\begin{table}%TA.2
%\centering
\par
\caption {\label{table20}Outermost 1 $\rso$ of a 20~$\mso$ model at solar metallicity ($Z=0.02$). The table shows the physical variables at $t$~=~$6.41\times10^6$ years. Columns 
contain the progressive grid point of the model, the status ($R$~=~radiative, 
$C$~=~convective), the optical depth~$\tau$, the opacity~$\varkappa$,
the density $\rho$, the radius~$R$, the value $M_{*}-M_r$ (where $M_*$ is the total stellar mass and $M_r$ is the mass coordinate), the temperature~$T$,
the convective velocity~$v_{\rm c}$ and the local sound speed $c_{\rm s}$. All the values are in cgs units if not otherwise specified.} 
\begin{tabular}{cccccccccc}
\hline\hline
 Grid point &  Stat &  $\tau$ &  $\varkappa$ &  $\rho$ &    $R$ [$\rso$] &      $M_{*}-M_r$ [g] &  $T$[K] &       $v_{\rm c}$ [km~s$^{-1}$] &  $c_{\rm s}$ [km~s$^{-1}$] \\
\hline
 1009 & R & 1.88E+04 &    1.15006 &  9.1148E-07 &     9.4516 & 3.91E-05 & 3.415E+05 &       0.00 &     110.14 \\
 1010 & R & 1.80E+04 &    1.16843 &  8.4671E-07 &     9.4634 & 3.70E-05 & 3.363E+05 &       0.00 &     109.93 \\
 1011 & R & 1.68E+04 &    1.18658 &  7.8819E-07 &     9.4826 & 3.39E-05 & 3.313E+05 &       0.00 &     109.74 \\
 1012 & R & 1.61E+04 &    1.19963 &  7.4912E-07 &     9.4929 & 3.23E-05 & 3.279E+05 &       0.00 &     109.61 \\
 1013 & R & 1.55E+04 &    1.21788 &  6.9847E-07 &     9.5037 & 3.08E-05 & 3.232E+05 &       0.00 &     109.45 \\
 1014 & R & 1.45E+04 &    1.24209 &  6.3760E-07 &     9.5220 & 2.83E-05 & 3.172E+05 &       0.00 &     109.26 \\
 1015 & R & 1.35E+04 &    1.26170 &  5.9299E-07 &     9.5413 & 2.59E-05 & 3.125E+05 &       0.00 &     109.14 \\
 1016 & R & 1.30E+04 &    1.27584 &  5.6324E-07 &     9.5516 & 2.47E-05 & 3.093E+05 &       0.00 &     109.06 \\
 1017 & R & 1.24E+04 &    1.29061 &  5.3416E-07 &     9.5624 & 2.36E-05 & 3.060E+05 &       0.00 &     108.98 \\
 1018 & R & 1.19E+04 &    1.30554 &  5.0665E-07 &     9.5733 & 2.24E-05 & 3.027E+05 &       0.00 &     108.92 \\
 1019 & R & 1.15E+04 &    1.32091 &  4.8003E-07 &     9.5841 & 2.14E-05 & 2.994E+05 &       0.00 &     108.86 \\
 1020 & R & 1.10E+04 &    1.33683 &  4.5439E-07 &     9.5954 & 2.03E-05 & 2.961E+05 &       0.00 &     108.81 \\
 1021 & R & 1.05E+04 &    1.35328 &  4.2968E-07 &     9.6065 & 1.93E-05 & 2.928E+05 &       0.00 &     108.77 \\
 1022 & R & 1.01E+04 &    1.37094 &  4.0503E-07 &     9.6182 & 1.83E-05 & 2.893E+05 &       0.00 &     108.73 \\
 1023 & R & 9.62E+03 &    1.38833 &  3.8248E-07 &     9.6306 & 1.73E-05 & 2.860E+05 &       0.00 &     108.71 \\
 1024 & R & 9.24E+03 &    1.40532 &  3.6200E-07 &     9.6416 & 1.65E-05 & 2.828E+05 &       0.00 &     108.69 \\
 1025 & R & 8.85E+03 &    1.42367 &  3.4159E-07 &     9.6531 & 1.57E-05 & 2.795E+05 &       0.00 &     108.68 \\
 1026 & R & 8.45E+03 &    1.44389 &  3.2125E-07 &     9.6653 & 1.48E-05 & 2.761E+05 &       0.00 &     108.67 \\
 1027 & R & 8.05E+03 &    1.46417 &  3.0276E-07 &     9.6783 & 1.40E-05 & 2.728E+05 &       0.00 &     108.67 \\
 1028 & R & 7.72E+03 &    1.48419 &  2.8611E-07 &     9.6896 & 1.33E-05 & 2.697E+05 &       0.00 &     108.68 \\
 1029 & R & 7.38E+03 &    1.50595 &  2.6954E-07 &     9.7016 & 1.26E-05 & 2.664E+05 &       0.00 &     108.68 \\
 1030 & R & 7.04E+03 &    1.52815 &  2.5408E-07 &     9.7142 & 1.19E-05 & 2.632E+05 &       0.00 &     108.68 \\
 1031 & R & 6.73E+03 &    1.55060 &  2.3969E-07 &     9.7260 & 1.13E-05 & 2.601E+05 &       0.00 &     108.68 \\
 1032 & R & 6.42E+03 &    1.57310 &  2.2639E-07 &     9.7385 & 1.07E-05 & 2.570E+05 &       0.00 &     108.67 \\
 1033 & R & 6.15E+03 &    1.59542 &  2.1415E-07 &     9.7499 & 1.02E-05 & 2.541E+05 &       0.00 &     108.66 \\
 1034 & R & 5.88E+03 &    1.62281 &  2.0030E-07 &     9.7619 & 9.69E-06 & 2.505E+05 &       0.00 &     108.63 \\
 1035 & R & 5.53E+03 &    1.65803 &  1.8493E-07 &     9.7784 & 9.02E-06 & 2.463E+05 &       0.00 &     108.57 \\
 1036 & R & 5.17E+03 &    1.69089 &  1.7276E-07 &     9.7961 & 8.35E-06 & 2.426E+05 &       0.00 &     108.48 \\
 1037 & R & 4.94E+03 &    1.72391 &  1.6211E-07 &     9.8077 & 7.94E-06 & 2.392E+05 &       0.00 &     108.36 \\
 1038 & R & 4.64E+03 &    1.76662 &  1.5016E-07 &     9.8242 & 7.39E-06 & 2.350E+05 &       0.00 &     108.14 \\
 1039 & R & 4.32E+03 &    1.80536 &  1.4067E-07 &     9.8420 & 6.84E-06 & 2.314E+05 &       0.00 &     107.88 \\
 1040 & R & 4.12E+03 &    1.83771 &  1.3352E-07 &     9.8539 & 6.50E-06 & 2.284E+05 &       0.00 &     107.60 \\
 1041 & R & 3.91E+03 &    1.86954 &  1.2702E-07 &     9.8664 & 6.15E-06 & 2.255E+05 &       0.00 &     107.28 \\
 1042 & R & 3.73E+03 &    1.90044 &  1.2115E-07 &     9.8776 & 5.85E-06 & 2.226E+05 &       0.00 &     106.90 \\
 1043 & R & 3.55E+03 &    1.93471 &  1.1542E-07 &     9.8894 & 5.56E-06 & 2.197E+05 &       0.00 &     106.44 \\
 1044 & R & 3.37E+03 &    1.97305 &  1.0986E-07 &     9.9017 & 5.26E-06 & 2.165E+05 &       0.00 &     105.86 \\
 1045 & R & 3.18E+03 &    2.01222 &  1.0492E-07 &     9.9146 & 4.96E-06 & 2.134E+05 &       0.00 &     105.21 \\
 1046 & R & 3.01E+03 &    2.05131 &  1.0056E-07 &     9.9260 & 4.71E-06 & 2.105E+05 &       0.00 &     104.47 \\
 1047 & C & 2.85E+03 &    2.09321 &  9.6390E-08 &     9.9379 & 4.46E-06 & 2.073E+05 &       0.27 &     103.59 \\
 1048 & C & 2.68E+03 &    2.13709 &  9.2418E-08 &     9.9502 & 4.21E-06 & 2.039E+05 &       3.48 &     102.53 \\
 1049 & C & 2.50E+03 &    2.17706 &  8.8976E-08 &     9.9630 & 3.96E-06 & 2.007E+05 &       5.74 &     101.40 \\
 1050 & C & 2.36E+03 &    2.21180 &  8.6007E-08 &     9.9739 & 3.76E-06 & 1.976E+05 &       7.30 &     100.24 \\
 1051 & C & 2.21E+03 &    2.24604 &  8.3153E-08 &     9.9851 & 3.55E-06 & 1.943E+05 &       8.51 &      98.93 \\
 1052 & C & 2.07E+03 &    2.27681 &  8.0595E-08 &     9.9967 & 3.35E-06 & 1.911E+05 &       9.43 &      97.55 \\
 1053 & C & 1.94E+03 &    2.30324 &  7.8309E-08 &    10.0070 & 3.17E-06 & 1.879E+05 &      10.10 &      96.14 \\
 1054 & C & 1.80E+03 &    2.32459 &  7.6279E-08 &    10.0177 & 2.99E-06 & 1.848E+05 &      10.53 &      94.69 \\
 1055 & C & 1.69E+03 &    2.34028 &  7.4483E-08 &    10.0269 & 2.84E-06 & 1.818E+05 &      10.74 &      93.24 \\
 1056 & C & 1.58E+03 &    2.35064 &  7.2749E-08 &    10.0363 & 2.69E-06 & 1.786E+05 &      10.81 &      91.67 \\
 1057 & C & 1.47E+03 &    2.35334 &  7.1321E-08 &    10.0460 & 2.54E-06 & 1.758E+05 &      10.61 &      90.24 \\
 1058 & C & 1.39E+03 &    2.34958 &  7.0171E-08 &    10.0528 & 2.43E-06 & 1.734E+05 &      10.26 &      89.00 \\
 1059 & C & 1.31E+03 &    2.33995 &  6.9027E-08 &    10.0598 & 2.33E-06 & 1.708E+05 &       9.87 &      87.70 \\
 1060 & C & 1.23E+03 &    2.32417 &  6.7878E-08 &    10.0668 & 2.22E-06 & 1.682E+05 &       9.34 &      86.34 \\
 1061 & C & 1.16E+03 &    2.30414 &  6.6802E-08 &    10.0740 & 2.12E-06 & 1.657E+05 &       8.69 &      85.05 \\
 1062 & C & 1.09E+03 &    2.28134 &  6.5791E-08 &    10.0801 & 2.03E-06 & 1.633E+05 &       8.00 &      83.83 \\
 1063 & C & 1.03E+03 &    2.25516 &  6.4766E-08 &    10.0863 & 1.94E-06 & 1.610E+05 &       7.32 &      82.61 \\
 1064 & C & 9.71E+02 &    2.22633 &  6.3719E-08 &    10.0923 & 1.86E-06 & 1.585E+05 &       6.62 &      81.39 \\
 1065 & C & 9.12E+02 &    2.19204 &  6.2614E-08 &    10.0984 & 1.77E-06 & 1.561E+05 &       5.91 &      80.16 \\
 1066 & C & 8.55E+02 &    2.15002 &  6.1433E-08 &    10.1046 & 1.69E-06 & 1.535E+05 &       5.16 &      78.90 \\
 1067 & C & 8.00E+02 &    2.10271 &  6.0183E-08 &    10.1109 & 1.60E-06 & 1.509E+05 &       4.39 &      77.68 \\
 1068 & C & 7.48E+02 &    2.05208 &  5.8853E-08 &    10.1170 & 1.52E-06 & 1.483E+05 &       3.66 &      76.48 \\
 1069 & C & 6.97E+02 &    2.01013 &  5.7714E-08 &    10.1233 & 1.44E-06 & 1.462E+05 &       3.03 &      75.53 \\
 1070 & C & 6.68E+02 &    1.97885 &  5.6821E-08 &    10.1270 & 1.40E-06 & 1.447E+05 &       2.59 &      74.84 \\
 \hline
 1071 & C & 6.40E+02 &    1.94778 &  5.5882E-08 &    10.1308 & 1.35E-06 & 1.431E+05 &       2.26 &      74.14 \\
 1072 & C & 6.11E+02 &    1.91749 &  5.4897E-08 &    10.1346 & 1.30E-06 & 1.415E+05 &       1.97 &      73.45 \\
 1073 & C & 5.84E+02 &    1.88866 &  5.3907E-08 &    10.1386 & 1.25E-06 & 1.399E+05 &       1.71 &      72.79 \\
 1074 & C & 5.59E+02 &    1.86001 &  5.2917E-08 &    10.1422 & 1.21E-06 & 1.383E+05 &       1.49 &      72.15 \\
 1075 & C & 5.34E+02 &    1.83056 &  5.1882E-08 &    10.1459 & 1.17E-06 & 1.368E+05 &       1.28 &      71.52 \\
 1076 & C & 5.10E+02 &    1.80057 &  5.0800E-08 &    10.1497 & 1.13E-06 & 1.352E+05 &       1.09 &      70.88 \\
 1077 & C & 4.86E+02 &    1.76619 &  4.9509E-08 &    10.1536 & 1.08E-06 & 1.333E+05 &       0.91 &      70.17 \\
 1078 & C & 4.57E+02 &    1.72789 &  4.7985E-08 &    10.1586 & 1.03E-06 & 1.312E+05 &       0.73 &      69.36 \\
 1079 & C & 4.29E+02 &    1.69264 &  4.6470E-08 &    10.1638 & 9.72E-07 & 1.292E+05 &       0.56 &      68.61 \\
 1080 & C & 4.04E+02 &    1.66094 &  4.4977E-08 &    10.1686 & 9.24E-07 & 1.272E+05 &       0.43 &      67.90 \\
 1081 & C & 3.80E+02 &    1.63122 &  4.3415E-08 &    10.1735 & 8.75E-07 & 1.252E+05 &       0.32 &      67.18 \\
 1082 & C & 3.56E+02 &    1.60288 &  4.1784E-08 &    10.1786 & 8.26E-07 & 1.232E+05 &       0.23 &      66.46 \\
 1083 & C & 3.33E+02 &    1.57488 &  4.0035E-08 &    10.1838 & 7.78E-07 & 1.210E+05 &       0.16 &      65.72 \\
 1084 & C & 3.09E+02 &    1.54737 &  3.8160E-08 &    10.1896 & 7.26E-07 & 1.186E+05 &       0.10 &      64.94 \\
 1085 & C & 2.86E+02 &    1.52243 &  3.6302E-08 &    10.1957 & 6.75E-07 & 1.163E+05 &       0.05 &      64.18 \\
 1086 & C & 2.65E+02 &    1.49992 &  3.4470E-08 &    10.2015 & 6.29E-07 & 1.140E+05 &       0.01 &      63.44 \\
 1087 & R & 2.45E+02 &    1.48240 &  3.2925E-08 &    10.2075 & 5.83E-07 & 1.121E+05 &       0.00 &      62.83 \\
 1088 & R & 2.32E+02 &    1.46981 &  3.1697E-08 &    10.2115 & 5.54E-07 & 1.105E+05 &       0.00 &      62.35 \\
 1089 & R & 2.19E+02 &    1.45895 &  3.0510E-08 &    10.2156 & 5.24E-07 & 1.090E+05 &       0.00 &      61.88 \\
 1090 & R & 2.08E+02 &    1.44955 &  2.9369E-08 &    10.2194 & 4.99E-07 & 1.075E+05 &       0.00 &      61.43 \\
 1091 & R & 1.97E+02 &    1.44085 &  2.8205E-08 &    10.2234 & 4.73E-07 & 1.060E+05 &       0.00 &      60.97 \\
 1092 & R & 1.86E+02 &    1.43173 &  2.6869E-08 &    10.2275 & 4.47E-07 & 1.042E+05 &       0.00 &      60.43 \\
 1093 & R & 1.72E+02 &    1.42204 &  2.5352E-08 &    10.2329 & 4.15E-07 & 1.022E+05 &       0.00 &      59.81 \\
 1094 & R & 1.59E+02 &    1.41419 &  2.4109E-08 &    10.2385 & 3.82E-07 & 1.005E+05 &       0.00 &      59.29 \\
 1095 & R & 1.50E+02 &    1.40808 &  2.3160E-08 &    10.2421 & 3.63E-07 & 9.911E+04 &       0.00 &      58.89 \\
 1096 & R & 1.42E+02 &    1.40244 &  2.2244E-08 &    10.2458 & 3.44E-07 & 9.779E+04 &       0.00 &      58.50 \\
 1097 & R & 1.35E+02 &    1.39730 &  2.1365E-08 &    10.2493 & 3.27E-07 & 9.650E+04 &       0.00 &      58.12 \\
 1098 & R & 1.28E+02 &    1.39246 &  2.0485E-08 &    10.2529 & 3.10E-07 & 9.519E+04 &       0.00 &      57.73 \\
 1099 & R & 1.21E+02 &    1.38794 &  1.9605E-08 &    10.2565 & 2.93E-07 & 9.385E+04 &       0.00 &      57.34 \\
 1100 & R & 1.14E+02 &    1.38372 &  1.8710E-08 &    10.2603 & 2.76E-07 & 9.246E+04 &       0.00 &      56.93 \\
 1101 & R & 1.08E+02 &    1.37985 &  1.7798E-08 &    10.2642 & 2.60E-07 & 9.101E+04 &       0.00 &      56.51 \\
 1102 & R & 1.01E+02 &    1.37684 &  1.6995E-08 &    10.2684 & 2.43E-07 & 8.970E+04 &       0.00 &      56.13 \\
 1103 & R & 9.59E+01 &    1.37462 &  1.6306E-08 &    10.2716 & 2.31E-07 & 8.855E+04 &       0.00 &      55.80 \\
 1104 & R & 9.10E+01 &    1.37291 &  1.5607E-08 &    10.2749 & 2.19E-07 & 8.736E+04 &       0.00 &      55.46 \\
 1105 & R & 8.61E+01 &    1.37164 &  1.4811E-08 &    10.2783 & 2.07E-07 & 8.597E+04 &       0.00 &      55.07 \\
 1106 & R & 8.01E+01 &    1.37106 &  1.3914E-08 &    10.2829 & 1.92E-07 & 8.435E+04 &       0.00 &      54.60 \\
 1107 & R & 7.41E+01 &    1.37119 &  1.3184E-08 &    10.2877 & 1.77E-07 & 8.299E+04 &       0.00 &      54.22 \\
 1108 & R & 7.04E+01 &    1.37161 &  1.2631E-08 &    10.2907 & 1.68E-07 & 8.192E+04 &       0.00 &      53.91 \\
 1109 & R & 6.68E+01 &    1.37234 &  1.2022E-08 &    10.2938 & 1.59E-07 & 8.072E+04 &       0.00 &      53.57 \\
 1110 & R & 6.26E+01 &    1.37335 &  1.1354E-08 &    10.2977 & 1.48E-07 & 7.936E+04 &       0.00 &      53.18 \\
 1111 & R & 5.83E+01 &    1.37444 &  1.0789E-08 &    10.3018 & 1.37E-07 & 7.817E+04 &       0.00 &      52.85 \\
 1112 & R & 5.55E+01 &    1.37559 &  1.0338E-08 &    10.3047 & 1.30E-07 & 7.720E+04 &       0.00 &      52.57 \\
 1113 & R & 5.27E+01 &    1.37700 &  9.8872E-09 &    10.3076 & 1.24E-07 & 7.620E+04 &       0.00 &      52.29 \\
 1114 & R & 5.00E+01 &    1.37874 &  9.4310E-09 &    10.3107 & 1.17E-07 & 7.516E+04 &       0.00 &      51.99 \\
 1115 & R & 4.72E+01 &    1.38088 &  8.9689E-09 &    10.3139 & 1.10E-07 & 7.407E+04 &       0.00 &      51.69 \\
 1116 & R & 4.44E+01 &    1.38319 &  8.5480E-09 &    10.3173 & 1.03E-07 & 7.305E+04 &       0.00 &      51.40 \\
  1117 & R & 4.22E+01 &    1.38562 &  8.1697E-09 &    10.3201 & 9.76E-08 & 7.211E+04 &       0.00 &      51.13 \\
 1118 & R & 4.00E+01 &    1.38845 &  7.7869E-09 &    10.3230 & 9.22E-08 & 7.112E+04 &       0.00 &      50.85 \\
 1119 & R & 3.78E+01 &    1.39177 &  7.3995E-09 &    10.3261 & 8.67E-08 & 7.010E+04 &       0.00 &      50.56 \\
 1120 & R & 3.56E+01 &    1.39617 &  6.9626E-09 &    10.3293 & 8.12E-08 & 6.890E+04 &       0.00 &      50.23 \\
 1121 & R & 3.29E+01 &    1.40204 &  6.4740E-09 &    10.3336 & 7.45E-08 & 6.750E+04 &       0.00 &      49.83 \\
 1122 & R & 3.02E+01 &    1.40739 &  6.0948E-09 &    10.3381 & 6.79E-08 & 6.636E+04 &       0.00 &      49.51 \\
 1123 & R & 2.88E+01 &    1.41162 &  5.8291E-09 &    10.3406 & 6.43E-08 & 6.554E+04 &       0.00 &      49.27 \\
 1124 & R & 2.73E+01 &    1.41634 &  5.5609E-09 &    10.3433 & 6.08E-08 & 6.468E+04 &       0.00 &      49.03 \\
 1125 & R & 2.59E+01 &    1.42226 &  5.2595E-09 &    10.3461 & 5.72E-08 & 6.368E+04 &       0.00 &      48.74 \\
 1126 & R & 2.41E+01 &    1.42985 &  4.9241E-09 &    10.3497 & 5.29E-08 & 6.252E+04 &       0.00 &      48.41 \\
 1127 & R & 2.23E+01 &    1.43837 &  4.6133E-09 &    10.3536 & 4.86E-08 & 6.140E+04 &       0.00 &      48.09 \\
 1128 & R & 2.08E+01 &    1.44656 &  4.3587E-09 &    10.3570 & 4.50E-08 & 6.043E+04 &       0.00 &      47.81 \\
 1129 & R & 1.96E+01 &    1.45480 &  4.1322E-09 &    10.3598 & 4.22E-08 & 5.954E+04 &       0.00 &      47.54 \\
 1130 & R & 1.84E+01 &    1.46274 &  3.9346E-09 &    10.3628 & 3.93E-08 & 5.873E+04 &       0.00 &      47.30 \\
 1131 & R & 1.76E+01 &    1.47005 &  3.7666E-09 &    10.3651 & 3.73E-08 & 5.802E+04 &       0.00 &      47.08 \\
 1132 & R & 1.67E+01 &    1.47948 &  3.5652E-09 &    10.3675 & 3.52E-08 & 5.712E+04 &       0.00 &      46.80 \\
 1133 & R & 1.55E+01 &    1.48989 &  3.3581E-09 &    10.3710 & 3.24E-08 & 5.617E+04 &       0.00 &      46.50 \\
 1134 & R & 1.45E+01 &    1.50018 &  3.1779E-09 &    10.3738 & 3.02E-08 & 5.529E+04 &       0.00 &      46.22 \\
 1135 & R & 1.36E+01 &    1.51024 &  3.0255E-09 &    10.3767 & 2.80E-08 & 5.452E+04 &       0.00 &      45.96 \\
 1136 & R & 1.29E+01 &    1.51938 &  2.9012E-09 &    10.3789 & 2.66E-08 & 5.386E+04 &       0.00 &      45.74 \\
 1137 & R & 1.23E+01 &    1.52942 &  2.7765E-09 &    10.3811 & 2.51E-08 & 5.318E+04 &       0.00 &      45.51 \\
 \hline
 1138 & R & 1.16E+01 &    1.54073 &  2.6471E-09 &    10.3834 & 2.36E-08 & 5.244E+04 &       0.00 &      45.24 \\
 1139 & R & 1.09E+01 &    1.55335 &  2.5130E-09 &    10.3860 & 2.20E-08 & 5.164E+04 &       0.00 &      44.94 \\
 1140 & R & 1.02E+01 &    1.56677 &  2.3784E-09 &    10.3887 & 2.05E-08 & 5.079E+04 &       0.00 &      44.61 \\
 1141 & R & 9.50E+00 &    1.58081 &  2.2433E-09 &    10.3916 & 1.89E-08 & 4.988E+04 &       0.00 &      44.25 \\
 1142 & R & 8.78E+00 &    1.59453 &  2.1289E-09 &    10.3946 & 1.73E-08 & 4.908E+04 &       0.00 &      43.91 \\
 1143 & R & 8.28E+00 &    1.60744 &  2.0356E-09 &    10.3968 & 1.62E-08 & 4.838E+04 &       0.00 &      43.60 \\
 1144 & R & 7.77E+00 &    1.62179 &  1.9422E-09 &    10.3991 & 1.51E-08 & 4.765E+04 &       0.00 &      43.25 \\
 1145 & R & 7.26E+00 &    1.63733 &  1.8489E-09 &    10.4016 & 1.41E-08 & 4.688E+04 &       0.00 &      42.87 \\
 1146 & R & 6.75E+00 &    1.65130 &  1.7685E-09 &    10.4041 & 1.30E-08 & 4.618E+04 &       0.00 &      42.50 \\
 1147 & R & 6.37E+00 &    1.66300 &  1.7008E-09 &    10.4060 & 1.22E-08 & 4.555E+04 &       0.00 &      42.15 \\
 1148 & R & 5.99E+00 &    1.67593 &  1.6205E-09 &    10.4080 & 1.14E-08 & 4.477E+04 &       0.00 &      41.69 \\
 1149 & C & 5.46E+00 &    1.68633 &  1.5492E-09 &    10.4109 & 1.03E-08 & 4.404E+04 &       0.07 &      41.23 \\
 1150 & C & 5.18E+00 &    1.69348 &  1.4995E-09 &    10.4125 & 9.75E-09 & 4.350E+04 &       0.07 &      40.87 \\
 1151 & C & 4.89E+00 &    1.70032 &  1.4498E-09 &    10.4142 & 9.17E-09 & 4.294E+04 &       0.07 &      40.47 \\
 1152 & C & 4.61E+00 &    1.70654 &  1.4000E-09 &    10.4159 & 8.59E-09 & 4.236E+04 &       0.08 &      40.03 \\
 1153 & C & 4.32E+00 &    1.71194 &  1.3475E-09 &    10.4177 & 8.02E-09 & 4.171E+04 &       0.08 &      39.52 \\
 1154 & C & 4.00E+00 &    1.71555 &  1.2921E-09 &    10.4198 & 7.38E-09 & 4.100E+04 &       0.08 &      38.92 \\
 1155 & C & 3.68E+00 &    1.71615 &  1.2488E-09 &    10.4219 & 6.74E-09 & 4.042E+04 &       0.09 &      38.41 \\
 1156 & C & 3.51E+00 &    1.71368 &  1.2020E-09 &    10.4231 & 6.38E-09 & 3.977E+04 &       0.09 &      37.80 \\
 1157 & C & 3.16E+00 &    1.70637 &  1.1546E-09 &    10.4257 & 5.67E-09 & 3.909E+04 &       0.09 &      37.14 \\
 1158 & C & 2.98E+00 &    1.69773 &  1.1208E-09 &    10.4270 & 5.31E-09 & 3.859E+04 &       0.10 &      36.66 \\
 1159 & C & 2.79E+00 &    1.68575 &  1.0858E-09 &    10.4285 & 4.92E-09 & 3.806E+04 &       0.09 &      36.16 \\
 1160 & C & 2.61E+00 &    1.67097 &  1.0512E-09 &    10.4300 & 4.55E-09 & 3.754E+04 &       0.13 &      35.67 \\
 1161 & C & 2.43E+00 &    1.65364 &  1.0168E-09 &    10.4315 & 4.18E-09 & 3.701E+04 &       0.12 &      35.21 \\
 1162 & C & 2.27E+00 &    1.63409 &  9.8245E-10 &    10.4330 & 3.84E-09 & 3.649E+04 &       0.11 &      34.79 \\
 1163 & C & 2.11E+00 &    1.61186 &  9.4679E-10 &    10.4345 & 3.49E-09 & 3.596E+04 &       0.13 &      34.41 \\
 1164 & C & 1.95E+00 &    1.59444 &  9.2036E-10 &    10.4361 & 3.15E-09 & 3.556E+04 &       0.14 &      34.16 \\
 1165 & C & 1.88E+00 &    1.58330 &  9.0408E-10 &    10.4367 & 3.00E-09 & 3.532E+04 &       0.16 &      34.02 \\
 1166 & C & 1.81E+00 &    1.56475 &  8.7896E-10 &    10.4374 & 2.85E-09 & 3.496E+04 &       0.16 &      33.84 \\
 1167 & C & 1.68E+00 &    1.54394 &  8.5291E-10 &    10.4389 & 2.56E-09 & 3.458E+04 &       0.16 &      33.68 \\
 1168 & C & 1.61E+00 &    1.52883 &  8.3498E-10 &    10.4396 & 2.41E-09 & 3.433E+04 &       0.17 &      33.59 \\
 1169 & C & 1.55E+00 &    1.51274 &  8.1655E-10 &    10.4404 & 2.26E-09 & 3.408E+04 &       0.19 &      33.52 \\
 1170 & C & 1.48E+00 &    1.48977 &  7.9113E-10 &    10.4412 & 2.11E-09 & 3.373E+04 &       0.19 &      33.43 \\
 1171 & R & 1.38E+00 &    1.46832 &  7.6805E-10 &    10.4425 & 1.87E-09 & 3.342E+04 &       0.00 &      33.38 \\
 1172 & R & 1.34E+00 &    1.44895 &  7.4758E-10 &    10.4431 & 1.77E-09 & 3.316E+04 &       0.00 &      33.34 \\
 1173 & R & 1.25E+00 &    1.42850 &  7.2624E-10 &    10.4442 & 1.57E-09 & 3.289E+04 &       0.00 &      33.32 \\
 1174 & R & 1.21E+00 &    1.41409 &  7.1132E-10 &    10.4448 & 1.47E-09 & 3.270E+04 &       0.00 &      33.31 \\
 1175 & R & 1.17E+00 &    1.39428 &  6.9089E-10 &    10.4454 & 1.37E-09 & 3.245E+04 &       0.00 &      33.31 \\
 1176 & R & 1.10E+00 &    1.36990 &  6.6582E-10 &    10.4465 & 1.20E-09 & 3.215E+04 &       0.00 &      33.32 \\
 1177 & R & 1.05E+00 &    1.34597 &  6.4121E-10 &    10.4474 & 1.05E-09 & 3.187E+04 &       0.00 &      33.35 \\
 1178 & R & 9.87E-01 &    1.32442 &  6.1900E-10 &    10.4485 & 8.97E-10 & 3.162E+04 &       0.00 &      33.38 \\
 1179 & R & 9.44E-01 &    1.30661 &  6.0086E-10 &    10.4493 & 7.84E-10 & 3.141E+04 &       0.00 &      33.42 \\
 1180 & R & 9.07E-01 &    1.28575 &  5.8007E-10 &    10.4500 & 6.86E-10 & 3.119E+04 &       0.00 &      33.47 \\
 1181 & R & 8.57E-01 &    1.26672 &  5.6146E-10 &    10.4510 & 5.48E-10 & 3.099E+04 &       0.00 &      33.52 \\
 1182 & R & 8.32E-01 &    1.25106 &  5.4637E-10 &    10.4515 & 4.81E-10 & 3.083E+04 &       0.00 &      33.57 \\
 1183 & R & 7.98E-01 &    1.23145 &  5.2773E-10 &    10.4522 & 3.85E-10 & 3.064E+04 &       0.00 &      33.64 \\
 1184 & R & 7.63E-01 &    1.20815 &  5.0587E-10 &    10.4531 & 2.84E-10 & 3.042E+04 &       0.00 &      33.74 \\
 1185 & R & 7.21E-01 &    1.18955 &  4.8863E-10 &    10.4541 & 1.60E-10 & 3.025E+04 &       0.00 &      33.84 \\
 1186 & R & 7.04E-01 &    1.17182 &  4.7235E-10 &    10.4545 & 1.11E-10 & 3.010E+04 &       0.00 &      33.93 \\
 1187 & R & 6.67E-01 &    1.15923 &  4.6089E-10 &    10.4556 & 0.00E+00 & 2.999E+04 &       0.00 &      34.01 \\
\hline
\end{tabular}
\end{table}