\begin{table}%t2
\caption{\label{table:parfit}Table of fitted parameters relevant to Eq.~(\ref{eq:fit}) for the 3 DIMMs at 3, 8 and 20~m and for each season and/or each year.}
%\centerline
{\begin{tabular}{c c c c c c c c}\\ \hline  \hline
Season&$N_{\rm total}$&$N_{\rm a}/N$&$N_{\rm b}/N$&$N_{\rm c}/N$&Seeing a&Seeing b&Seeing c\\  \hline
8 m DIMM&&(\%)&(\%)&(\%)&(\arcsec)&(\arcsec)&(\arcsec)\\
winter 2005&29000&13.4&22.1&64.6&0.26&0.46&1.68\\
winter 2006&24000&17.75&11.70&70.55&0.32&0.64&1.75\\
winter 2007&17000&19.00&4.4&76.60&0.43&0.95&1.79\\
winter averages&70000&16.24&14.36&69.40&0.33&0.54&1.73\\
autumn 2005&25000&16.18&21.20&62.62&0.27&0.55&1.22\\
autumn 2006&24000&15.00&9.10&75.90&0.32&0.66&1.05\\
autumn 2007&29000&24.64&11.00&64.36&0.32&0.67&1.32\\
autumn averages&78000&19.00&13.70&67.30&0.30&0.61&1.20\\
spring 2005&16000&0.68&27&72.32&0.25&0.42&1.49\\
spring 2005$^\dag$&16000&27& &73&0.41&&1.49\\
spring 2006&14000&11.87&13.28&74.84&0.37&0.69&1.58\\
spring 2007&14000&6.52&45.29&48.17&0.27&1.08&1.70\\
spring averages&44000&6.10&28.54&65.80&0.29&&1.58\\
general averages&&17.3 $\pm$ 2.3&&67.2 $\pm$ 3.2&0.32&&1.48\\  \hline
ground DIMM (3~m)&114~590&&&&&&\\
23/2--19/5  2005&&&&&&&\\
21/7--29/9  2005& &2.0&5.2&92.8&0.32&0.74&1.914\\
19/3--27/8  2007&&&&&&&\\  \hline
roof DIMM  (20 m)&23913&&&&&&\\
23/7--31/10 2005&&&&&&&\\ 
3 components&&15.7&29.3&55&0.298&0.42&1.165\\
2 components&&45&&55&0.37&&1.16\\ \hline 
\end{tabular}}
\par
{\scriptsize}$\dag$: Fit with 2 log-normal components.\\
Columns labelled as ``$N_{\rm a}/N$'', ``$N_{\rm b}/N$'' and ``$N_{\rm c}/N$'' are the integrals under the 3 fitted log-normal functions in~\%. Columns ``seeing a'', ``seeing b'' and ``seeing c'' are the abcissa of the maximum of the 3 fitted functions.
\end{table}