\begin{table}%t24%f25
\caption{\label{218396}HD 218396.}
%\centering
\small
\begin{tabular}{rrrrrrrrrr}
 \hline\hline
 HD 218396 & & & $U$ & $B1$ & $B$ & $B2$ & $V1$ & $V$ & $G$ \\ 
 \hline
 & Mean magnitudes: &  &     6.6524 &     6.2587 &     5.3186 &     6.7531 &     6.6774 &     5.9601 &     7.0853 \\ 
 & Errors:          &  &     0.0008 &     0.0011 &     0.0011 &     0.0011 &     0.0009 &     0.0008 &     0.0008 \\ 
 \hline
 & Amplitude errors: &  &     0.0012 &     0.0015 &     0.0015 &     0.0015 &     0.0013 &     0.0012 &     0.0012 \\ 
 \hline
%&&&&&&&&& \\[-8pt]
 HD 218396 & Frequency (${\rm d}^{-1}$) & Period($d$) &$U$ & $B1$ & $B$ & $B2$ & $V1$ & $V$ & $G$ \\  \hline
 $f_1$      &      1.98054 &      0.50491 &     0.0137 &     0.0221 &     0.0220 &     0.0222 &     0.0175 &     0.0161 &     0.0154 \\ 
 Errors      &      0.00004 &      0.00001 \\ 
 & Amplitude ratios: & &       0.62 &       0.99 &       0.99 &       1.00 &       0.79 &       0.73 &       0.69 \\ 
 & Errors:           & &       0.07 &       0.10 &       0.09 &       0.10 &       0.08 &       0.07 &       0.07 \\ 
 \hline
 $f_2$      &      1.73261 &      0.57716 &     0.0134 &     0.0210 &     0.0204 &     0.0205 &     0.0166 &     0.0158 &     0.0144 \\ 
 Errors      &      0.00004 &      0.00001 \\ 
 & Amplitude ratios: & &       0.64 &       1.00 &       0.97 &       0.98 &       0.79 &       0.75 &       0.68 \\ 
 & Errors:           & &       0.07 &       0.10 &       0.10 &       0.10 &       0.08 &       0.08 &       0.07 \\ 
 \hline
 $f_3$      &      0.76762 &      1.30273 &     0.0075 &     0.0121 &     0.0116 &     0.0116 &     0.0099 &     0.0093 &     0.0083 \\ 
 Errors      &      0.00007 &      0.00013 \\ 
 & Amplitude ratios: & &       0.62 &       1.00 &       0.95 &       0.96 &       0.81 &       0.77 &       0.68 \\ 
 & Errors:           & &       0.12 &       0.18 &       0.17 &       0.17 &       0.15 &       0.14 &       0.13 \\ 
 \hline
\end{tabular}
\end{table}