\begin{table}%t3
\caption{\label{photdps}Median values for all the photometric solutions based on three-parameter fits obtained by the ESO DPS~team.}
%\centering
\small
\begin{tabular}{cccc}
\hline
\hline
Passband & $ZP$ & $k$ & $CT$ \\
\hline
$B$ & 24.58 & 0.22 & 0.24 \\
$V$ & 24.23 & 0.19 & $-$0.04 \\
$R$ & 24.49 & 0.08 & $-$0.01 \\
\hline
\end{tabular}
\end{table}