\begin{table}%t9
\caption{\label{ 48271}HD  48271.}
%\centering
\small
\begin{tabular}{rrrrrrrrrr}
 \hline\hline
 HD 48271 & & &  $U$ & $B1$ & $B$ & $B2$ & $V1$ & $V$ & $G$ \\ 
 \hline
 & Mean magnitudes: &  &     8.2670 &     7.8668 &     6.9094 &     8.3160 &     8.1995 &     7.4807 &     8.5860 \\ 
 & Errors:          &  &     0.0009 &     0.0011 &     0.0011 &     0.0011 &     0.0009 &     0.0009 &     0.0008 \\ 
 \hline
 & Amplitude errors: &  &     0.0013 &     0.0016 &     0.0016 &     0.0015 &     0.0013 &     0.0013 &     0.0012 \\ 
 \hline
 &&&&&&&&& \\[-8pt]
 HD 48271 & Frequency (${\rm d}^{-1}$) & Period($d$) &  $U$ & $B1$ & $B$ & $B2$ & $V1$ & $V$ & $G$ \\ 
 \hline
 $f_1$      &      0.91236 &      1.09606 &     0.0206 &     0.0288 &     0.0278 &     0.0272 &     0.0212 &     0.0211 &     0.0190 \\ 
 Errors      &      0.00004 &      0.00005 \\ 
 & Amplitude ratios: & &       0.71 &       1.00 &       0.96 &       0.94 &       0.74 &       0.73 &       0.66 \\ 
 & Errors:           & &       0.06 &       0.08 &       0.08 &       0.07 &       0.06 &       0.06 &       0.06 \\ 
 \hline
 $f_2$      &      0.87189 &      1.14693 &     0.0087 &     0.0111 &     0.0111 &     0.0092 &     0.0080 &     0.0074 &     0.0073 \\ 
 Errors      &      0.00011 &      0.00014 \\ 
 & Amplitude ratios: & &       0.78 &       1.00 &       1.00 &       0.83 &       0.72 &       0.67 &       0.66 \\ 
 & Errors:           & &       0.16 &       0.20 &       0.20 &       0.18 &       0.16 &       0.15 &       0.14 \\ 
 \hline
 $f_3$      &      0.92314 &      1.08326 &     0.0020 &     0.0019 &     0.0019 &     0.0031 &     0.0034 &     0.0039 &     0.0042 \\ 
 Errors      &      0.00053 &      0.00062 \\ 
 & Amplitude ratios: & &       0.47 &       0.46 &       0.46 &       0.73 &       0.82 &       0.94 &       1.00 \\ 
 & Errors:           & &       0.34 &       0.41 &       0.41 &       0.40 &       0.39 &       0.40 &       0.40 \\ 
 \hline
 $f_4$      &      1.75472 &      0.56989 &     0.0070 &     0.0103 &     0.0090 &     0.0082 &     0.0058 &     0.0057 &     0.0060 \\ 
 Errors      &      0.00015 &      0.00005 \\ 
 & Amplitude ratios: & &       0.68 &       1.00 &       0.87 &       0.80 &       0.56 &       0.56 &       0.58 \\ 
 & Errors:           & &       0.17 &       0.22 &       0.21 &       0.19 &       0.16 &       0.15 &       0.15 \\ 
 \hline
\end{tabular}
\end{table}