\begin{table}%t3
\caption{\label{Phot}Photometry of 2MASS~07495348+0430238 and NLTT~18499, without correction, and with a correction corresponding to \Av~=~0.26 ($R=3.1$; 
IR/Visual~: Fitzpatrick 1999, UV~: Rey et~al. \cite{Rey2007}).}
%\centerline
 {\small \begin{tabular}{llllll}
\hline\hline
     & 2MASS   &             &  &  NLTT   & \\
     & \Av~=~0 & \Av~=~0.26  &  & \Av~=~0 & \Av~=~0.26 \\
\hline
\Ks  & 10.22   & 10.19       &  & 13.58   & 13.55 \\
\textit{H}    & 10.24   & 10.19       &  & 13.74   & 13.69 \\ 
\textit{J}    & 10.50   & 10.43       &  & 14.24   & 14.07 \\
\textit{I}    & 10.94   & 10.81       &  & 15.1    & 15.0  \\
\textit{R}    & 11.6    & 11.4        &  & 16.0    & 15.8  \\
\textit{V}    & 11.6    & 11.4        &  & --      & --    \\
\textit{B}    & 11.7    & 11.4        &  & 17.3    & 17.0  \\
NUV  & 15.57   & 14.82       &  & --      & --    \\
FUV  & 21.4    & 20.7        &  & --      & --    \\
\hline
\end{tabular}}
\medskip
Sources: IR (2MASS), Visual (Tycho-2, USNO-B1.0, Droedge et~al. \cite{Droege2006}), UV (GALEX,  AB system).
\end{table}