\begin{table}%t1 
\par
\caption{\label{table:grbs}Properties of GRB~061122 obtained with \textit{INTEGRAL}.}
%\centerline
 {
\begin{tabular}{cccc}
\hline\hline
  RA$^a$ &   Dec &   Off-Axis &   Trigger   \\
              &        &   Angle &   Time (UTC)   \\ 
\hline
 20h 15m 20.9s & +15$^{\circ}$ 30\arcmin~50.8\arcsec & 8.2$^{\circ}$ & 07:56:45 \\
\noalign{\smallskip}\noalign{\smallskip}
\hline 
 $T_{90}$ & \multicolumn{2}{c}{Peak flux (20--200~keV)}  &\\ 
  (s) &    (ph~cm$^{-2}$~s$^{-1}$) &  (erg~cm$^{-2}$~s$^{-1}$)  & \\
\hline
 11 &$\rm 31.69 ^{+0.65}_{-0.93}$ & $3.13 ^{+0.06}_{-0.09} \times 10^{-6}$  & \\
\hline
\end{tabular}}
\par
\smallskip
{Coordinates are taken from the relevant GCN circular \citep{gcn5834}.}
\end{table}