\begin{table}%t1
\caption{\label{table:tab1}Outliers of our $z_{\rm phot}-z_{\rm spec}$~comparison (Fig.~\ref{fig:fig2}).}
\small%\centerline
 {
 \begin{tabular}{cccccc}
\hline\hline
%&&&&& \\[-8pt]
id&RA$^{{a}}$&Dec$^{{a}}$&$z_{\rm phot}$&$z_{\rm spec}^{{a}}$&Dist$^{{b}} $\\
%&&&&& \\[-8pt]
\hline
\#6955&12:36:40.510&+62:13:34.90&1.48  &3.826& 0.27\\
\#8734&12:36:37.630&+62:14:53.70&0.68  &4.886& 0.16\\
\#8903&12:37:21.048&+62:15:01.73&0.98  &4.762& 0.41\\
\hline
\end{tabular}}
\medskip
$^{{a}}$ The coordinates and the spectroscopic redshifts are from NED database; 
$^{{b}}$ distance (arcsec) between our coordinates (from \spi\ data set) and the NED position.
\end{table}