\begin{table}%t5
\par
\caption {\label{table_res}Table of results from $\chi^2$ fitting of real and simulated
  data. }
%\centerline
 {\begin{tabular}{l|cc|ccc}
\hline\hline
Polarisation$^a$ & \multicolumn{2}{c|}{6 Directions} & \multicolumn{3}{c}{3 Directions} \\
 & 100--350~keV & 100--500~keV & 100--350~keV & 100--500~keV & 100~keV--1~MeV\\ 
\hline
 Percentage (\%) & $>$31 & $>$32 & $\rm 11  ^{+48}_{-11}$ & $\rm 25 ^{+45}_{-25}$  & $\rm 29 ^{+25}_{-26}$   \\
 Angle & $>$40 & $>$90 & $>$40 & $\rm 100  ^{+65}_{-66}$ & $\rm 100  ^{+32}_{-24}$ \\
 Probability (\%) & 26.4 & 28.0 & 99.8 & 99.4 & 97.3 \\
 \hline
\end{tabular}}
\smallskip
$^a$  {Errors quoted are 1$\sigma$
for 2~parameters of interest. The columns from left to right list the polarisation percentage, angle and best-fit probability that
  the model simulations matched up with the real data, the energy ranges analysed over six directions (Cols.~2 and~3) and the energy ranges analysed over three directions (Cols.~4--6).}
\end{table}