\begin{table}%t2
\caption{\label{prog_stars}Program stars, observed and derived parameters.}
%\centering
\small
\begin{tabular}{r|l|rc|clcc|r}
\hline
\hline
%&&&&&&&& \\[-8pt]
 HD & SpT/LC & $\lambda_1$ & $D$ & $E(B-V)$ & $T^f_{\rm eff}\pm\Delta T_{\rm eff}$ & $\theta^f\pm\Delta\theta$ & $\gamma$ & $T_{\rm eff}(\lambda_1, D)$\\
    &        &             & dex & mag      & \ \ \ \ \ \ \ K  & mas & & K \ \ \ \ \\
\hline
    358 & B5.5V     &  58.0 & 0.288 & 0.023 & 12~750 $\pm$ $ 590$ & 1.016 $\pm$ $0.010$ & 1.00  & 14~580 \ \ \ \ \\
    886 & B2IV      &  54.0 & 0.155 & 0.007 & 21~870 $\pm$ $1390$ & 0.444 $\pm$ $0.021$ & 1.00  & 22~740 \ \ \ \ \\
   2905 & B1Ia      &  31.0 & 0.070 & 0.339 & 22~160 $\pm$ $1420$ & 0.348 $\pm$ $0.021$ & 1.13  & 21~330 \ \ \ \ \\
   3360 & B2IV      &  54.0 & 0.161 & 0.031 & 21~850 $\pm$ $1390$ & 0.307 $\pm$ $0.021$ & 1.00  & 22~220 \ \ \ \ \\
   3369 & B5V       &  54.0 & 0.259 & 0.046 & 15~980 $\pm$ $ 910$ & 0.305 $\pm$ $0.015$ & 1.00  & 16~030 \ \ \ \ \\
   4142 & B5.5V     &  59.0 & 0.283 & 0.044 & 16~430 $\pm$ $ 940$ & 0.162 $\pm$ $0.015$ & 1.00  & 14~720 \ \ \ \ \\
   4727 & B4V       &  58.0 & 0.249 & 0.029 & 16~290 $\pm$ $ 930$ & 0.266 $\pm$ $0.015$ & 1.00  & 16~460 \ \ \ \ \\
  11241 & B2V       &  65.0 & 0.162 & 0.066 & 22~080 $\pm$ $1410$ & 0.141 $\pm$ $0.021$ & 1.00  & 22~420 \ \ \ \ \\
  12~767 & B5V       &  55.1 & 0.279 & 0.000 & 13~250 $\pm$ $ 640$ & 0.281 $\pm$ $0.011$ & 1.00  & 15~000 \ \ \ \ \\
  12~953 & A2Ia      &  -1.0 & 0.231 & 0.599 & \ \ 9750 $\pm$ $ 330$ & 0.591 $\pm$ $0.007$ & 1.58 &9940 \ \ \ \ \\
  13~267 & B6Ia      &  16.0 & 0.155 & 0.490 & 14~380 $\pm$ $ 760$ & 0.259 $\pm$ $0.012$ & 0.76  & 13~460 \ \ \ \ \\
  14~055 & A1V       &  71.0 & 0.471 & 0.019 & \ \ 9440 $\pm$ $ 310$ & 0.540 $\pm$ $0.007$ & 1.00 &9840 \ \ \ \ \\
  14~228 & B6V       &  61.7 & 0.296 & 0.015 & 12~470 $\pm$ $ 560$ & 0.507 $\pm$ $0.010$ & 1.00  & 14~150 \ \ \ \ \\
  14~489 & A0Ib      &  11.0 & 0.310 & 0.420 & \ \ 9840 $\pm$ $ 340$ & 0.549 $\pm$ $0.007$ & 2.04&10~650 \ \ \ \ \\
  14~818 & B2Ib-Ia   &  31.0 & 0.086 & 0.496 & 18~300 $\pm$ $1100$ & 0.202 $\pm$ $0.018$ & 1.32  & 20~260 \ \ \ \ \\
  15~130 & A0.5IV    &  52.8 & 0.490 & 0.019 & \ \ 9920 $\pm$ $ 350$ & 0.346 $\pm$ $0.008$ & 1.00&10~040 \ \ \ \ \\
  15~318 & B9.5V     &  61.9 & 0.440 & 0.020 & 10~630 $\pm$ $ 400$ & 0.421 $\pm$ $0.008$ & 1.00  & 10~700 \ \ \ \ \\
  16~046 & A0IV      &  56.4 & 0.448 & 0.021 & 10~910 $\pm$ $ 420$ & 0.314 $\pm$ $0.008$ & 1.00  & 10~730 \ \ \ \ \\
  16~582 & B2IV      &  52.6 & 0.154 & 0.020 & 23~160 $\pm$ $1500$ & 0.239 $\pm$ $0.022$ & 1.00  & 22~610 \ \ \ \ \\
  16~908 & B4V       &  54.0 & 0.231 & 0.046 & 17~520 $\pm$ $1030$ & 0.243 $\pm$ $0.017$ & 1.00  & 17~430 \ \ \ \ \\
  17~081 & B6IV      &  46.0 & 0.311 & 0.016 & 13~680 $\pm$ $ 680$ & 0.344 $\pm$ $0.011$ & 1.00  & 14~150 \ \ \ \ \\
  17~573 & B7V       &  54.0 & 0.339 & 0.014 & 12~980 $\pm$ $ 610$ & 0.476 $\pm$ $0.010$ & 1.00  & 12~950 \ \ \ \ \\
  18~604 & B6V-IV    &  50.4 & 0.301 & 0.033 & 13~940 $\pm$ $ 710$ & 0.286 $\pm$ $0.011$ & 1.00  & 14~380 \ \ \ \ \\
  19~356 & B7V       &  60.0 & 0.324 & 0.047 & 12~800 $\pm$ $ 590$ & 1.033 $\pm$ $0.010$ & 1.00  & 13~240 \ \ \ \ \\
  20~041 & A0Ia      &  10.0 & 0.276 & 0.816 & 10~800 $\pm$ $ 420$ & 0.643 $\pm$ $0.008$ & 2.02  & 10~980 \ \ \ \ \\
  21~291 & B9Ia      &   9.0 & 0.213 & 0.495 & 11~420 $\pm$ $ 470$ & 0.794 $\pm$ $0.009$ & 1.28  & 11~640 \ \ \ \ \\
  21~364 & B7.5V     &  64.8 & 0.337 & 0.044 & 13~070 $\pm$ $ 620$ & 0.473 $\pm$ $0.010$ & 1.00  & 12~510 \ \ \ \ \\
  21~389 & A0Ia      &   4.0 & 0.233 & 0.633 & 11~040 $\pm$ $ 440$ & 0.886 $\pm$ $0.009$ & 1.22  & 10~860 \ \ \ \ \\
  21~447 & A1V       &  72.0 & 0.466 & 0.026 & \ \ 9240 $\pm$ $ 300$ & 0.337 $\pm$ $0.007$ & 1.00 &9890 \ \ \ \ \\
  21~790 & B9IV      &  45.8 & 0.408 & 0.017 & 11~760 $\pm$ $ 500$ & 0.317 $\pm$ $0.009$ & 1.00  & 11~610 \ \ \ \ \\
  21~856 & B1IV      &  57.0 & 0.116 & 0.183 & 25~370 $\pm$ $1670$ & 0.124 $\pm$ $0.023$ & 1.00  & 27~200 \ \ \ \ \\
  22~928 & B5III     &  42.0 & 0.281 & 0.044 & 14~890 $\pm$ $ 820$ & 0.583 $\pm$ $0.013$ & 1.00  & 15~100 \ \ \ \ \\
  22~951 & B1V       &  62.0 & 0.112 & 0.253 & 29~330 $\pm$ $1980$ & 0.183 $\pm$ $0.024$ & 1.00  & 27~990 \ \ \ \ \\
  23~180 & B1III     &  49.0 & 0.121 & 0.267 & 22~840 $\pm$ $1470$ & 0.384 $\pm$ $0.021$ & 0.97  & 24~190 \ \ \ \ \\
  23~227 & B4.5III   &  43.4 & 0.247 & 0.019 & 16~230 $\pm$ $ 930$ & 0.215 $\pm$ $0.015$ & 1.00  & 16~470 \ \ \ \ \\
  23~288 & B7V       &  56.0 & 0.329 & 0.117 & 14~020 $\pm$ $ 720$ & 0.224 $\pm$ $0.011$ & 1.00  & 13~220 \ \ \ \ \\
  23~324 & B7V       &  56.0 & 0.334 & 0.061 & 13~210 $\pm$ $ 640$ & 0.201 $\pm$ $0.010$ & 1.00  & 13~050 \ \ \ \ \\
  23~338 & B6IV      &  46.0 & 0.296 & 0.059 & 14~180 $\pm$ $ 740$ & 0.351 $\pm$ $0.011$ & 1.00  & 14~650 \ \ \ \ \\
  23~408 & B6.5III   &  38.5 & 0.313 & 0.129 & 14~310 $\pm$ $ 750$ & 0.464 $\pm$ $0.011$ & 1.00  & 13~960 \ \ \ \ \\
  23~625 & B2V       &  59.0 & 0.175 & 0.294 & 23~980 $\pm$ $1560$ & 0.114 $\pm$ $0.022$ & 1.00  & 21~350 \ \ \ \ \\
  23~753 & B7IV      &  50.0 & 0.350 & 0.065 & 12~680 $\pm$ $ 580$ & 0.228 $\pm$ $0.010$ & 1.00  & 12~740 \ \ \ \ \\
  23~850 & B7III     &  39.0 & 0.339 & 0.086 & 13~020 $\pm$ $ 620$ & 0.526 $\pm$ $0.010$ & 1.00  & 13~240 \ \ \ \ \\
  23~923 & B9V       &  58.0 & 0.411 & 0.054 & 11~640 $\pm$ $ 490$ & 0.170 $\pm$ $0.009$ & 1.00  & 11~350 \ \ \ \ \\
  24~131 & B1V       &  61.0 & 0.124 & 0.265 & 29~130 $\pm$ $1960$ & 0.132 $\pm$ $0.024$ & 1.00  & 26~670 \ \ \ \ \\
  24~398 & B1Ib      &  37.0 & 0.085 & 0.328 & 22~040 $\pm$ $1410$ & 0.659 $\pm$ $0.021$ & 0.98  & 22~580 \ \ \ \ \\
  24~431 & O9.5III   &  54.0 & 0.077 & 0.653 & 27~370 $\pm$ $1830$ & 0.155 $\pm$ $0.023$ & 1.41  & 31~380 \ \ \ \ \\
  24~760 & B0IV-III  &  54.5 & 0.089 & 0.086 & 27~160 $\pm$ $1810$ & 0.394 $\pm$ $0.023$ & 1.00  & 29~810 \ \ \ \ \\
  25~204 & B4IV      &  50.1 & 0.243 & 0.050 & 16~970 $\pm$ $ 990$ & 0.447 $\pm$ $0.016$ & 1.00  & 16~829 \ \ \ \ \\
  25~490 & $>$A1V    &  74.0 & 0.496 & 0.007 & \ \ 8990 $\pm$ $280$ & 0.605 $\pm$ $0.007$ & 1.00 & 9300 \ \ \ \ \\
  27~376 & B6V       &  61.5 & 0.303 & 0.012 & 12~460 $\pm$ $ 560$ & 0.522 $\pm$ $0.010$ & 1.00  & 13~910 \ \ \ \ \\
  27~396 & B4IV      &  51.0 & 0.240 & 0.146 & 16~720 $\pm$ $ 970$ & 0.267 $\pm$ $0.016$ & 1.00  & 16~960 \ \ \ \ \\
  27~962 & A1V       &  71.0 & 0.463 & 0.000 & \ \ 8680 $\pm$ $ 260$ & 0.515 $\pm$ $0.008$ & 1.00 &9970 \ \ \ \ \\
  29~248 & B2IV      &  51.2 & 0.144 & 0.048 & 23~610 $\pm$ $1530$ & 0.262 $\pm$ $0.022$ & 1.00  & 23~120 \ \ \ \ \\
  29~305 & B7V       &  61.3 & 0.328 & 0.021 & 12~120 $\pm$ $ 530$ & 0.603 $\pm$ $0.010$ & 1.00  & 13~030 \ \ \ \ \\
  30~211 & B4IV      &  45.0 & 0.248 & 0.024 & 15~770 $\pm$ $ 890$ & 0.346 $\pm$ $0.015$ & 1.00  & 16~510 \ \ \ \ \\
  30~614 & B0.5Ia    &  32.0 & 0.057 & 0.277 & 25~340 $\pm$ $1670$ & 0.274 $\pm$ $0.023$ & 0.95  & 22~620 \ \ \ \ \\
  31~647 & A1V       &  76.0 & 0.455 & 0.032 & \ \ 9750 $\pm$ $ 330$ & 0.346 $\pm$ $0.007$ & 1.00 &9950 \ \ \ \ \\
  32~309 & B9V       &  63.0 & 0.425 & 0.018 & 10~800 $\pm$ $ 420$ & 0.315 $\pm$ $0.008$ & 1.00  & 10~960 \ \ \ \ \\
  32~549 & B9IV      &  45.1 & 0.438 & 0.000 & \ \ 9520 $\pm$ $ 320$ & 0.392 $\pm$ $0.007$ & 1.00&11~040 \ \ \ \ \\
  32~630 & B4V       &  59.0 & 0.232 & 0.020 & 17~940 $\pm$ $1070$ & 0.460 $\pm$ $0.017$ & 1.00  & 17~390 \ \ \ \ \\
  33~802 & B6V       &  59.5 & 0.299 & 0.028 & 13~280 $\pm$ $ 640$ & 0.336 $\pm$ $0.011$ & 1.00  & 14~140 \ \ \ \ \\
  33~904 & B7IV      &  49.6 & 0.331 & 0.015 & 12~390 $\pm$ $ 550$ & 0.590 $\pm$ $0.010$ & 1.00  & 13~390 \ \ \ \ \\
  33~949 & B7III     &  41.3 & 0.358 & 0.033 & 12~750 $\pm$ $ 590$ & 0.358 $\pm$ $0.010$ & 1.00  & 12~710 \ \ \ \ \\
  34~085 & B8Ia      &  12.0 & 0.177 & 0.058 & 12~130 $\pm$ $ 530$ & 2.713 $\pm$ $0.010$ & 1.18  & 12~330 \ \ \ \ \\
\hline
  34~503 & B6IV      &  44.8 & 0.303 & 0.045 & 14~450 $\pm$ $ 770$ & 0.470 $\pm$ $0.012$ & 1.00  & 14~440 \ \ \ \ \\
  35~468 & B2III     &  49.0 & 0.146 & 0.023 & 21~840 $\pm$ $1390$ & 0.775 $\pm$ $0.021$ & 1.00  & 22~530 \ \ \ \ \\
  35~497 & B5.5IV    &  44.0 & 0.288 & 0.022 & 13~960 $\pm$ $ 710$ & 1.116 $\pm$ $0.011$ & 1.00  & 14~910 \ \ \ \ \\
  35~600 & A0Ib      &  18.0 & 0.375 & 0.288 & 10~870 $\pm$ $ 420$ & 0.324 $\pm$ $0.008$ & 0.69  & 10~260 \ \ \ \ \\
  36~267 & B5V       &  60.9 & 0.257 & 0.020 & 16~020 $\pm$ $ 910$ & 0.314 $\pm$ $0.015$ & 1.00  & 15~930 \ \ \ \ \\
  36~371 & B5Ia      &  15.0 & 0.129 & 0.471 & 15~370 $\pm$ $ 860$ & 0.476 $\pm$ $0.014$ & 1.17  & 14~060 \ \ \ \ \\
  36~512 & O8-9V     &  68.1 & 0.079 & 0.029 & 32~340 $\pm$ $2220$ & 0.142 $\pm$ $0.025$ & 1.00  & 32~060 \ \ \ \ \\
  36~822 & B0IV      &  55.0 & 0.095 & 0.111 & 28~340 $\pm$ $1900$ & 0.198 $\pm$ $0.024$ & 1.00  & 29~330 \ \ \ \ \\
  37~128 & B0Ib      &  39.1 & 0.060 & 0.059 & 24~670 $\pm$ $1620$ & 0.681 $\pm$ $0.022$ & 1.16  & 24~440 \ \ \ \ \\
  37~468 & O9.5V     &  71.0 & 0.082 & 0.061 & 31~270 $\pm$ $2130$ & 0.230 $\pm$ $0.025$ & 1.00  & 31~420 \ \ \ \ \\
  37~481 & B2V       &  61.0 & 0.142 & 0.035 & 24~350 $\pm$ $1590$ & 0.101 $\pm$ $0.022$ & 1.00  & 24~700 \ \ \ \ \\
  37~744 & B2V       &  65.0 & 0.141 & 0.057 & 25~690 $\pm$ $1700$ & 0.088 $\pm$ $0.023$ & 1.00  & 25~000 \ \ \ \ \\
  38~666 & O8-9V     &  66.5 & 0.072 & 0.017 & 31~510 $\pm$ $2150$ & 0.111 $\pm$ $0.025$ & 1.00  & 33~170 \ \ \ \ \\
  38~771 & B0II      &  46.0 & 0.081 & 0.057 & 23~170 $\pm$ $1500$ & 0.620 $\pm$ $0.022$ & 1.00  & 26~730 \ \ \ \ \\
  39~970 & B9Ib-Ia   &  12.0 & 0.261 & 0.487 & 11~530 $\pm$ $ 480$ & 0.349 $\pm$ $0.009$ & 1.51  & 11~250 \ \ \ \ \\
  40~111 & B1Ib      &  38.0 & 0.084 & 0.183 & 24~660 $\pm$ $1620$ & 0.197 $\pm$ $0.022$ & 1.22  & 22~950 \ \ \ \ \\
  40~183 & A1V       &  69.0 & 0.485 & 0.012 & \ \ 8910 $\pm$ $ 280$ & 1.506 $\pm$ $0.007$ & 1.00 &9680 \ \ \ \ \\
  40~312 & B9IV      &  47.0 & 0.448 & 0.000 & \ \ 9890 $\pm$ $ 340$ & 0.959 $\pm$ $0.008$ & 1.00&10~850 \ \ \ \ \\
  40~589 & B9Ib      &  12.0 & 0.284 & 0.378 & 11~660 $\pm$ $ 490$ & 0.295 $\pm$ $0.009$ & 1.33  & 10~970 \ \ \ \ \\
  41~117 & B2Ia      &  24.0 & 0.050 & 0.494 & 20~740 $\pm$ $1310$ & 0.371 $\pm$ $0.020$ & 1.53  & 20~640 \ \ \ \ \\
  41~753 & B4V       &  55.0 & 0.229 & 0.032 & 18~800 $\pm$ $1140$ & 0.251 $\pm$ $0.018$ & 1.00  & 17~560 \ \ \ \ \\
  42~087 & B3Ia      &  25.0 & 0.102 & 0.384 & 16~460 $\pm$ $ 940$ & 0.258 $\pm$ $0.015$ & 1.18  & 17~440 \ \ \ \ \\
  43~112 & B1V       &  58.0 & 0.117 & 0.032 & 27~900 $\pm$ $1870$ & 0.091 $\pm$ $0.024$ & 1.00  & 27~190 \ \ \ \ \\
  43~384 & B4Ia      &  20.0 & 0.125 & 0.621 & 14~780 $\pm$ $ 800$ & 0.304 $\pm$ $0.013$ & 1.38  & 15~140 \ \ \ \ \\
  44~743 & B1III     &  45.0 & 0.112 & 0.036 & 25~320 $\pm$ $1670$ & 0.586 $\pm$ $0.023$ & 1.00  & 23~690 \ \ \ \ \\
  46~300 & A1Ib      &  17.0 & 0.421 & 0.083 & \ \ 9800 $\pm$ $ 340$ & 0.455 $\pm$ $0.007$ & 1.00 &9740 \ \ \ \ \\
  46~769 & B7III-II  &  30.0 & 0.288 & 0.151 & 13~930 $\pm$ $ 710$ & 0.210 $\pm$ $0.011$ & 0.45  & 12~990 \ \ \ \ \\
  47~105 & A1.5IV    &  61.0 & 0.518 & 0.001 & \ \ 9040 $\pm$ $ 280$ & 1.435 $\pm$ $0.007$ & 1.00 &9280 \ \ \ \ \\
  47~240 & B1Ib      &  35.0 & 0.090 & 0.372 & 21~540 $\pm$ $1370$ & 0.157 $\pm$ $0.021$ & 1.33  & 21~670 \ \ \ \ \\
  47~432 & O8-9Ib    &  43.0 & 0.050 & 0.389 & 25~620 $\pm$ $1690$ & 0.133 $\pm$ $0.023$ & 1.77  & 28~550 \ \ \ \ \\
  47~670 & B7III     &  33.0 & 0.331 & 0.014 & 12~120 $\pm$ $ 530$ & 0.625 $\pm$ $0.010$ & 1.09  & 12~760 \ \ \ \ \\
  47~964 & B7IV-III  &  42.0 & 0.347 & 0.021 & 12~100 $\pm$ $ 530$ & 0.193 $\pm$ $0.009$ & 1.00  & 13~040 \ \ \ \ \\
  48~434 & B0II      &  44.0 & 0.072 & 0.241 & 25~290 $\pm$ $1670$ & 0.128 $\pm$ $0.023$ & 1.87  & 26~770 \ \ \ \ \\
  48~977 & B3V       &  60.0 & 0.210 & 0.039 & 19~590 $\pm$ $1210$ & 0.125 $\pm$ $0.019$ & 1.00  & 18~820 \ \ \ \ \\
  49~567 & B4III     &  37.0 & 0.209 & 0.051 & 17~270 $\pm$ $1010$ & 0.125 $\pm$ $0.016$ & 1.11  & 17~110 \ \ \ \ \\
  52~089 & B1III     &  45.0 & 0.120 & 0.034 & 22~010 $\pm$ $1400$ & 0.801 $\pm$ $0.021$ & 1.30  & 23~240 \ \ \ \ \\
  53~138 & B4Ia      &  22.0 & 0.130 & 0.038 & 14~920 $\pm$ $ 820$ & 0.580 $\pm$ $0.013$ & 1.00  & 15~620 \ \ \ \ \\
  53~244 & B6III     &  41.9 & 0.289 & 0.033 & 13~690 $\pm$ $ 690$ & 0.378 $\pm$ $0.011$ & 1.00  & 14~830 \ \ \ \ \\
  58~350 & B5Ia      &  19.0 & 0.152 & 0.012 & 12~670 $\pm$ $ 580$ & 0.882 $\pm$ $0.010$ & 1.00  & 14~180 \ \ \ \ \\
  66~811 & O6-7III   &  55.3 & 0.051 & 0.043 & 37~250 $\pm$ $2630$ & 0.371 $\pm$ $0.027$ & 1.00  & 36~630 \ \ \ \ \\
  67~797 & B4IV      &  50.9 & 0.251 & 0.028 & 16~680 $\pm$ $ 960$ & 0.280 $\pm$ $0.016$ & 1.00  & 16~450 \ \ \ \ \\
  68~520 & B5IV      &  46.0 & 0.287 & 0.022 & 14~090 $\pm$ $ 730$ & 0.326 $\pm$ $0.011$ & 1.00  & 14~950 \ \ \ \ \\
  71~155 & A1V       &  74.0 & 0.467 & 0.025 & 10~060 $\pm$ $ 360$ & 0.538 $\pm$ $0.008$ & 1.00  &  9800 \ \ \ \ \\
  74~280 & B2IV-V    &  53.3 & 0.189 & 0.019 & 19~410 $\pm$ $1200$ & 0.254 $\pm$ $0.019$ & 1.00  & 20~080 \ \ \ \ \\
  77~327 & A1III     &  47.0 & 0.509 & 0.008 & \ \ 9080 $\pm$ $ 290$ & 0.691 $\pm$ $0.007$ & 1.00 &9790 \ \ \ \ \\
  79~447 & B3IV      &  50.5 & 0.220 & 0.015 & 17~250 $\pm$ $1010$ & 0.333 $\pm$ $0.016$ & 1.00  & 18~010 \ \ \ \ \\
  79~469 & A0V       &  63.7 & 0.441 & 0.023 & 10~980 $\pm$ $ 430$ & 0.490 $\pm$ $0.009$ & 1.00  & 10~630 \ \ \ \ \\
  83~754 & B5V       &  59.1 & 0.253 & 0.024 & 16~150 $\pm$ $ 920$ & 0.211 $\pm$ $0.015$ & 1.00  & 16~220 \ \ \ \ \\
  83~944 & B9V       &  66.2 & 0.410 & 0.006 & 11~550 $\pm$ $ 480$ & 0.335 $\pm$ $0.009$ & 1.00  & 11~150 \ \ \ \ \\
  86~440 & B6II      &  25.0 & 0.232 & 0.049 & 13~980 $\pm$ $ 720$ & 0.493 $\pm$ $0.011$ & 1.18  & 13~650 \ \ \ \ \\
  87~737 & A0Ib      &  18.0 & 0.411 & 0.053 & \ \ 9820 $\pm$ $ 340$ & 0.685 $\pm$ $0.007$ & 1.00 &9900 \ \ \ \ \\
  89~021 & A1V       &  64.0 & 0.488 & 0.006 & \ \ 8790 $\pm$ $ 270$ & 0.754 $\pm$ $0.007$ & 1.00 &9730 \ \ \ \ \\
  91~316 & B1.5Ib    &  34.8 & 0.094 & 0.056 & 19~830 $\pm$ $1230$ & 0.312 $\pm$ $0.020$ & 1.21  & 21~370 \ \ \ \ \\
  95~418 & $>$A1V    &  70.0 & 0.496 & 0.004 & \ \ 9470 $\pm$ $ 310$ & 1.112 $\pm$ $0.007$ & 1.00 &9480 \ \ \ \ \\
  97~633 & $>$A1V    &  67.0 & 0.510 & 0.022 & \ \ 9180 $\pm$ $ 290$ & 0.772 $\pm$ $0.007$ & 1.00 &9280 \ \ \ \ \\
  98~664 & B9IV      &  54.4 & 0.438 & 0.023 & 10~680 $\pm$ $ 410$ & 0.466 $\pm$ $0.008$ & 1.00  & 10~970 \ \ \ \ \\
  98~718 & B5V       &  60.1 & 0.261 & 0.014 & 16~760 $\pm$ $ 970$ & 0.346 $\pm$ $0.016$ & 1.00  & 15~730 \ \ \ \ \\
 100~600 & B3V       &  58.0 & 0.218 & 0.033 & 18~230 $\pm$ $1090$ & 0.129 $\pm$ $0.018$ & 1.00  & 18~280 \ \ \ \ \\
 100~841 & A1III     &  34.6 & 0.518 & 0.020 & \ \ 9880 $\pm$ $ 340$ & 0.768 $\pm$ $0.008$ & 1.00 &9720 \ \ \ \ \\
 100~889 & B9V       &  57.2 & 0.435 & 0.021 & 11~280 $\pm$ $ 460$ & 0.334 $\pm$ $0.009$ & 1.00  & 10~940 \ \ \ \ \\
 106~625 & B7IV      &  49.4 & 0.348 & 0.009 & 12~360 $\pm$ $ 550$ & 0.799 $\pm$ $0.010$ & 1.00  & 12~820 \ \ \ \ \\
 106~911 & B4V       &  58.2 & 0.238 & 0.026 & 15~330 $\pm$ $ 850$ & 0.321 $\pm$ $0.014$ & 1.00  & 17~060 \ \ \ \ \\
 108~767 & A0.5V     &  71.0 & 0.448 & 0.020 & 10~580 $\pm$ $ 400$ & 0.777 $\pm$ $0.008$ & 1.00  & 10~270 \ \ \ \ \\
 109~026 & B4V       &  58.9 & 0.227 & 0.027 & 16~740 $\pm$ $ 970$ & 0.357 $\pm$ $0.016$ & 1.00  & 17~700 \ \ \ \ \\
\hline
 111~123 & B1IV      &  54.3 & 0.125 & 0.041 & 27~030 $\pm$ $1800$ & 0.780 $\pm$ $0.023$ & 1.00  & 25~740 \ \ \ \ \\
 112~185 & A1IV      &  58.0 & 0.511 & 0.000 & \ \ 9240 $\pm$ $ 300$ & 1.504 $\pm$ $0.007$ & 1.00 &9530 \ \ \ \ \\
 112~413 & B7V       &  59.0 & 0.335 & 0.021 & 11~630 $\pm$ $ 490$ & 0.718 $\pm$ $0.009$ & 1.00  & 12~890 \ \ \ \ \\
 116~656 & A1V       &  67.0 & 0.470 & 0.033 & \ \ 9340 $\pm$ $ 300$ & 1.361 $\pm$ $0.007$ & 1.00 &9980 \ \ \ \ \\
 120~315 & B4V       &  61.0 & 0.227 & 0.015 & 17~870 $\pm$ $1060$ & 0.832 $\pm$ $0.017$ & 1.00  & 17~710 \ \ \ \ \\
 123~299 & A0IV      &  53.0 & 0.482 & 0.025 & 10~430 $\pm$ $ 390$ & 0.571 $\pm$ $0.008$ & 1.00  & 10~190 \ \ \ \ \\
 129~056 & B2IV      &  47.8 & 0.145 & 0.041 & 23~100 $\pm$ $1490$ & 0.537 $\pm$ $0.022$ & 1.00  & 22~380 \ \ \ \ \\
 129~246 & $>$A1V    &  79.0 & 0.488 & 0.000 & \ \ 8990 $\pm$ $ 280$ & 0.611 $\pm$ $0.007$ & 1.00 &9220 \ \ \ \ \\
 132~058 & B2IV      &  52.1 & 0.148 & 0.024 & 24~090 $\pm$ $1570$ & 0.436 $\pm$ $0.022$ & 1.00  & 23~000 \ \ \ \ \\
 135~742 & B7.5IV    &  44.0 & 0.363 & 0.022 & 12~300 $\pm$ $ 550$ & 0.801 $\pm$ $0.010$ & 1.00  & 12~500 \ \ \ \ \\
 137~422 & $>$A2III  &  35.0 & 0.562 & 0.022 & \ \ 8280 $\pm$ $ 240$ & 1.022 $\pm$ $0.009$ & 0.48 &9110 \ \ \ \ \\
 139~006 & A1V       &  69.0 & 0.476 & 0.026 & \ \ 9900 $\pm$ $ 340$ & 1.175 $\pm$ $0.008$ & 1.00 &9820 \ \ \ \ \\
 141~003 & A1V       &  69.0 & 0.479 & 0.018 & \ \ 8810 $\pm$ $ 270$ & 0.682 $\pm$ $0.007$ & 1.00 &9770 \ \ \ \ \\
 144~217 & B1V       &  65.5 & 0.115 & 0.210 & 30~540 $\pm$ $2080$ & 0.505 $\pm$ $0.024$ & 1.00  & 27~750 \ \ \ \ \\
 145~389 & B8.5V     &  65.0 & 0.363 & 0.040 & 11~700 $\pm$ $ 490$ & 0.407 $\pm$ $0.009$ & 1.00  & 12~030 \ \ \ \ \\
 147~394 & B5V       &  53.0 & 0.262 & 0.034 & 16~350 $\pm$ $ 940$ & 0.356 $\pm$ $0.015$ & 1.00  & 15~900 \ \ \ \ \\
 148~112 & A0IV      &  57.0 & 0.458 & 0.072 & \ \ 9810 $\pm$ $ 340$ & 0.417 $\pm$ $0.007$ & 1.00&10~520 \ \ \ \ \\
 149~438 & B0IV      &  58.4 & 0.095 & 0.040 & 31~440 $\pm$ $2150$& 0.333 $\pm$ $0.025$ & 1.00  & 29~640 \ \ \ \ \\
 149~881 & B0.5III-II&  45.0 & 0.094 & 0.070 & 23~420 $\pm$ $1520$& 0.063 $\pm$ $0.022$ & 1.35  & 24~720 \ \ \ \ \\
 155~125 & $>$A1V    &  75.0 & 0.478 & 0.000 & \ \ 8620 $\pm$ $ 260$& 1.205 $\pm$ $0.008$ & 1.00 &9570 \ \ \ \ \\
 155~763 & B6IV      &  45.0 & 0.314 & 0.026 & 13~420 $\pm$ $ 660$& 0.586 $\pm$ $0.011$ & 1.00  & 14~080 \ \ \ \ \\
 158~094 & B7V       &  53.4 & 0.343 & 0.020 & 12~360 $\pm$ $ 550$ & 0.508 $\pm$ $0.010$ & 1.00  & 12~840 \ \ \ \ \\
 159~975 & B8III     &  35.5 & 0.360 & 0.243 & 12~790 $\pm$ $ 590$ & 0.428 $\pm$ $0.010$ & 0.94  & 12~470 \ \ \ \ \\
 160~578 & B1.5III   &  50.1 & 0.131 & 0.033 & 24~720 $\pm$ $1620$ & 0.492 $\pm$ $0.022$ & 1.12  & 23~780 \ \ \ \ \\
 160~762 & B3IV      &  51.0 & 0.211 & 0.036 & 19~100 $\pm$ $1170$ & 0.330 $\pm$ $0.019$ & 1.00  & 18~590 \ \ \ \ \\
 164~353 & B5Ib      &  23.8 & 0.181 & 0.185 & 15~420 $\pm$ $ 860$ & 0.045 $\pm$ $0.014$ & 1.11  & 14~790 \ \ \ \ \\
 166~182 & B2.5III   &  43.0 & 0.174 & 0.074 & 22~420 $\pm$ $1440$ & 0.232 $\pm$ $0.021$ & 1.00  & 19~870 \ \ \ \ \\
 169~022 & A0III     &  45.5 & 0.498 & 0.024 & \ \ 9520 $\pm$ $ 320$ & 1.468 $\pm$ $0.007$ & 1.00 &9960 \ \ \ \ \\
 172~167 & A1V       &  66.0 & 0.489 & 0.000 & \ \ 9470 $\pm$ $ 310$ & 3.292 $\pm$ $0.007$ & 1.00 &9670 \ \ \ \ \\
 173~300 & B7IV      &  44.8 & 0.332 & 0.118 & 14~990 $\pm$ $ 830$ & 0.597 $\pm$ $0.014$ & 1.00  & 13~490 \ \ \ \ \\
 175~191 & B2.5V     &  62.1 & 0.187 & 0.000 & 18~890 $\pm$ $1150$ & 0.711 $\pm$ $0.018$ & 1.00  & 20~370 \ \ \ \ \\
 176~437 & A1III     &  32.0 & 0.493 & 0.040 & 10~000 $\pm$ $ 350$ & 0.740 $\pm$ $0.008$ & 1.00&10~000 \ \ \ \ \\
 177~724 & A1V       &  66.0 & 0.493 & 0.052 & \ \ 9830 $\pm$ $ 340$ & 0.865 $\pm$ $0.007$ & 1.00 &9600 \ \ \ \ \\
 177~756 & B9V       &  58.9 & 0.396 & 0.004 & 11~780 $\pm$ $ 500$ & 0.558 $\pm$ $0.009$ & 1.00  & 11~600 \ \ \ \ \\
 179~761 & B8V-IV    &  52.4 & 0.364 & 0.073 & 13~060 $\pm$ $ 620$ & 0.268 $\pm$ $0.010$ & 1.00  & 12~320 \ \ \ \ \\
 182~255 & B5V       &  56.0 & 0.268 & 0.030 & 15~300 $\pm$ $ 850$ & 0.208 $\pm$ $0.014$ & 1.00  & 15~520 \ \ \ \ \\
 186~882 & A0IV      &  50.0 & 0.479 & 0.031 & 10~150 $\pm$ $ 360$ & 0.858 $\pm$ $0.008$ & 1.00  & 10~280 \ \ \ \ \\
 188~209 & B0Ib      &  42.0 & 0.065 & 0.159 & 25~260 $\pm$ $1670$ & 0.124 $\pm$ $0.023$ & 1.33  & 26~040 \ \ \ \ \\
 191~692 & B9IV      &  52.0 & 0.462 & 0.011 & 10~340 $\pm$ $ 380$ & 0.712 $\pm$ $0.008$ & 1.00  & 10~570 \ \ \ \ \\
 192~425 & A1V       &  77.0 & 0.461 & 0.033 & \ \ 9120 $\pm$ $ 290$ & 0.370 $\pm$ $0.007$ & 1.00 &9810 \ \ \ \ \\
 192~907 & A0V       &  59.0 & 0.451 & 0.023 & 10~500 $\pm$ $ 390$ & 0.408 $\pm$ $0.008$ & 1.00  & 10~570 \ \ \ \ \\
 195~556 & B4II      &  33.0 & 0.204 & 0.128 & 17~680 $\pm$ $1040$ & 0.236 $\pm$ $0.017$ & 1.07  & 16~320 \ \ \ \ \\
 195~810 & B6IV      &  48.0 & 0.303 & 0.032 & 14~540 $\pm$ $ 780$ & 0.370 $\pm$ $0.012$ & 1.00  & 14~370 \ \ \ \ \\
 196~867 & B9IV      &  53.0 & 0.417 & 0.018 & 11~220 $\pm$ $ 450$ & 0.512 $\pm$ $0.009$ & 1.00  & 11~370 \ \ \ \ \\
 197~345 & A2Ia      &   4.0 & 0.366 & 0.056 & \ \ 8720 $\pm$ $ 260$ & 2.255 $\pm$ $0.008$ & 1.70 &8630 \ \ \ \ \\
 198~001 & $>$A1V-IV &  64.0 & 0.529 & 0.021 & \ \ 9370 $\pm$ $ 310$ & 0.612 $\pm$ $0.007$ & 1.00 &8980 \ \ \ \ \\
 198~478 & B4Ia      &  20.0 & 0.109 & 0.562 & 15~390 $\pm$ $ 860$ & 0.517 $\pm$ $0.014$ & 1.21  & 15~880 \ \ \ \ \\
 199~081 & B4V-IV    &  51.0 & 0.248 & 0.028 & 16~180 $\pm$ $ 920$ & 0.240 $\pm$ $0.015$ & 1.00  & 16~590 \ \ \ \ \\
 202~850 & B9.5Ia    &  10.0 & 0.265 & 0.200 & 11~170 $\pm$ $ 450$ & 0.536 $\pm$ $0.009$ & 1.78  & 11~110 \ \ \ \ \\
 204~172 & B0II-Ib   &  42.0 & 0.073 & 0.142 & 24~110 $\pm$ $1570$ & 0.110 $\pm$ $0.022$ & 1.36  & 25~370 \ \ \ \ \\
 205~021 & B1V       &  59.0 & 0.120 & 0.037 & 26~920 $\pm$ $1790$ & 0.312 $\pm$ $0.023$ & 1.00  & 26~960 \ \ \ \ \\
 206~672 & B3III     &  43.0 & 0.208 & 0.089 & 18~360 $\pm$ $1100$ & 0.241 $\pm$ $0.018$ & 1.27  & 18~150 \ \ \ \ \\
 207~260 & A2Ia      &   6.0 & 0.378 & 0.506 & \ \ 8980 $\pm$ $ 280$ & 1.010 $\pm$ $0.007$ & 1.00 &8790 \ \ \ \ \\
 207~330 & B3III     &  44.0 & 0.190 & 0.078 & 17~890 $\pm$ $1060$ & 0.301 $\pm$ $0.017$ & 1.00  & 19~270 \ \ \ \ \\
 207~971 & B7IV      &  47.1 & 0.338 & 0.011 & 12~520 $\pm$ $ 570$ & 0.649 $\pm$ $0.010$ & 1.00  & 13~230 \ \ \ \ \\
 209~481 & O6-7IV    &  57.0 & 0.062 & 0.348 & 30~570 $\pm$ $2080$ & 0.149 $\pm$ $0.024$ & 1.00  & 34~280 \ \ \ \ \\
 209~744 & B1III     &  50.0 & 0.120 & 0.363 & 25~440 $\pm$ $1680$ & 0.112 $\pm$ $0.023$ & 1.00  & 24~510 \ \ \ \ \\
 209~819 & B8V       &  64.3 & 0.348 & 0.020 & 12~310 $\pm$ $ 550$ & 0.376 $\pm$ $0.010$ & 1.00  & 12~320 \ \ \ \ \\
 209~952 & B5V       &  51.7 & 0.282 & 0.013 & 13~920 $\pm$ $ 710$ & 1.084 $\pm$ $0.011$ & 1.00  & 14~990 \ \ \ \ \\
 209~961 & B2IV      &  49.0 & 0.180 & 0.159 & 21~100 $\pm$ $1330$ & 0.119 $\pm$ $0.020$ & 1.00  & 20~420 \ \ \ \ \\
 209~975 & B1Ia      &  32.0 & 0.063 & 0.331 & 24~720 $\pm$ $1620$ & 0.222 $\pm$ $0.022$ & 0.45  & 22~190 \ \ \ \ \\
 210~191 & B4III     &  38.8 & 0.202 & 0.040 & 17~890 $\pm$ $1060$ & 0.140 $\pm$ $0.017$ & 1.08  & 17~750 \ \ \ \ \\
 210~418 & $>$A1V    &  76.0 & 0.480 & 0.033 & \ \ 8840 $\pm$ $ 270$ & 0.747 $\pm$ $0.007$ & 1.00 &9500 \ \ \ \ \\
 212~061 & A0V       &  64.5 & 0.458 & 0.022 & 10~490 $\pm$ $ 390$ & 0.527 $\pm$ $0.008$ & 1.00  & 10~280 \ \ \ \ \\
\hline
 212~120 & B5V       &  55.0 & 0.282 & 0.050 & 15~250 $\pm$ $ 850$ & 0.288 $\pm$ $0.014$ & 1.00  & 14~900 \ \ \ \ \\
 212~593 & B8.5II    &  21.0 & 0.299 & 0.179 & 11~150 $\pm$ $ 440$ & 0.441 $\pm$ $0.009$ & 1.53  & 11~370 \ \ \ \ \\
 212~883 & B2.5IV-III&  48.0 & 0.183 & 0.085 & 20~400 $\pm$ $1280$ & 0.101 $\pm$ $0.020$ & 1.00  & 20~140 \ \ \ \ \\
 212~978 & B2III     &  46.0 & 0.176 & 0.081 & 20~990 $\pm$ $1320$ & 0.113 $\pm$ $0.020$ & 1.00  & 20~360 \ \ \ \ \\
 213~420 & B2III     &  44.0 & 0.167 & 0.131 & 19~750 $\pm$ $1230$ & 0.267 $\pm$ $0.019$ & 1.00  & 20~460 \ \ \ \ \\
 213~558 & A1.5V     &  75.0 & 0.465 & 0.038 & \ \ 9840 $\pm$ $ 340$ & 0.590 $\pm$ $0.007$ & 1.00 &9800 \ \ \ \ \\
 213~976 & B2V       &  64.0 & 0.165 & 0.105 & 22~800 $\pm$ $1470$ & 0.073 $\pm$ $0.021$ & 1.00  & 22~170 \ \ \ \ \\
 213~998 & B9V       &  58.5 & 0.397 & 0.017 & 11~740 $\pm$ $ 500$ & 0.434 $\pm$ $0.009$ & 1.00  & 11~590 \ \ \ \ \\
 214~240 & B5III     &  43.0 & 0.265 & 0.126 & 16~330 $\pm$ $ 930$ & 0.139 $\pm$ $0.015$ & 1.00  & 15~750 \ \ \ \ \\
 214~652 & B2V       &  60.0 & 0.183 & 0.105 & 22~350 $\pm$ $1430$ & 0.081 $\pm$ $0.021$ & 1.00  & 20~730 \ \ \ \ \\
 214~680 & O6-7V     &  65.0 & 0.068 & 0.089 & 32~380 $\pm$ $2220$ & 0.136 $\pm$ $0.025$ & 1.00  & 33~820 \ \ \ \ \\
 214~923 & B9IV      &  50.3 & 0.420 & 0.005 & 11~430 $\pm$ $ 470$ & 0.581 $\pm$ $0.009$ & 1.00  & 11~360 \ \ \ \ \\
 214~993 & B1III     &  49.0 & 0.120 & 0.111 & 24~130 $\pm$ $1570$ & 0.155 $\pm$ $0.022$ & 1.00  & 24~260 \ \ \ \ \\
 214~994 & A0.5V     &  62.0 & 0.477 & 0.050 & \ \ 9930 $\pm$ $ 350$ & 0.364 $\pm$ $0.008$ & 1.00 &9970 \ \ \ \ \\
 215~191 & B2IV      &  52.0 & 0.145 & 0.131 & 22~800 $\pm$ $1470$ & 0.099 $\pm$ $0.021$ & 1.00  & 23~230 \ \ \ \ \\
 217~101 & B2V       &  63.0 & 0.151 & 0.093 & 22~760 $\pm$ $1460$ & 0.107 $\pm$ $0.021$ & 1.00  & 23~700 \ \ \ \ \\
 217~811 & B4III     &  45.0 & 0.225 & 0.217 & 19~330 $\pm$ $1190$ & 0.132 $\pm$ $0.019$ & 1.00  & 17~420 \ \ \ \ \\
 218~045 & A1IV      &  55.0 & 0.500 & 0.021 & \ \ 9850 $\pm$ $ 340$ & 1.036 $\pm$ $0.008$ & 1.00 &9850 \ \ \ \ \\
 218~376 & B0.5III   &  46.0 & 0.095 & 0.244 & 27~100 $\pm$ $1810$ & 0.204 $\pm$ $0.023$ & 1.28  & 25~190 \ \ \ \ \\
 218~407 & B3V       &  60.0 & 0.184 & 0.174 & 21~200 $\pm$ $1340$ & 0.101 $\pm$ $0.020$ & 1.00  & 20~650 \ \ \ \ \\
 219~688 & B5V       &  51.8 & 0.266 & 0.021 & 15~260 $\pm$ $ 850$ & 0.297 $\pm$ $0.014$ & 1.00  & 15~730 \ \ \ \ \\
 222~173 & B8IV      &  44.0 & 0.371 & 0.038 & 12~620 $\pm$ $ 580$ & 0.369 $\pm$ $0.010$ & 1.00  & 12~340 \ \ \ \ \\
 222~661 & B9.5V     &  66.0 & 0.428 & 0.021 & 10~860 $\pm$ $ 420$ & 0.381 $\pm$ $0.008$ & 1.00  & 10~820 \ \ \ \ \\
 223~640 & B6.5V     &  55.9 & 0.321 & 0.000 & 11~740 $\pm$ $ 500$ & 0.260 $\pm$ $0.009$ & 1.00  & 13~510 \ \ \ \ \\
 224~990 & B5V       &  54.2 & 0.259 & 0.032 & 16~100 $\pm$ $ 910$ & 0.215 $\pm$ $0.015$ & 1.00  & 16~030 \ \ \ \ \\
\hline
\end{tabular}
\medskip
The parameter $\lambda_1$ is given as $\lambda_1-3700$~\AA. \\
The notation $>$SpT/LC means that the spectral type is cooler than the indicated one.
\end{table}