\begin{table}%t1
%\centering
\par
    \caption{\label{table2}Initial parameters of the five  generic models.}
        \begin{tabular}{llccccc}
    \hline
    \hline
  dSph &  \# &  $r_{\rm{c}}$  & $f_{\rm{b}}$ & $c_\star$ & $\rho_{\rm{c,tot}}$  & $M_{\rm{tot}}$ \\
   &   &  $[\rm{kpc}]$       &              &           & $[10^8~ {M_\odot/\rm kpc^3}]$   & $[10^8~ {M_\odot}]$ \\
    \hline
Carina   &   $533$ & 0.5 & 0.20 & 0.100 & 1.20e-03 & 2.73     \\
Leo II   &   $587$ & 1.0 & 0.15 & 0.050 & 4.00e-04 & 3.29     \\
Sextans  &   $590$ & 0.5 & 0.15 & 0.050 & 1.60e-03 & 3.64     \\
Sculptor &   $630$ & 1.0 & 0.20 & 0.035 & 5.00e-04 & 4.12     \\
Fornax   &   $575$ & 1.0 & 0.15 & 0.200 & 6.66e-04 & 5.48     \\
%
    \hline
    \end{tabular}
\end{table}