\begin{table}%t2
\caption{\label{tab:small_tab}Observed properties of the $^{12}$CO(2--1) outflows detected in the map of Fig.~2.}
%\centerline
{
\begin{tabular}{cccccc}
\hline
\hline
{OUTFLOW} & {Local systemic} $^{(1)}$& \multicolumn{2}{c}{Outflow main $^{(2)}$} & {Area} $^{(3)}$& {Length} $^{(4)}$\\
{LOBE}  & {velocity ${V_{\rm sys}}$} & \multicolumn{2}{c}{LSR velocities interval} & {} & {} \\
{}   & {(km~s$^{-1}$)} & \multicolumn{2}{c}{(km~s$^{-1}$)} &  {(arcsec$^{2}$)} & {(arcsec)} \\
       \  &    & {~~~~~$V_{1}$~~~~} & {$V_{2}$} &   &   \\
\hline
{F1 (Red)} & 7.5 & 28.5 & 13 & 2780 & 127 \\
{F2 (Blue)}& 7.6 & $-$27 & 1.1 & 3060 & 184\\
{F3 (Blue)}& 7.4 & $-$26.6 & 1.4  & 1935  & 70 \\
{F4 (Red)}& 7.7 & 23 & 14.3 & 900  & 53 \\
{F5 (Blue)} & 7.3 & $-$12 & 0.3 & 1080  & 50 \\
{F6 (Red)}& 7.1 & 28.1 & 13.1 & 1360  & 56 \\
{F7 (Red)}& 7.2 & 33.2 & 14.7 & 2230   & 72 \\
{ F8 (Blue)}&  7.2 & $-$23 & 1.7 & 590 & 38 \\
{ F9 (Red)} & 7.2 & 30.2 & 13.7 & 800  & 53 \\
{ F10 (Red)}& 7.2 & 32.2 & 13.7 & 610  & 50 \\
{ F11 (Red)} & 7.7 & 33 & 15.2 & 4180  & 90 \\
\hline
\end{tabular}}
\par
\medskip
$^{(1)}$ Systemic LSR velocity of the ambient material around each outflow.\\
$^{(2)}$ Velocity interval [$V_{1}$; $V_{2}$] over which each outflow emission is detected but no significant emission is seen in the reference spectrum. \\ 
$^{(3)}$ Surface area of each outflow lobe. \\
$^{(4)}$ Major size of each outflow lobe.
\end{table}