\begin{table}%t21%t22%t23
\caption{\label{206043}HD 206043.}
%\centering
\small
\begin{tabular}{rrrrrrrrrr}
 \hline\hline
 HD 206043 & & &  $U$ & $B1$ & $B$ & $B2$ & $V1$ & $V$ & $G$ \\ 
 \hline
 & Mean magnitudes: &  &     6.5605 &     6.1317 &     5.1674 &     6.5809 &     6.4790 &     5.7572 &     6.8713 \\ 
 & Errors:          &  &     0.0007 &     0.0007 &     0.0007 &     0.0007 &     0.0007 &     0.0007 &     0.0007 \\ 
 \hline
 & Amplitude errors: &  &     0.0010 &     0.0010 &     0.0010 &     0.0010 &     0.0010 &     0.0010 &     0.0010 \\ 
 \hline
%&&&&&&&&& \\[-8pt]
 HD 206043 & Frequency (${\rm d}^{-1}$) & Period($d$) &$U$ & $B1$ & $B$ & $B2$ & $V1$ & $V$ & $G$ \\  \hline
 $f_1$      &      2.35951 &      0.42382 &     0.0114 &     0.0172 &     0.0166 &     0.0156 &     0.0129 &     0.0126 &     0.0118 \\ 
 Errors      &      0.00004 &      0.00001 \\ 
 & Amplitude ratios: & &       0.66 &       1.00 &       0.97 &       0.91 &       0.75 &       0.73 &       0.69 \\ 
 & Errors:           & &       0.07 &       0.08 &       0.08 &       0.08 &       0.07 &       0.07 &       0.07 \\ 
 \hline
 $f_2$      &      2.43246 &      0.41111 &     0.0124 &     0.0177 &     0.0167 &     0.0158 &     0.0134 &     0.0130 &     0.0119 \\ 
 Errors      &      0.00004 &      0.00001 \\ 
 & Amplitude ratios: & &       0.70 &       1.00 &       0.94 &       0.89 &       0.76 &       0.74 &       0.67 \\ 
 & Errors:           & &       0.07 &       0.08 &       0.08 &       0.08 &       0.07 &       0.07 &       0.07 \\ 
 \hline
 $f_3$      &      2.52428 &      0.39615 &     0.0075 &     0.0110 &     0.0104 &     0.0103 &     0.0078 &     0.0077 &     0.0069 \\ 
 Errors      &      0.00007 &      0.00001 \\ 
 & Amplitude ratios: & &       0.68 &       1.00 &       0.94 &       0.94 &       0.71 &       0.70 &       0.63 \\ 
 & Errors:           & &       0.11 &       0.13 &       0.13 &       0.13 &       0.11 &       0.11 &       0.11 \\ 
 \hline
 $f_4$      &      2.26550 &      0.44140 &     0.0020 &     0.0036 &     0.0034 &     0.0030 &     0.0027 &     0.0024 &     0.0022 \\ 
 Errors      &      0.00022 &      0.00004 \\ 
 & Amplitude ratios: & &       0.58 &       1.00 &       0.96 &       0.86 &       0.76 &       0.67 &       0.61 \\ 
 & Errors:           & &       0.32 &       0.41 &       0.39 &       0.38 &       0.36 &       0.33 &       0.34 \\ 
 \hline
 $f_5$      &      2.59928 &      0.38472 &     0.0028 &     0.0044 &     0.0040 &     0.0039 &     0.0027 &     0.0024 &     0.0024 \\ 
 Errors      &      0.00020 &      0.00003 \\ 
 & Amplitude ratios: & &       0.64 &       1.00 &       0.90 &       0.90 &       0.61 &       0.55 &       0.54 \\ 
 & Errors:           & &       0.27 &       0.33 &       0.31 &       0.32 &       0.27 &       0.26 &       0.27 \\ 
 \hline
 $f_6$      &      2.46060 &      0.40640 &     0.0029 &     0.0039 &     0.0040 &     0.0039 &     0.0029 &     0.0028 &     0.0026 \\ 
 Errors      &      0.00019 &      0.00003 \\ 
 & Amplitude ratios: & &       0.72 &       0.97 &       1.00 &       0.96 &       0.71 &       0.68 &       0.63 \\ 
 & Errors:           & &       0.30 &       0.35 &       0.35 &       0.35 &       0.30 &       0.29 &       0.30 \\ 
 \hline
\end{tabular}
\end{table}