\begin{table}%t1
\caption{\label{Tab:1}Relevant parameters of the imaging dataset.}
\small%\centerline
 {
\begin{tabular}{l c c c c c c c}
\hline\hline
Band & $\lambda_{\rm eff}$ & $\Delta\lambda$ & Exposure-time & Scale &
$\sigma_{\rm arcsec^{2}}$ & $\sigma_{\rm back}$ & \FWHM \\
     & \AA & \AA & s & $''$/pix & \magarcsq & \magarcsq & $''$\\ 
\hline                    
   \NUV$^{a}$ & 2250 & 1000  & $\sim$1700  &  1.5  & 27.4 & 31.0 & 5\\
   \us          & 3540 &  570  & 54          & 0.396 & 24.8 & 27.7 & 1.6\\
   $g'^{b}$   & 4770 & 1370  & $''$ 	     &   $''$  & 25.7 & 28.6 & 1.5\\
   $r'$           & 6230 & 1370  & $''$	         &   $''$  & 25.2 & 28.1 & 1.4\\
\hline                  
 \bb$^{c}$    & 4320 &  690  & 7200        &  0.03 & 29.8 & 29.1 & 0.09\\
 \vv            & 5920 & 1580  & 3040	     &   $''$  & 29.7 & 29.0 & $''$\\
 \ii$^{d}$    & 7690 & 1020  & 3040	     &   $''$  & 29.0 & 28.3 & $''$\\
 \zz$^{e}$    & 9050 & 1270  & 6280	     &   $''$  & 28.6 & 27.9 & $''$\\
\hline
\end{tabular}}
\medskip
$^{a}$ \NUVrest\ at $z\sim0$;
$^{b}$ \Brest\ at $z\sim0$;
$^{c}$ \NUVrest\ within \midz\ (mid-$z$) and \farz\ (far-$z$);
$^{d}$ \Brest\ within \midz;
$^{e}$ \Brest\ within \mbox{\farz}.
\end{table}