\begin{table}%t5
\caption{\label{tab3dlin}Lines used to test the granulation effects.}
\par
%\centering
\small
\begin{tabular}{rcc}
\hline
\hline
Species & $\lambda$  & $\chi$ \\
        &  nm        & eV   \\
\hline
CH           & 430.0317 & 0.00 \\
CH           & 430.0587 & 0.36 \\
CH           & 430.1072 & 1.44 \\
CH           & 430.1135 & 0.31 \\
\ion{Si}{i}  & 390.5523 & 1.91 \\ 
\ion{Si}{i}  & 410.2916 & 1.91 \\ 
\ion{Sc}{ii} & 424.6822 & 0.31 \\
\ion{Ti}{ii} & 376.1323 & 0.57 \\
\ion{Ti}{ii} & 391.3468 & 1.12 \\ 
\ion{Cr}{i}  & 425.4332 & 0.00  \\
\ion{Cr}{i}  & 520.8419 & 0.94 \\  
\ion{Mn}{i}  & 403.0753 & 0.00 \\
\ion{Mn}{i}  & 404.1355 & 2.11 \\ 
\ion{Fe}{i}  & 382.4444 & 0.00 \\
\ion{Fe}{i}  & 400.5242 & 1.56 \\
\ion{Fe}{i}  & 418.7795 & 2.42 \\
\ion{Fe}{i}  & 422.7427 & 3.33 \\
\ion{Co}{i}  & 384.5461 & 0.92 \\ 
\ion{Zn}{i}  & 481.0528 & 4.08 \\
\hline
\end{tabular}
\end{table}