\begin{table}%t3
\caption{List of 34 detected sources. The images of most of these sources are shown in Figs.~\ref{fig1}--\ref{fig5}.}
\label{tab3}
%\centering
\par
%
\par
\begin{tabular}{ccccc}
\hline\hline
 Source & Detected  Baseline (M$\lambda$) & Imaged (Y/N) & Peak Flux Density (Jy/beam) & Total Flux Density, $S_{327}$ (Jy) \\
 \hline 
J0204+3649 & 8.0 & Y & 0.337 & 0.481\\
J0319+4130 (3C 84) & 9.0 & Y & 2.289 & 4.625  \\
J0405+3803 & 4.0 & Y & 0.427 & 0.539 \\
J0407-3303 & 9.5 & Y & 0.200 & 0.225 \\
J0418+3801 (3C 111) & 6.0 & Y & 0.328 & 0.533 \\
J0423-0120 & 9.5 & Y & 0.869 & 1.099 \\
J0433+0521 (3C 120) & 9.5 & Y & 1.263 & 1.771 \\
J0542+4951 (3C 147) & 8.0 & Y & 3.850 & 40.980 \\
J0539-2839 & 9.5 & Y & 0.498 & 0.564 \\
J1150-0024 & 9.5 & Y & 2.645 & 3.403 \\
J1230+1223 (3C 274) & 9.5 & Y & 1.199 & 2.154 \\
J1229+0203 (3C 273) & 9.5 & Y & 4.028 & 5.23 \\
J1243+1622 (3C 275.1) & 2.0 & Y & 0.422 & 1.413\\
J1331+3030 (3C 286) & 9.5 & Y & 6.289 & 16.926   \\
J1333+1649 & 6.0 & Y & 0.043 & 0.474 \\
J1512-0905 & 9.5 & Y & 0.480 & 0.611  \\
J1619+2247 & 2.5 & N & -- & -- \\
J1624+2345 (3C 336) &  4.5 &  N & -- & -- \\
J1642+3948 (3C 345) & 9.5 & Y & 2.952 & 3.492 \\
J1746+6226 & 6.5 & Y & 0.038 & 0.131 \\
J1816+3457 & 6.0 & Y & 0.440 & 0.729  \\
J1821+3945 & 5.0 & Y & 1.748 & 3.974 \\
J1829+4844 & 8.0 & Y & 2.948 & 3.880 \\
J1902+3159 (3C 395) & 5.0 & Y & 0.842 & 2.100 \\
J1924+3329 & 2.0 & Y & 0.826 & 0.940  \\
J1959+4044 (Cygnus-A) & 0.3 & N & -- & -- \\
J2005+7752 & 6.0 & Y & 0.508 & 0.602  \\
J2022+6136 & 9.5 & Y & 0.635 & 0.990 \\
J2038+5119 (3C 418) & 4.0 & Y & 1.234 & 3.320 \\
J2202+4216 (BL Lac) & 6.0 & Y & 0.938 & 1.798 \\
J2253+1608 (3C 454.3) & 9.0 & Y & 5.300 & 8.659  \\
J2327+0846 (N7674) & 1.8 & N & -- & -- \\
J2327+0940 & 7.0 & Y & 0.317 & 0.396 \\
J2330+1100 & 9.0 & Y & 0.774 & 0.844 \\
\hline
\end{tabular}
\end{table}