\begin{table}
\caption{\label{  2842}HD   2842.}
%\centering
\small
\begin{tabular}{rrrrrrrrrr}
 \hline \hline
 HD  2842 & & &                           $U$ & $B1$ & $B$ & $B2$ & $V1$ & $V$ & $G$ \\ 
 \hline
 & Mean magnitudes: &  &     8.7691 &     8.3682 &     7.4092 &     8.8170 &     8.7050 &     7.9858 &     9.0944 \\ 
 & Errors:          &  &     0.0009 &     0.0012 &     0.0011 &     0.0011 &     0.0009 &     0.0008 &     0.0008 \\ 
 \hline
 & Amplitude errors: &  &     0.0013 &     0.0017 &     0.0016 &     0.0015 &     0.0013 &     0.0012 &     0.0012 \\ 
 \hline
%&&&&&&&&& \\[-8pt]
 HD  2842 & Frequency (${\rm d}^{-1}$) & Period($d$) &  $U$ & $B1$ & $B$ & $B2$ & $V1$ & $V$ & $G$ \\ 
 \hline
 $f_1$      &      1.71270 &      0.58387 &     0.0244 &     0.0348 &     0.0336 &     0.0317 &     0.0255 &     0.0249 &     0.0229 \\ 
 Errors      &      0.00003 &      0.00001 \\ 
 & Amplitude ratios: & &       0.70 &       1.00 &       0.97 &       0.91 &       0.73 &       0.71 &       0.66 \\ 
 & Errors:           & &       0.05 &       0.07 &       0.06 &       0.06 &       0.05 &       0.05 &       0.05 \\ 
 \hline
 $f_2$      &      1.53729 &      0.65050 &     0.0137 &     0.0218 &     0.0209 &     0.0194 &     0.0158 &     0.0146 &     0.0140 \\ 
 Errors      &      0.00005 &      0.00002 \\ 
 & Amplitude ratios: & &       0.63 &       1.00 &       0.96 &       0.89 &       0.72 &       0.67 &       0.64 \\ 
 & Errors:           & &       0.08 &       0.11 &       0.10 &       0.10 &       0.08 &       0.08 &       0.07 \\ 
 \hline
 $f_3$      &      1.67063 &      0.59858 &     0.0089 &     0.0122 &     0.0119 &     0.0117 &     0.0095 &     0.0096 &     0.0092 \\ 
 Errors      &      0.00007 &      0.00003 \\ 
 & Amplitude ratios: & &       0.73 &       1.00 &       0.98 &       0.96 &       0.78 &       0.79 &       0.75 \\ 
 & Errors:           & &       0.15 &       0.19 &       0.19 &       0.18 &       0.15 &       0.15 &       0.14 \\ 
 \hline
\end{tabular}
\end{table}