\begin{table}%t2
\caption{\label{SMA_lines}Integrated SMA CO($J=2{-}1$) and $^{13}$CO($J=2{-}1$) lines \mbox{parameters}.}
\par
\small%\centering
\par
\begin{tabular}{ccccc}
\hline \hline
Line & Flux$_{\rm peak}$ & {\it FWHM} & $V_{\rm LSR}$ & Integrated flux\\
~&[Jy] & [km~s$^{-1}$] & [km~s$^{-1}$] & [Jy km~s$^{-1}$]\\
(1)&(2)&(3)&(4)\\
\hline
&&&& \\[-8pt]
$^{12}$CO($J=2{-}1$) & 3.5 & 48 & 846 & 178.4 $\pm$ 1.6\\
$^{13}$CO($J=2{-}1$) & ${\la}0.3$ & -- & -- & ${\la}12$\\
\hline
\end{tabular}
\end{table}