\begin{table}%t1
\caption{\label{tab1}Relative photometry data.}
\small%\centerline
 {
\begin{tabular}{lll}
\hline\hline
 HJD     &  Relative flux & Uncertainty \\
\hline
2~454~607.3512 & 1.001980 & 0.0015717      \\
2~454~607.3528 & 1.002020 & 0.0021024	 \\
2~454~607.3536 & 0.999300 & 0.0014341	 \\
2~454~607.3543 & 1.002150 & 0.0031083	 \\
2~454~607.3551 & 0.999920 & 0.0030757	 \\
2~454~607.3559 & 0.998690 & 0.0030854	 \\
\hline
\end{tabular}}
\medskip
Note: Full Table~\ref{tab1} is only available electronically at the CDS. The time stamps refer to the Heliocentric Julian Date (HJD) at the end of each exposure.
\end{table}