\begin{table}%t3
\caption{\label{tab3}Duration, inclination, $\chi^{2}$~values and limb darkening coefficients from five light curve fits; units for duration and errors are minutes and for inclination and errors are degrees.}
\par
%\centering
\small
\begin{tabular}{lllllll}
\hline\hline
%&&&&&&& \\[-8pt]
$T_{\rm c}$ time [HJD] &  Duration & Errors & Inclin. & Errors & $\chi^{2}$ value & LDL \\
\hline
$3989.7529\pm0.0069$ & 110.308 & 0.432 &  83.59  &  0.019 &  432.1 & S1 \\
$3994.6939\pm0.0066$  & 109.230 & 0.448 &  83.56  &  0.019 &  296.8 & S1\\
$4041.6358\pm0.0070$  & 109.025 & 0.430 &  83.55  &  0.019 &  290.6 & S1\\ 
$4607.4036\pm0.0072$  & 106.620 & 0.883 &  83.44  &  0.036 &  179.1 & S2\\
$4728.4740\pm0.0071$  & 106.112 & 0.870 &  83.43  &  0.036 &  190.1 & S3\\ 
\hline
3989.75286   & 113.275 &        &  83.74  &        &  443.0 & S2 \\
3989.75286   & 111.632 &        &  83.66  &        &  435.6 & S3 \\
3994.69393   & 111.450 &        &  83.65  &        &  305.5 & S2\\
3994.69393   & 110.195 &        &  83.60  &        &  300.1 & S3\\
4041.63579   & 111.790 &        &  83.67  &        &  296.6 & S2\\ 
4041.63579   & 110.197 &        &  83.60  &        &  292.4 & S3\\ 
4607.40356   & 104.317 &        &  83.35  &        &  180.0 & S1\\
4607.40356   & 105.060 &        &  83.38  &        &  179.1 & S3\\
4728.47400   & 104.890 &        &  83.37  &        &  195.7 & S1\\ 
4728.47400   & 107.100 &        &  83.47  &        &  192.6 & S2\\ 
\hline
\end{tabular}
\end{table}