\begin{table}%TA.1
%\centering
\par
\caption {\label{table60}Outermost 4 $\rso$ of a 60 $\mso$ model at solar metallicity ($Z=0.02$). The table shows  physical variables at $t$~=~\tsixty years. Columns 
contain the progressive grid point of the model, the status ($R=\rm radiative$, $C=\rm convective$), the optical depth~$\tau$, the opacity $\varkappa$,
the density~$\rho$, the radius~$R$, the value $M_{*}-M_r$ (where $M_*$ is the total stellar mass and $M_r$ is the mass coordinate), the temperature~$T$,
the convective velocity~$v_{\rm c}$ and the local sound speed $c_{\rm s}$. All the values are in cgs units if not otherwise specified. 
} 
\begin{tabular}{cccccccccc}
\hline\hline
\\[-2ex]
   Grid point &  Stat &  $\tau$ &  $\varkappa$ &  $\rho$ &    $R$ [$\rso$] &      $M_{*}-M_r$ [g] &  $T$[K] &       $v_{\rm c}$ [km~s$^{-1}$] &  $c_{\rm s}$ [km~s$^{-1}$] \\
\hline
1062 & R & 1.82E+03 &    0.88736 &  1.2633E-08 &    18.0541 & 2.14E-05 & 2.240E+05 &       0.00 &     267.57 \\
 1063 & R & 1.76E+03 &    0.89553 &  1.1674E-08 &    18.1381 & 2.06E-05 & 2.214E+05 &       0.00 &     271.52 \\
 1064 & R & 1.70E+03 &    0.90534 &  1.0813E-08 &    18.2281 & 1.99E-05 & 2.187E+05 &       0.00 &     275.00 \\
 1065 & R & 1.64E+03 &    0.91747 &  1.0071E-08 &    18.3243 & 1.92E-05 & 2.159E+05 &       0.00 &     277.52 \\
 1066 & R & 1.57E+03 &    0.92978 &  9.5763E-09 &    18.4264 & 1.84E-05 & 2.136E+05 &       0.00 &     278.41 \\
 1067 & R & 1.53E+03 &    0.94138 &  9.2743E-09 &    18.4932 & 1.79E-05 & 2.118E+05 &       0.00 &     278.04 \\
 1068 & C & 1.49E+03 &    0.95487 &  9.0395E-09 &    18.5618 & 1.75E-05 & 2.099E+05 &      15.64 &     276.68 \\
 1069 & C & 1.45E+03 &    0.96881 &  8.8184E-09 &    18.6315 & 1.70E-05 & 2.080E+05 &      27.92 &     275.11 \\
 1070 & C & 1.41E+03 &    0.98203 &  8.6221E-09 &    18.7025 & 1.66E-05 & 2.062E+05 &      34.25 &     273.50 \\
 1071 & C & 1.37E+03 &    0.99441 &  8.4477E-09 &    18.7644 & 1.62E-05 & 2.046E+05 &      38.62 &     271.88 \\
 1072 & C & 1.34E+03 &    1.01310 &  8.1959E-09 &    18.8272 & 1.58E-05 & 2.020E+05 &      43.63 &     269.23 \\
 1073 & C & 1.26E+03 &    1.03152 &  7.9584E-09 &    18.9554 & 1.50E-05 & 1.994E+05 &      47.93 &     266.34 \\
 1074 & C & 1.23E+03 &    1.04388 &  7.8068E-09 &    19.0207 & 1.46E-05 & 1.977E+05 &      50.34 &     264.25 \\
 1075 & C & 1.19E+03 &    1.05647 &  7.6607E-09 &    19.0868 & 1.42E-05 & 1.959E+05 &      52.58 &     262.03 \\
 1076 & C & 1.15E+03 &    1.06922 &  7.5199E-09 &    19.1537 & 1.38E-05 & 1.941E+05 &      54.67 &     259.68 \\
 1077 & C & 1.11E+03 &    1.08107 &  7.3950E-09 &    19.2214 & 1.34E-05 & 1.924E+05 &      56.42 &     257.39 \\
 1078 & C & 1.08E+03 &    1.09196 &  7.2848E-09 &    19.2792 & 1.30E-05 & 1.908E+05 &      57.92 &     255.19 \\
 1079 & C & 1.05E+03 &    1.10822 &  7.1261E-09 &    19.3375 & 1.27E-05 & 1.884E+05 &      60.52 &     251.67 \\
 1080 & C & 9.84E+02 &    1.12405 &  6.9774E-09 &    19.4556 & 1.20E-05 & 1.860E+05 &      62.47 &     247.93 \\
 1081 & C & 9.52E+02 &    1.13434 &  6.8840E-09 &    19.5154 & 1.17E-05 & 1.843E+05 &      63.23 &     245.26 \\
 1082 & C & 9.19E+02 &    1.14425 &  6.7952E-09 &    19.5756 & 1.13E-05 & 1.826E+05 &      64.34 &     242.46 \\
 1083 & C & 8.87E+02 &    1.15367 &  6.7112E-09 &    19.6362 & 1.10E-05 & 1.809E+05 &      65.35 &     239.53 \\
 1084 & C & 8.54E+02 &    1.16168 &  6.6393E-09 &    19.6972 & 1.07E-05 & 1.793E+05 &      66.06 &     236.74 \\
 1085 & C & 8.27E+02 &    1.16833 &  6.5784E-09 &    19.7473 & 1.04E-05 & 1.779E+05 &      66.61 &     234.13 \\
 1086 & C & 8.00E+02 &    1.17736 &  6.4933E-09 &    19.7975 & 1.01E-05 & 1.757E+05 &      68.07 &     230.00 \\
 1087 & C & 7.47E+02 &    1.18517 &  6.4174E-09 &    19.8986 & 9.56E-06 & 1.734E+05 &      68.74 &     225.65 \\
 1088 & C & 7.20E+02 &    1.18966 &  6.3727E-09 &    19.9493 & 9.28E-06 & 1.718E+05 &      68.51 &     222.58 \\
 1089 & C & 6.93E+02 &    1.19323 &  6.3354E-09 &    20.0001 & 9.01E-06 & 1.704E+05 &      68.69 &     219.59 \\
 1090 & C & 6.70E+02 &    1.19596 &  6.3048E-09 &    20.0443 & 8.77E-06 & 1.690E+05 &      68.77 &     216.70 \\
 1091 & C & 6.47E+02 &    1.19806 &  6.2785E-09 &    20.0886 & 8.53E-06 & 1.676E+05 &      68.87 &     213.71 \\
 1092 & C & 6.24E+02 &    1.19947 &  6.2570E-09 &    20.1328 & 8.29E-06 & 1.661E+05 &      68.89 &     210.59 \\
 1093 & C & 6.01E+02 &    1.20015 &  6.2359E-09 &    20.1770 & 8.05E-06 & 1.641E+05 &      69.26 &     206.20 \\
 1094 & C & 5.62E+02 &    1.19937 &  6.2257E-09 &    20.2518 & 7.64E-06 & 1.622E+05 &      68.85 &     201.84 \\
 1095 & C & 5.43E+02 &    1.19803 &  6.2251E-09 &    20.2890 & 7.44E-06 & 1.609E+05 &      67.97 &     198.80 \\
 1096 & C & 5.23E+02 &    1.19464 &  6.2343E-09 &    20.3261 & 7.24E-06 & 1.589E+05 &      68.02 &     194.03 \\
 1097 & C & 4.85E+02 &    1.18825 &  6.2610E-09 &    20.3999 & 6.83E-06 & 1.566E+05 &      67.27 &     188.34 \\
 1098 & C & 4.59E+02 &    1.18033 &  6.2989E-09 &    20.4506 & 6.55E-06 & 1.546E+05 &      65.73 &     183.40 \\
 1099 & C & 4.33E+02 &    1.16997 &  6.3530E-09 &    20.5007 & 6.27E-06 & 1.525E+05 &      64.23 &     178.20 \\
 1100 & C & 4.07E+02 &    1.15723 &  6.4257E-09 &    20.5502 & 5.98E-06 & 1.504E+05 &      62.33 &     172.73 \\
 1101 & C & 3.82E+02 &    1.14352 &  6.5118E-09 &    20.5989 & 5.70E-06 & 1.483E+05 &      59.95 &     167.44 \\
 1102 & C & 3.61E+02 &    1.12949 &  6.6089E-09 &    20.6392 & 5.46E-06 & 1.464E+05 &      57.33 &     162.39 \\
 1103 & C & 3.41E+02 &    1.11461 &  6.7225E-09 &    20.6787 & 5.23E-06 & 1.444E+05 &      54.47 &     157.26 \\
 1104 & C & 3.21E+02 &    1.09927 &  6.8531E-09 &    20.7158 & 5.00E-06 & 1.424E+05 &      51.18 &     152.06 \\
 1105 & C & 3.02E+02 &    1.08331 &  7.0035E-09 &    20.7520 & 4.77E-06 & 1.404E+05 &      47.43 &     146.69 \\
 1106 & C & 2.83E+02 &    1.06508 &  7.1717E-09 &    20.7873 & 4.55E-06 & 1.382E+05 &      43.00 &     141.22 \\
 1107 & C & 2.65E+02 &    1.04501 &  7.3455E-09 &    20.8216 & 4.32E-06 & 1.360E+05 &      37.81 &     135.85 \\
 1108 & C & 2.48E+02 &    1.02372 &  7.5117E-09 &    20.8535 & 4.10E-06 & 1.338E+05 &      32.08 &     130.70 \\
 1109 & C & 2.31E+02 &    1.00600 &  7.6295E-09 &    20.8846 & 3.88E-06 & 1.319E+05 &      26.60 &     126.77 \\
 1110 & C & 2.22E+02 &    0.99256 &  7.7030E-09 &    20.9025 & 3.76E-06 & 1.306E+05 &      22.40 &     123.99 \\
 1111 & C & 2.13E+02 &    0.97901 &  7.7615E-09 &    20.9201 & 3.63E-06 & 1.292E+05 &      19.15 &     121.31 \\
 1112 & C & 2.03E+02 &    0.96557 &  7.8026E-09 &    20.9376 & 3.50E-06 & 1.277E+05 &      16.16 &     118.76 \\
 1113 & C & 1.94E+02 &    0.95303 &  7.8243E-09 &    20.9549 & 3.38E-06 & 1.263E+05 &      13.55 &     116.42 \\
 1114 & C & 1.86E+02 &    0.94136 &  7.8283E-09 &    20.9708 & 3.26E-06 & 1.250E+05 &      11.38 &     114.27 \\
 1115 & C & 1.78E+02 &    0.92946 &  7.8150E-09 &    20.9866 & 3.15E-06 & 1.236E+05 &       9.54 &     112.21 \\
 1116 & C & 1.70E+02 &    0.91738 &  7.7833E-09 &    21.0024 & 3.03E-06 & 1.222E+05 &       7.92 &     110.24 \\
 1117 & C & 1.63E+02 &    0.90353 &  7.7240E-09 &    21.0183 & 2.91E-06 & 1.206E+05 &       6.47 &     108.10 \\
 1118 & C & 1.53E+02 &    0.88804 &  7.6268E-09 &    21.0386 & 2.77E-06 & 1.187E+05 &       5.08 &     105.83 \\
 1119 & C & 1.44E+02 &    0.87366 &  7.5046E-09 &    21.0592 & 2.62E-06 & 1.169E+05 &       3.90 &     103.80 \\
 1120 & C & 1.36E+02 &    0.86054 &  7.3626E-09 &    21.0776 & 2.49E-06 & 1.152E+05 &       3.00 &     102.00 \\
 1121 & C & 1.28E+02 &    0.84800 &  7.1942E-09 &    21.0964 & 2.36E-06 & 1.134E+05 &       2.30 &     100.28 \\
  \hline
1122 & C & 1.20E+02 &    0.83628 &  6.9999E-09 &    21.1155 & 2.22E-06 & 1.115E+05 &       1.75 &      98.63 \\
 1123 & C & 1.12E+02 &    0.82528 &  6.7743E-09 &    21.1352 & 2.09E-06 & 1.096E+05 &       1.32 &      96.99 \\
 1124 & C & 1.04E+02 &    0.81748 &  6.5834E-09 &    21.1566 & 1.96E-06 & 1.080E+05 &       1.00 &      95.77 \\
 1125 & C & 1.00E+02 &    0.81258 &  6.4480E-09 &    21.1676 & 1.89E-06 & 1.069E+05 &       0.80 &      94.97 \\
 1126 & C & 9.62E+01 &    0.80607 &  6.2478E-09 &    21.1788 & 1.82E-06 & 1.054E+05 &       0.67 &      93.86 \\
 1127 & C & 8.92E+01 &    0.80011 &  6.0434E-09 &    21.1996 & 1.69E-06 & 1.038E+05 &       0.52 &      92.80 \\
 1128 & C & 8.57E+01 &    0.79626 &  5.9007E-09 &    21.2104 & 1.63E-06 & 1.028E+05 &       0.42 &      92.09 \\
 1129 & C & 8.22E+01 &    0.79196 &  5.7334E-09 &    21.2214 & 1.57E-06 & 1.016E+05 &       0.35 &      91.30 \\
 1130 & C & 7.79E+01 &    0.78715 &  5.5390E-09 &    21.2356 & 1.49E-06 & 1.002E+05 &       0.27 &      90.43 \\
 1131 & C & 7.36E+01 &    0.78269 &  5.3475E-09 &    21.2503 & 1.41E-06 & 9.880E+04 &       0.21 &      89.60 \\
 1132 & C & 6.98E+01 &    0.77884 &  5.1603E-09 &    21.2638 & 1.34E-06 & 9.747E+04 &       0.15 &      88.83 \\
 1133 & C & 6.61E+01 &    0.77531 &  4.9665E-09 &    21.2778 & 1.27E-06 & 9.609E+04 &       0.11 &      88.05 \\
 1134 & C & 6.23E+01 &    0.77266 &  4.8046E-09 &    21.2923 & 1.20E-06 & 9.494E+04 &       0.07 &      87.42 \\
 1135 & C & 6.00E+01 &    0.77075 &  4.6775E-09 &    21.3017 & 1.16E-06 & 9.403E+04 &       0.05 &      86.93 \\
 1136 & C & 5.77E+01 &    0.76804 &  4.4821E-09 &    21.3112 & 1.12E-06 & 9.261E+04 &       0.03 &      86.19 \\
 1137 & C & 5.32E+01 &    0.76529 &  4.2679E-09 &    21.3311 & 1.03E-06 & 9.105E+04 &       0.01 &      85.39 \\
 1138 & R & 5.04E+01 &    0.76325 &  4.1031E-09 &    21.3436 & 9.78E-07 & 8.983E+04 &       0.00 &      84.78 \\
 1139 & R & 4.77E+01 &    0.76129 &  3.9433E-09 &    21.3566 & 9.26E-07 & 8.863E+04 &       0.00 &      84.20 \\
 1140 & R & 4.53E+01 &    0.75959 &  3.7889E-09 &    21.3687 & 8.80E-07 & 8.746E+04 &       0.00 &      83.64 \\
 1141 & R & 4.29E+01 &    0.75813 &  3.6339E-09 &    21.3813 & 8.33E-07 & 8.627E+04 &       0.00 &      83.08 \\
 1142 & R & 4.06E+01 &    0.75688 &  3.4786E-09 &    21.3939 & 7.89E-07 & 8.505E+04 &       0.00 &      82.52 \\
 1143 & R & 3.83E+01 &    0.75581 &  3.3202E-09 &    21.4071 & 7.44E-07 & 8.378E+04 &       0.00 &      81.95 \\
 1144 & R & 3.60E+01 &    0.75487 &  3.1587E-09 &    21.4209 & 6.99E-07 & 8.246E+04 &       0.00 &      81.37 \\
 1145 & R & 3.37E+01 &    0.75414 &  3.0163E-09 &    21.4353 & 6.54E-07 & 8.126E+04 &       0.00 &      80.85 \\
 1146 & R & 3.20E+01 &    0.75353 &  2.8941E-09 &    21.4464 & 6.22E-07 & 8.021E+04 &       0.00 &      80.40 \\
 1147 & R & 3.04E+01 &    0.75290 &  2.7700E-09 &    21.4579 & 5.89E-07 & 7.913E+04 &       0.00 &      79.94 \\
 1148 & R & 2.87E+01 &    0.75225 &  2.6285E-09 &    21.4699 & 5.56E-07 & 7.786E+04 &       0.00 &      79.41 \\
 1149 & R & 2.67E+01 &    0.75167 &  2.4687E-09 &    21.4856 & 5.16E-07 & 7.638E+04 &       0.00 &      78.80 \\
 1150 & R & 2.46E+01 &    0.75132 &  2.3386E-09 &    21.5023 & 4.75E-07 & 7.514E+04 &       0.00 &      78.31 \\
 1151 & R & 2.34E+01 &    0.75114 &  2.2398E-09 &    21.5128 & 4.51E-07 & 7.417E+04 &       0.00 &      77.93 \\
 1152 & R & 2.22E+01 &    0.75102 &  2.1310E-09 &    21.5238 & 4.27E-07 & 7.308E+04 &       0.00 &      77.51 \\
 1153 & R & 2.08E+01 &    0.75100 &  2.0117E-09 &    21.5373 & 3.98E-07 & 7.185E+04 &       0.00 &      77.04 \\
 1154 & R & 1.93E+01 &    0.75107 &  1.9108E-09 &    21.5515 & 3.70E-07 & 7.077E+04 &       0.00 &      76.64 \\
 1155 & R & 1.84E+01 &    0.75118 &  1.8301E-09 &    21.5615 & 3.51E-07 & 6.989E+04 &       0.00 &      76.32 \\
 1156 & R & 1.75E+01 &    0.75135 &  1.7497E-09 &    21.5717 & 3.33E-07 & 6.899E+04 &       0.00 &      75.99 \\
 1157 & R & 1.65E+01 &    0.75159 &  1.6682E-09 &    21.5823 & 3.14E-07 & 6.805E+04 &       0.00 &      75.66 \\
 1158 & R & 1.56E+01 &    0.75193 &  1.5858E-09 &    21.5934 & 2.96E-07 & 6.707E+04 &       0.00 &      75.32 \\
 1159 & R & 1.47E+01 &    0.75232 &  1.5107E-09 &    21.6051 & 2.77E-07 & 6.616E+04 &       0.00 &      75.02 \\
 1160 & R & 1.39E+01 &    0.75277 &  1.4434E-09 &    21.6148 & 2.63E-07 & 6.531E+04 &       0.00 &      74.74 \\
 1161 & R & 1.32E+01 &    0.75333 &  1.3753E-09 &    21.6250 & 2.48E-07 & 6.444E+04 &       0.00 &      74.45 \\
 1162 & R & 1.25E+01 &    0.75402 &  1.3065E-09 &    21.6358 & 2.33E-07 & 6.352E+04 &       0.00 &      74.16 \\
 1163 & R & 1.17E+01 &    0.75502 &  1.2290E-09 &    21.6470 & 2.19E-07 & 6.246E+04 &       0.00 &      73.83 \\
 1164 & R & 1.09E+01 &    0.75652 &  1.1428E-09 &    21.6617 & 2.01E-07 & 6.122E+04 &       0.00 &      73.45 \\
 1165 & R & 9.97E+00 &    0.75795 &  1.0761E-09 &    21.6774 & 1.83E-07 & 6.023E+04 &       0.00 &      73.15 \\
 1166 & R & 9.49E+00 &    0.75910 &  1.0296E-09 &    21.6863 & 1.73E-07 & 5.950E+04 &       0.00 &      72.94 \\
 1167 & R & 9.01E+00 &    0.76037 &  9.8282E-10 &    21.6955 & 1.64E-07 & 5.876E+04 &       0.00 &      72.72 \\
 1168 & R & 8.54E+00 &    0.76193 &  9.3051E-10 &    21.7052 & 1.54E-07 & 5.789E+04 &       0.00 &      72.46 \\
 1169 & R & 7.96E+00 &    0.76379 &  8.7258E-10 &    21.7176 & 1.42E-07 & 5.689E+04 &       0.00 &      72.17 \\
 1170 & R & 7.38E+00 &    0.76562 &  8.1920E-10 &    21.7309 & 1.31E-07 & 5.593E+04 &       0.00 &      71.88 \\
 1171 & R & 6.89E+00 &    0.76732 &  7.7565E-10 &    21.7426 & 1.21E-07 & 5.511E+04 &       0.00 &      71.64 \\
 1172 & R & 6.51E+00 &    0.76905 &  7.3709E-10 &    21.7523 & 1.14E-07 & 5.435E+04 &       0.00 &      71.41 \\
 1173 & R & 6.12E+00 &    0.77070 &  7.0359E-10 &    21.7626 & 1.06E-07 & 5.367E+04 &       0.00 &      71.21 \\
 1174 & R & 5.84E+00 &    0.77221 &  6.7523E-10 &    21.7704 & 1.00E-07 & 5.308E+04 &       0.00 &      71.03 \\
 1175 & R & 5.56E+00 &    0.77414 &  6.4136E-10 &    21.7785 & 9.48E-08 & 5.234E+04 &       0.00 &      70.80 \\
 1176 & R & 5.17E+00 &    0.77624 &  6.0673E-10 &    21.7904 & 8.71E-08 & 5.156E+04 &       0.00 &      70.55 \\
 1177 & R & 4.87E+00 &    0.77813 &  5.7676E-10 &    21.7999 & 8.13E-08 & 5.085E+04 &       0.00 &      70.32 \\
 1178 & R & 4.58E+00 &    0.77975 &  5.5149E-10 &    21.8098 & 7.54E-08 & 5.024E+04 &       0.00 &      70.11 \\
 1179 & R & 4.37E+00 &    0.78112 &  5.3095E-10 &    21.8169 & 7.15E-08 & 4.972E+04 &       0.00 &      69.94 \\
 1180 & R & 4.17E+00 &    0.78266 &  5.1037E-10 &    21.8243 & 6.75E-08 & 4.918E+04 &       0.00 &      69.75 \\
 1181 & R & 3.96E+00 &    0.78445 &  4.8907E-10 &    21.8320 & 6.35E-08 & 4.861E+04 &       0.00 &      69.55 \\
 1182 & R & 3.74E+00 &    0.78647 &  4.6708E-10 &    21.8405 & 5.93E-08 & 4.799E+04 &       0.00 &      69.32 \\
 1183 & R & 3.53E+00 &    0.78864 &  4.4509E-10 &    21.8494 & 5.51E-08 & 4.735E+04 &       0.00 &      69.07 \\
 1184 & R & 3.31E+00 &    0.79092 &  4.2311E-10 &    21.8587 & 5.08E-08 & 4.669E+04 &       0.00 &      68.80 \\
 \hline
 1185 & R & 3.09E+00 &    0.79285 &  4.0457E-10 &    21.8686 & 4.66E-08 & 4.610E+04 &       0.00 &      68.55 \\
 1186 & R & 2.94E+00 &    0.79437 &  3.8946E-10 &    21.8756 & 4.37E-08 & 4.560E+04 &       0.00 &      68.33 \\
 1187 & R & 2.78E+00 &    0.79580 &  3.7432E-10 &    21.8830 & 4.08E-08 & 4.509E+04 &       0.00 &      68.10 \\
 1188 & R & 2.63E+00 &    0.79704 &  3.5915E-10 &    21.8906 & 3.79E-08 & 4.456E+04 &       0.00 &      67.85 \\
 1189 & R & 2.48E+00 &    0.79808 &  3.4600E-10 &    21.8985 & 3.49E-08 & 4.409E+04 &       0.00 &      67.62 \\
 1190 & R & 2.37E+00 &    0.79898 &  3.3489E-10 &    21.9045 & 3.28E-08 & 4.367E+04 &       0.00 &      67.42 \\
 1191 & R & 2.26E+00 &    0.80002 &  3.2165E-10 &    21.9107 & 3.07E-08 & 4.317E+04 &       0.00 &      67.16 \\
 1192 & R & 2.10E+00 &    0.80087 &  3.0983E-10 &    21.9195 & 2.78E-08 & 4.271E+04 &       0.00 &      66.93 \\
 1193 & R & 2.02E+00 &    0.80139 &  3.0157E-10 &    21.9244 & 2.62E-08 & 4.238E+04 &       0.00 &      66.76 \\
 1194 & R & 1.94E+00 &    0.80182 &  2.9326E-10 &    21.9295 & 2.47E-08 & 4.204E+04 &       0.00 &      66.58 \\
 1195 & R & 1.86E+00 &    0.80213 &  2.8491E-10 &    21.9346 & 2.31E-08 & 4.169E+04 &       0.00 &      66.40 \\
 1196 & R & 1.78E+00 &    0.80227 &  2.7606E-10 &    21.9400 & 2.16E-08 & 4.131E+04 &       0.00 &      66.20 \\
 1197 & R & 1.69E+00 &    0.80215 &  2.6667E-10 &    21.9460 & 1.99E-08 & 4.091E+04 &       0.00 &      65.99 \\
 1198 & R & 1.59E+00 &    0.80180 &  2.5928E-10 &    21.9523 & 1.81E-08 & 4.058E+04 &       0.00 &      65.83 \\
 1199 & R & 1.54E+00 &    0.80112 &  2.5125E-10 &    21.9559 & 1.72E-08 & 4.023E+04 &       0.00 &      65.65 \\
 1200 & R & 1.44E+00 &    0.80003 &  2.4310E-10 &    21.9634 & 1.53E-08 & 3.986E+04 &       0.00 &      65.48 \\
 1201 & R & 1.39E+00 &    0.79900 &  2.3729E-10 &    21.9672 & 1.43E-08 & 3.960E+04 &       0.00 &      65.36 \\
 1202 & R & 1.34E+00 &    0.79775 &  2.3130E-10 &    21.9715 & 1.32E-08 & 3.933E+04 &       0.00 &      65.25 \\
 1203 & R & 1.29E+00 &    0.79556 &  2.2262E-10 &    21.9757 & 1.22E-08 & 3.894E+04 &       0.00 &      65.10 \\
 1204 & R & 1.19E+00 &    0.79285 &  2.1391E-10 &    21.9841 & 1.03E-08 & 3.854E+04 &       0.00 &      64.98 \\
 1205 & R & 1.14E+00 &    0.78970 &  2.0556E-10 &    21.9883 & 9.40E-09 & 3.817E+04 &       0.00 &      64.90 \\
 1206 & R & 1.05E+00 &    0.78603 &  1.9736E-10 &    21.9964 & 7.68E-09 & 3.780E+04 &       0.00 &      64.86 \\
 1207 & R & 1.01E+00 &    0.78257 &  1.9068E-10 &    22.0003 & 6.88E-09 & 3.751E+04 &       0.00 &      64.86 \\
 1208 & R & 9.50E-01 &    0.77882 &  1.8424E-10 &    22.0064 & 5.69E-09 & 3.723E+04 &       0.00 &      64.89 \\
 1209 & R & 9.17E-01 &    0.77546 &  1.7903E-10 &    22.0098 & 5.03E-09 & 3.700E+04 &       0.00 &      64.95 \\
 1210 & R & 8.76E-01 &    0.77201 &  1.7411E-10 &    22.0141 & 4.24E-09 & 3.680E+04 &       0.00 &      65.03 \\
 1211 & R & 8.49E-01 &    0.76795 &  1.6877E-10 &    22.0172 & 3.69E-09 & 3.658E+04 &       0.00 &      65.15 \\
 1212 & R & 8.06E-01 &    0.76388 &  1.6380E-10 &    22.0221 & 2.83E-09 & 3.637E+04 &       0.00 &      65.30 \\
 1213 & R & 7.85E-01 &    0.76046 &  1.5988E-10 &    22.0245 & 2.42E-09 & 3.622E+04 &       0.00 &      65.44 \\
 1214 & R & 7.57E-01 &    0.75691 &  1.5601E-10 &    22.0280 & 1.85E-09 & 3.606E+04 &       0.00 &      65.60 \\
 1215 & R & 7.39E-01 &    0.75246 &  1.5144E-10 &    22.0303 & 1.47E-09 & 3.589E+04 &       0.00 &      65.83 \\
 1216 & R & 7.04E-01 &    0.74810 &  1.4719E-10 &    22.0348 & 7.64E-10 & 3.573E+04 &       0.00 &      66.07 \\
 1217 & R & 6.91E-01 &    0.74443 &  1.4378E-10 &    22.0366 & 4.96E-10 & 3.560E+04 &       0.00 &      66.29 \\
 1218 & R & 6.67E-01 &    0.74192 &  1.4152E-10 &    22.0399 & 0.00E+00 & 3.552E+04 &       0.00 &      66.45 \\  
\hline
\end{tabular}
\end{table}