-15    &   $-0.28\pm0.22$  \\ [0.05cm]
{\phn}35      &    222.265961 & 8.882333  &  7.9 &  26.7  &  38.7 & 6.32E-15  &   3.36E-15    &   2.66E-15    &   $-0.56\pm0.32$  \\ [0.05cm]
{\phn}36      &    222.268753 & 9.060694  &  6.4 & 129.7  &  70.9 & 1.68E-14  &   7.57E-15    &   1.08E-14    &   $-0.33\pm0.13$  \\ [0.05cm]
{\phn}37      &    222.273209 & 9.097361  &  6.0 &  19.9  &  40.1 & 4.54E-15  &   2.00E-15    &   3.07E-15    &   $-0.30\pm0.39$  \\ [0.05cm]
{\phn}38      &    222.274124 & 9.018278  &  5.0 &  32.8  &  76.9 & 3.90E-15  &   2.15E-15    &   1.40E-15    &   $-0.63\pm0.28$  \\ [0.05cm]
{\phn}39      &    222.277084 & 9.043833  &  5.6 & 254.3  &  70.6 & 3.30E-14  &   1.62E-14    &   1.76E-14    &   $-0.45\pm0.09$  \\ [0.05cm]
{\phn}40      &    222.277878 & 9.035528  &  6.3 &  56.2  &  58.5 & 8.79E-15  &   4.56E-15    &   4.00E-15    &   $-0.53\pm0.20$  \\ [0.05cm]
{\phn}41      &    222.284210 & 8.854389  &  8.8 &  28.7  &  41.2 & 6.38E-15  &   1.65E-15    &   7.46E-15    &   $0.25\pm0.33$   \\ [0.05cm]
{\phn}42      &    222.285797 & 8.895667  &  7.1 &  16.7  &  34.1 & 4.49E-15  &   1.67E-15    &   3.90E-15    &   $-0.10\pm0.44$  \\ [0.05cm]
{\phn}43      &    222.288589 & 8.925778  &  5.2 &  10.5  &  47.9 & 2.01E-15  &   9.77E-16    & $<$1.47E-15   & $<$$-0.31$          \\ [0.05cm]
{\phn}44      &    222.290375 & 8.978639  &  4.9 &  83.4  &  76.7 & 9.96E-15  &   4.74E-15    &   5.73E-15    &   $-0.41\pm0.16$  \\ [0.05cm]
{\phn}45      &    222.291122 & 8.870472  &  8.0 & 180.3  &  38.4 & 4.30E-14  &   1.64E-14    &   3.59E-14    &   $-0.12\pm0.11$  \\ [0.05cm]
{\phn}46      &    222.292206 & 8.947667  &  4.2 & 132.4  &  50.5 & 2.40E-14  &   1.54E-14    &   1.99E-15    &   $-0.92\pm0.06$  \\ [0.05cm]
{\phn}47      &    222.293457 & 9.050139  &  6.5 &  12.5  &  54.7 & 2.08E-15  & $<$6.97E-16   &   3.58E-15    & $>$$0.28$           \\ [0.05cm]
{\phn}48      &    222.298370 & 9.002167  &  5.2 &   5.4  &  49.6 & 1.00E-15  &   6.98E-16    & $<$1.66E-15   & $<$$-0.09$          \\ [0.05cm]
{\phn}49      &    222.299667 & 8.932222  &  4.7 &  13.0  &  43.2 & 2.77E-15  &   1.38E-15    & $<$1.63E-15   & $<$$-0.42$          \\ [0.05cm]
{\phn}50      &    222.305252 & 9.020639  &  4.4 &  10.1  &  80.2 & 1.15E-15  &   4.76E-16    & $<$1.31E-15   & $<$$-0.02$          \\ [0.05cm]
{\phn}51      &    222.309830 & 8.853306  &  7.0 &  46.8  &  24.8 & 1.73E-14  &   8.05E-15    &   1.04E-14    &   $-0.37\pm0.22$  \\ [0.05cm]
{\phn}52      &    222.310379 & 8.939861  &  4.5 &  10.1  &  52.7 & 1.75E-15  &   1.10E-15    & $<$1.74E-15   & $<$$-0.29$          \\ %[0.05cm]
\hline
{\phn}53      &    222.310455 & 8.961611  &  4.9 &  13.0  &  74.4 & 1.60E-15  & $<$4.11E-16   &   2.28E-15    & $>$$0.31$           \\ [0.05cm]
{\phn}54      &    222.311172 & 9.137444  &  8.6 &  20.3  &  42.8 & 4.34E-15  &   1.85E-15    &   3.10E-15    &   $-0.24\pm0.45$  \\ [0.05cm]
{\phn}55      &    222.311874 & 9.127639  &  8.3 &  11.1  &  46.3 & 2.20E-15  &   1.14E-15    & $<$3.43E-15   & $<$$0.06$           \\ [0.05cm]
{\phn}56      &    222.313416 & 8.872611  &  7.4 &  65.5  &  46.2 & 1.30E-14  &   4.21E-15    &   1.30E-14    &   $0.05\pm0.20$   \\ [0.05cm]
{\phn}57      &    222.313416 & 9.012250  &  4.1 &  25.7  &  73.9 & 3.19E-15  &   1.71E-15    &   1.29E-15    &   $-0.59\pm0.31$  \\ [0.05cm]
{\phn}58      &    222.317245 & 9.102750  &  7.2 &  17.5  &  66.2 & 2.42E-15  &   1.05E-15    & $<$3.11E-15   & $<$$0.04$           \\ [0.05cm]
{\phn}59      &    222.319458 & 9.095917  &  7.1 &  28.4  &  72.2 & 3.60E-15  &   6.78E-16    &   4.99E-15    &   $0.45\pm0.31$   \\ [0.05cm]
{\phn}60      &    222.319702 & 9.032389  &  4.5 &  34.9  &  78.2 & 4.09E-15  &   1.60E-15    &   3.35E-15    &   $-0.16\pm0.28$  \\ [0.05cm]
{\phn}61      &    222.322952 & 8.994083  &  4.1 &  10.6  &  77.8 & 1.25E-15  & $<$4.39E-16   &   2.17E-15    & $>$$0.25$           \\ [0.05cm]
{\phn}62      &    222.324493 & 9.036972  &  4.6 &  36.4  &  77.9 & 4.27E-15  &   1.27E-15    &   4.68E-15    &   $0.12\pm0.27$   \\ [0.05cm]
{\phn}63      &    222.328293 & 8.853472  &  6.7 &  28.6  &  23.5 & 1.12E-14  &   5.18E-15    &   6.79E-15    &   $-0.37\pm0.30$  \\ [0.05cm]
{\phn}64      &    222.333252 & 8.986194  &  4.0 &  11.5  &  77.7 & 1.35E-15  &   7.43E-16    & $<$1.57E-15   & $<$$-0.15$          \\ [0.05cm]
{\phn}65      &    222.333328 & 9.136556  &  8.9 &  10.5  &  54.5 & 1.76E-15  & $<$8.02E-16   &   1.95E-15    & $>$$-0.06$          \\ [0.05cm]
{\phn}66      &    222.333923 & 8.944556  &  4.7 &  70.2  &  70.0 & 9.18E-15  &   3.36E-15    &   8.21E-15    &   $-0.09\pm0.19$  \\ [0.05cm]
{\phn}67      &    222.337250 & 8.964194  &  4.5 &  10.4  &  60.5 & 1.58E-15  & $<$5.05E-16   &   1.84E-15    & $>$$0.11$           \\ [0.05cm]
{\phn}68      &    222.341919 & 9.116611  &  7.9 &  34.1  &  67.4 & 4.64E-15  &   1.79E-15    &   3.83E-15    &   $-0.13\pm0.31$  \\ [0.05cm]
{\phn}69      &    222.344254 & 8.866611  &  5.7 &   7.3  &  25.8 & 2.58E-15  & $<$1.18E-15   & $<$2.04E-15   &                   \\ [0.05cm]
{\phn}70      &    222.345673 & 9.039556  &  4.6 &   8.7  &  76.9 & 1.04E-15  & $<$3.49E-16   &   1.90E-15    & $>$$0.30$           \\ [0.05cm]
{\phn}71      &    222.351044 & 8.835861  &  7.5 &  18.9  &  22.2 & 7.78E-15  &   4.56E-15    & $<$6.02E-15   & $<$$-0.35$          \\ [0.05cm]
{\phn}72      &    222.351868 & 8.993889  &  4.0 & 371.8  &  76.3 & 4.46E-14  &   2.19E-14    &   2.38E-14    &   $-0.46\pm0.07$  \\ [0.05cm]
{\phn}73      &    222.354004 & 8.941389  &  4.7 &  29.8  &  74.8 & 3.64E-15  &   9.23E-16    &   4.46E-15    &   $0.25\pm0.30$   \\ [0.05cm]
{\phn}74      &    222.355118 & 8.987278  &  3.9 &  44.7  &  77.6 & 5.27E-15  &   2.90E-15    &   1.88E-15    &   $-0.64\pm0.20$  \\ [0.05cm]
{\phn}75      &    222.356873 & 8.973278  &  3.8 &  69.9  &  74.7 & 8.57E-15  &   3.74E-15    &   5.90E-15    &   $-0.30\pm0.18$  \\ [0.05cm]
{\phn}76      &    222.359833 & 8.903028  &  5.7 &  87.9  &  49.5 & 1.63E-14  &   6.33E-15    &   1.34E-14    &   $-0.15\pm0.17$  \\ [0.05cm]
{\phn}77      &    222.360703 & 8.991722  &  3.8 &   6.8  &  81.3 & 7.66E-16  & $<$2.25E-16   &   9.24E-16    & $>$$0.16$           \\ [0.05cm]
{\phn}78      &    222.360840 & 8.971000  &  3.7 &  25.8  &  77.4 & 3.05E-15  &   1.85E-15    & $<$1.77E-15   & $<$$-0.50$          \\ [0.05cm]
{\phn}79      &    222.360916 & 8.935917  &  5.0 &  27.4  &  73.3 & 3.42E-15  &   1.38E-15    &   2.68E-15    &   $-0.20\pm0.33$  \\ [0.05cm]
{\phn}80      &    222.363464 & 9.049944  &  5.0 &   9.6  &  74.6 & 1.18E-15  & $<$3.61E-16   &   2.15E-15    & $>$$0.34$           \\ [0.05cm]
{\phn}81      &    222.366379 & 9.068861  &  5.7 &  10.3  &  75.3 & 1.25E-15  &   9.34E-16    & $<$8.79E-16   & $<$$-0.50$          \\ [0.05cm]
{\phn}82      &    222.366455 & 8.944361  &  5.5 & 200.2  &  59.0 & 3.11E-14  &   1.30E-14    &   2.29E-14    &   $-0.24\pm0.10$  \\ [0.05cm]
{\phn}83      &    222.369370 & 8.804972  &  9.4 &  50.1  &  20.7 & 2.22E-14  &   5.79E-15    &   2.56E-14    &   $0.24\pm0.22$   \\ [0.05cm]
{\phn}84      &    222.371368 & 8.814944  &  8.8 &  14.3  &  22.6 & 5.81E-15  &   2.99E-15    & $<$7.06E-15   & $<$$-0.06$          \\ [0.05cm]
{\phn}85      &    222.372208 & 9.079472  &  6.3 &  35.6  &  60.4 & 5.40E-15  &   2.71E-15    &   2.70E-15    &   $-0.48\pm0.26$  \\ [0.05cm]
{\phn}86      &    222.374298 & 8.966694  &  3.8 &  10.3  &  66.4 & 1.42E-15  & $<$5.52E-16   & $<$1.59E-15   &                   \\ [0.05cm]
{\phn}87      &    222.376877 & 8.993111  &  4.0 &   8.5  &  77.0 & 1.01E-15  &   4.44E-16    & $<$9.13E-16   & $<$$-0.16$          \\ [0.05cm]
{\phn}88      &    222.382050 & 8.992194  &  4.0 &  13.5  &  77.5 & 1.59E-15  &   8.27E-16    & $<$9.06E-16   & $<$$-0.44$          \\ [0.05cm]
{\phn}89      &    222.386246 & 8.872472  &  5.7 &  13.1  &  25.6 & 4.69E-15  &   1.86E-15    &   3.75E-15    &   $-0.18\pm0.49$  \\ [0.05cm]
{\phn}90      &    222.392044 & 8.882361  &  6.9 &  75.9  &  43.6 & 1.59E-14  &   7.35E-15    &   9.86E-15    &   $-0.36\pm0.17$  \\ [0.05cm]
{\phn}91      &    222.392090 & 9.049778  &  5.0 &  17.8  &  77.8 & 2.09E-15  &   3.42E-16    &   3.08E-15    &   $0.52\pm0.39$   \\ [0.05cm]
{\phn}92      &    222.396042 & 9.087750  &  6.6 &  15.7  &  70.4 & 2.05E-15  &   1.04E-15    & $<$2.47E-15   & $<$$-0.08$          \\ [0.05cm]
{\phn}93      &    222.396500 & 9.008444  &  4.3 & 238.9  &  77.2 & 2.83E-14  &   1.33E-14    &   1.68E-14    &   $-0.39\pm0.09$  \\ [0.05cm]
{\phn}94      &    222.396835 & 9.060028  &  5.7 &  30.5  &  70.6 & 3.95E-15  &   1.60E-15    &   3.07E-15    &   $-0.19\pm0.30$  \\ [0.05cm]
{\phn}95      &    222.398087 & 9.012417  &  4.4 &  34.8  &  77.2 & 4.12E-15  &   2.26E-15    &   1.52E-15    &   $-0.62\pm0.25$  \\ [0.05cm]
{\phn}96      &    222.399750 & 9.030722  &  4.5 &  30.9  &  63.1 & 4.48E-15  &   1.80E-15    &   3.54E-15    &   $-0.19\pm0.30$  \\ [0.05cm]
{\phn}97      &    222.401077 & 8.891778  &  6.5 &  24.0  &  44.4 & 4.95E-15  & $<$5.53E-16   &   8.33E-15    & $>$$0.68$           \\ [0.05cm]
{\phn}98      &    222.401382 & 8.854250  &  7.0 &   8.7  &  22.3 & 3.57E-15  & $<$8.29E-16   &   4.68E-15    & $>$$0.33$           \\ [0.05cm]
{\phn}99      &    222.402206 & 9.080778  &  6.4 &  18.7  &  76.0 & 2.25E-15  &   4.95E-16    &   2.91E-15    &   $0.35\pm0.40$   \\ [0.05cm]
100           &    222.402206 & 9.141528  &  7.3 & 258.9  &  23.1 & 1.03E-13  &   4.89E-14    &   5.90E-14    &   $-0.40\pm0.09$  \\ [0.05cm]
101           &    222.402588 & 9.135417  &  6.9 &  41.1  &  25.6 & 1.47E-14  &   5.20E-15    &   1.35E-14    &   $-0.04\pm0.25$  \\ [0.05cm]
102           &    222.404160 & 9.073222  &  6.1 &  15.1  &  72.5 & 1.91E-15  &   1.10E-15    & $<$1.88E-15   & $<$$-0.24$          \\ [0.05cm]
103           &    222.406876 & 9.055667  &  5.2 & 236.8  &  72.3 & 3.00E-14  &   1.37E-14    &   1.89E-14    &   $-0.35\pm0.09$  \\ [0.05cm]
104           &    222.411285 & 9.133194  &  6.7 &  25.6  &  24.3 & 9.66E-15  &   3.75E-15    &   7.97E-15    &   $-0.14\pm0.33$  \\ [0.05cm]
105           &    222.419876 & 8.877861  &  7.5 &  31.6  &  43.5 & 6.65E-15  &   2.50E-15    &   5.69E-15    &   $-0.10\pm0.31$  \\ [0.05cm]
106           &    222.420868 & 9.037028  &  5.7 &  85.8  &  62.2 & 1.26E-14  &   5.42E-15    &   8.94E-15    &   $-0.26\pm0.16$  \\ [0.05cm]
107           &    222.423752 & 8.922472  &  5.4 & 130.3  &  49.7 & 2.40E-14  &   7.03E-15    &   2.65E-14    &   $0.13\pm0.13$   \\ [0.05cm]
108           &    222.429993 & 8.889306  &  7.3 &  29.0  &  35.0 & 7.58E-15  &   3.94E-15    &   3.41E-15    &   $-0.53\pm0.30$  \\ %[0.05cm]
\hline
109           &    222.432129 & 9.099889  &  4.5 &  16.7  &  22.8 & 6.70E-15  &   3.49E-15    & $<$3.10E-15   & $<$$-0.53$          \\ [0.05cm]
110           &    222.433624 & 8.998611  &  5.0 &  10.1  &  75.0 & 1.24E-15  &   6.81E-16    & $<$1.85E-15   & $<$$-0.01$          \\ [0.05cm]
111           &    222.435333 & 8.979750  &  3.8 &  14.3  &  53.3 & 2.46E-15  & $<$2.29E-16   &   4.22E-15    & $>$$0.72$           \\ [0.05cm]
112           &    222.436493 & 8.990611  &  4.6 & 398.0  &  59.6 & 6.12E-14  &   2.88E-14    &   3.62E-14    &   $-0.39\pm0.07$  \\ [0.05cm]
113           &    222.446289 & 8.906417  &  6.7 & 189.1  &  44.7 & 3.88E-14  &   1.73E-14    &   2.56E-14    &   $-0.31\pm0.10$  \\ [0.05cm]
114           &    222.449036 & 8.961111  &  4.8 &  11.9  &  51.4 & 2.13E-15  &   6.90E-16    &   2.16E-15    &   $0.04\pm0.53$   \\ [0.05cm]
115           &    222.449921 & 8.990222  &  4.0 &   9.2  &  54.2 & 1.56E-15  & $<$3.38E-16   &   3.12E-15    & $>$$0.52$           \\ [0.05cm]
116           &    222.451797 & 8.999694  &  3.9 &  33.0  &  53.1 & 5.70E-15  &   1.25E-15    &   7.53E-15    &   $0.35\pm0.27$   \\ [0.05cm]
117           &    222.453247 & 8.981194  &  4.2 & 110.9  &  50.4 & 2.02E-14  &   9.02E-15    &   1.33E-14    &   $-0.33\pm0.14$  \\ [0.05cm]
118           &    222.455078 & 8.911806  &  6.8 &  12.2  &  45.2 & 2.48E-15  &   1.40E-15    & $<$2.78E-15   & $<$$-0.16$          \\ [0.05cm]
119           &    222.455215 & 9.031222  &  5.7 &  56.6  &  74.3 & 6.97E-15  &   2.47E-15    &   6.36E-15    &   $-0.04\pm0.22$  \\ [0.05cm]
120           &    222.455826 & 8.934750  &  5.9 &   9.0  &  50.8 & 1.62E-15  &   7.71E-16    & $<$2.71E-15   & $<$$0.11$           \\ [0.05cm]
121           &    222.461044 & 9.083861  &  3.8 &   4.7  &  26.0 & 1.66E-15  & $<$9.39E-16   & $<$3.13E-15   &                   \\ [0.05cm]
122           &    222.462250 & 9.025194  &  6.0 &  18.1  &  73.5 & 2.25E-15  &   8.17E-16    &   2.00E-15    &   $-0.06\pm0.48$  \\ [0.05cm]
123           &    222.462372 & 8.878500  &  8.9 &  47.6  &  20.3 & 2.14E-14  &   8.14E-15    &   1.79E-14    &   $-0.10\pm0.24$  \\ [0.05cm]
124           &    222.466049 & 8.887278  &  8.3 &  31.9  &  30.8 & 9.48E-15  &   2.87E-15    &   9.99E-15    &   $0.12\pm0.30$   \\ [0.05cm]
125           &    222.480576 & 9.088806  &  4.6 &   4.8  &   9.3 & 4.76E-15  & $<$1.97E-15   &   9.36E-15    & $>$$0.24$           \\ [0.05cm]
126           &    222.485123 & 9.011889  &  5.3 &  70.0  &  44.8 & 1.43E-14  &   7.28E-15    &   6.89E-15    &   $-0.50\pm0.17$  \\ [0.05cm]
127           &    222.487000 & 9.073972  &  4.2 &   7.7  &  27.4 & 2.56E-15  & $<$8.92E-16   & $<$2.57E-15   &                   \\ [0.05cm]
128           &    222.487045 & 8.943139  &  6.8 &  24.1  &  48.9 & 4.52E-15  &   1.93E-15    &   3.22E-15    &   $-0.25\pm0.36$  \\ [0.05cm]
129           &    222.489670 & 9.038917  &  3.2 &  39.8  &  27.3 & 1.33E-14  &   6.52E-15    &   7.16E-15    &   $-0.45\pm0.23$  \\ [0.05cm]
130           &    222.494003 & 8.986694  &  6.2 & 143.8  &  48.1 & 2.74E-14  &   1.28E-14    &   1.64E-14    &   $-0.37\pm0.12$  \\ [0.05cm]
131           &    222.495285 & 9.018000  &  5.9 &  53.4  &  48.1 & 1.02E-14  &   5.35E-15    &   4.41E-15    &   $-0.55\pm0.19$  \\ [0.05cm]
132           &    222.496750 & 8.995306  &  6.3 &  16.0  &  46.3 & 3.17E-15  &   1.48E-15    & $<$2.96E-15   & $<$$-0.15$          \\ [0.05cm]
133           &    222.528961 & 8.990222  &  7.9 & 405.6  &  46.3 & 8.02E-14  &   4.09E-14    &   3.90E-14    &   $-0.48\pm0.07$  \\ [0.05cm]
134           &    222.539291 & 9.110583  &  7.9 &  14.7  &  23.9 & 5.64E-15  &   2.52E-15    & $<$4.94E-15   & $<$$-0.16$          \\ [0.05cm]
135           &    222.553131 & 9.052889  &  7.1 &  18.5  &  20.8 & 8.14E-15  &   4.07E-15    & $<$4.92E-15   & $<$$-0.38$          \\ [0.05cm]
136           &    222.567291 & 8.994028  &  7.9 & 236.7  &  23.2 & 9.35E-14  &   4.92E-14    &   4.13E-14    &   $-0.53\pm0.08$  \\ [0.05cm]
137           &    222.587585 & 9.026056  &  8.9 &   9.2  &  22.3 & 3.78E-15  &   1.92E-15    & $<$5.99E-15   & $<$$0.09$           \\ [0.05cm]
138           &    222.612335 & 9.036944  & 10.4 &  18.7  &  20.9 & 8.16E-15  &   4.10E-15    &   4.18E-15    &   $-0.43\pm0.47$  \\ [0.05cm]
\hline  
\end{tabular}
%\end{table}