\begin{table}%t1
  \caption {\label{tab1}Log of  the \vlt/\fors\  BVI observations of the Puppis A CCO (RX~ J0822.0$-$4300). }
%\centerline
 {\begin{tabular}{lcccc}   
\hline\hline
yyyy-mm-dd & Filter & $T$ (s) & Seeing    & Airmass	\\ \hline 
2006-11-26 &  $I$ & 2800 & 0.88 & 1.09  \\
2007-03-18 &  $B$ & 2800 & 0.98 & 1.06  \\
2007-03-20 &  $B$ & 5600 & 0.84 & 1.07  \\
           &  $V$ & 2800 & 0.71 & 1.14  \\
2007-03-23 &  $I$ & 8400 & 0.71 & 1.22  \\
2007-03-24 &  $B$ & 2800 & 1.22 & 1.05  \\  
2007-03-25 &  $B$ & 2800 & 0.89 & 1.05  \\        
\hline 
\end{tabular}}
\smallskip
Columns report the observing date, the filter name, the total integration time, the average seeing and airmass in each data set. 
\end{table}