\begin{table}%t3
\caption{\label{tab:linefluxes}Properties of rotational water lines, and calculated line fluxes $F_L=\int (F_\nu-F_\nu^{\rm cont})~{\rm d}\nu$ for different line transfer methods.}
%\centerline
 {\tiny 
\par\begin{tabular}{clccc|ccrc}
\hline\hline\noalign{\smallskip}
Carrier  & Transition & $\lambda~[\mu$m] & $A_{\rm ul}~[{\rm s}^{-1}]$& $E_u{\rm [K]}$ & LTE & ES & MC   & $|$ES-MC$|$ \\
\hline
o-H$_2$O & $1_{10}$$~\to~$$1_{01}$ & 538.29 & 0.0035 & 61  
    & 0.702 & 0.531 & 0.538  &  2\%\\
o-H$_2$O & $4_{23}$$~\to~$$3_{12}$$^\star$ 
                                           & 180.49 & 0.0306 & 194 
                           & 9.27  & 2.32   & 3.39 & 37\%\\
o-H$_2$O & $2_{12}$$~\to~$$1_{01}$$^\star$ 
                                           & 179.53 & 0.0559 & 114 
                           & 11.9  & 7.69   & 8.59 & 11\%\\
o-H$_2$O & $3_{03}$$~\to~$$2_{12}$ & 174.63 & 0.0505 & 197 
                           & 12.7  & 7.47   & 8.88 & 17\%\\
o-H$_2$O & $2_{12}$$~\to~$$1_{10}$ & 108.07 & 0.256  & 194 
                           & 54.8  & 11.4   & 17.9& 44\%\\
o-H$_2$O & $4_{23}$$~\to~$$3_{12}$$^\star$ 
                                           & \ 78.74 & 0.484  & 432 
                           & 94.5   & 24.6  & 35.9 & 37\%\\\hline
p-H$_2$O & $2_{02}$$~\to~$$1_{11}$ & 303.46 & 0.0058 & 101 
                           & 1.27  & 1.48   & 1.40       &  5\%\\
p-H$_2$O & $1_{11}$$~\to~$$0_{00}$ & 269.27 & 0.0184 & 53  
                           & 2.40  & 2.22   & 2.09       &  6\%\\
p-H$_2$O & $4_{13}$$~\to~$$3_{22}$$^\star$
                                           & 144.52 & 0.0332 & 397 
                           & 5.53  & 4.57   & 4.15 &  9\%\\
p-H$_2$O & $3_{13}$$~\to~$$2_{02}$ & 138.53 & 0.125  & 204 
                           & 14.3  & 7.76   & 8.71 & 12\%\\
p-H$_2$O & $2_{20}$$~\to~$$1_{11}$ & 100.98 & 0.260  & 196 
                           & 32.5  & 8.66   & 10.9 & 23\%\\
p-H$_2$O & $3_{22}$$~\to~$$2_{11}$$^\star$
                                           & \ 89.99 & 0.352  & 297 
                           & 48.0  & 10.2   & 14.0 & 31\%\\
\hline
\end{tabular}}
\medskip
Listed line fluxes are
in units $10^{-18}$~W/m$^2$ for distance 140~pc and inclination $30^\circ$. $^\star$ Indicates that this  line will be observed by the Herschel OT Key Programme {\sc
  gasps}. ES~=~escape probability, MC~=~Monte Carlo.
\end{table}