\begin{table}%t6
   \caption {\label{tb:bias}Bias and dark matter halo mass. Errors are 1$\sigma$.}
  %\centerline
 {   \begin{tabular}{lccc}
       \hline\hline
       \noalign{\smallskip}
Band (label)$^a$  &  $\sigma_8$ & $b$ & $\log M_{\rm DMH}$$^b$  \\
       \noalign{\smallskip}
       \hline
      \noalign{\smallskip}
Soft (S1) &   $2.52\pm0.10$  &  $4.82\pm0.18$  & $12.76\pm0.31$  \\
Soft (S2) &   $1.30\pm0.03$  &  $2.48\pm0.07$  & $12.50\pm0.31$   \\
Soft (S3) &   $2.22\pm0.01$  &  $4.24\pm0.02$  & $12.71\pm0.30$  \\
Soft (S4) &   $1.24\pm0.01$  &  $2.37\pm0.01$  & $12.49\pm0.30$   \\
       \noalign{\smallskip}
Hard (H1) &   $2.39\pm0.56$  &  $4.53\pm1.06$  & $12.74\pm0.34$   \\
Hard (H2) &   $1.26\pm0.27$  &  $2.38\pm0.51$  & $12.49\pm0.34$   \\
Hard (H3) &   $2.07\pm0.06$  &  $3.92\pm0.11$  & $12.69\pm0.31$  \\
Hard (H4) &   $1.18\pm0.03$  &  $2.23\pm0.06$  & $12.47\pm0.31$   \\
       \noalign{\smallskip}
Ultrahard (U1) &   $1.81\pm1.70$  &  $3.16\pm2.97$  & $12.66\pm0.44$   \\
Ultrahard (U2) &   $1.22\pm1.08$  &  $2.14\pm1.88 $ & $12.50\pm0.44$   \\
Ultrahard (U3) &   $1.91\pm0.15$  &  $3.34\pm0.26$  & $12.68\pm0.32$  \\
Ultrahard (U4) &   $1.27\pm0.09$  &  $2.23\pm0.16$  & $12.52\pm0.32$   \\
       \hline
        \end{tabular} }
        \smallskip
        {$^a$ Labels are those of the fits in Table~\ref{tb:limber}.}  
        {$^b$ In units of $h^{-1}$~$M_\odot$.}  
\end{table}