\begin{table}%t3
\par
%\centering
\par
\caption{\label{line-strength}Line-strength indices in our sample of red-galaxies with $S/N$(\AA)~$>$~10 and no- or weak-emission lines. The number between brackets after
the indices values indicates the presence (1) or not (0) of sky-subtraction residuals or telluric absorptions inside the definition passband of the
index. Only those indices with labels (0) are used in our analysis. Type: Indicate the presence (2) or not (1) of weak ($\rm [OII]<7$~\AA) emission 
lines. Last column lists the measured velocity dispersion and its error. 
This is only a portion of
the table, shown for guidance regarding its format and content. The full table is electronically 
available at CDS and at \protect \url{http://www.ucm.es/info/Astrof/psb/ediscs.html}} 
{ \begin{tabular}{lrrrrrrr}
\hline\hline
                     & \multicolumn{1}{c}{D4000}& \multicolumn{1}{c}{H$\delta_{\rm A}$}&\multicolumn{1}{c}{H$\delta_{\rm F}$}&
                       \multicolumn{1}{c}{CN$_2$}&\multicolumn{1}{c}{Ca4227}&\multicolumn{1}{c}{G4300}&\multicolumn{1}{c}{H$\gamma_{\rm A}$}\\
\hline
1018471-1210513&1.83~$\pm$~0.01 (1)    &1.28~$\pm$~0.41 (0)       &2.11~$\pm$~0.27 (0)      &0.027~$\pm$~0.015 (0)&
                       1.27~$\pm$~0.23 (0)   &2.71~$\pm$~0.43 (0)       &$-1.53\pm0.47$ (0)\\
1018464-1211205&2.22~$\pm$~0.02 (1)    &$-0.18\pm0.69$ (0)      &0.84~$\pm$~0.47 (0)      &0.038~$\pm$~0.024 (0)&
                      0.87~$\pm$~0.38 (0)    &4.86~$\pm$~0.65 (0)       &$-4.75\pm0.81$ (0)\\
1018467-1211527&2.13~$\pm$~0.01 (0)    &$-0.97\pm0.29$ (0)      &0.63~$\pm$~0.19 (0)      &0.108~$\pm$~0.010 (0)&
                      0.48~$\pm$~0.16 (0)    &5.10~$\pm$~0.26 (0)       &$-5.55\pm0.33$ (0)\\
1018401-1214013&1.98~$\pm$~0.02 (0)    &$-0.57\pm$0.65 (0)      &0.40~$\pm$~0.45 (0)      &0.072~$\pm$~0.022 (0)&
                      0.53~$\pm$~0.37 (0)    &7.13~$\pm$~0.57 (0)       &$-4.71\pm0.76$ (0)\\
\hline 
                     &\multicolumn{1}{c}{H$\gamma_{\rm F}$}&\multicolumn{1}{c}{Fe4383}&\multicolumn{1}{c}{Ca4455}&\multicolumn{1}{c}{Fe4531}&
                      type&\multicolumn{1}{c}{$\sigma\pm \rm err$}&\\  
1018471-1210513      & 0.52~$\pm$~0.28 (0)    &3.71~$\pm$~0.68 (0)       &0.67~$\pm$~0.38 (0)      &3.28~$\pm$~0.58 (0)  &2    &245.9~$\pm$~15.8&\\
1018464-1211205      &$-2.01\pm0.52$ (0)    &4.10~$\pm$~1.09 (0)       &0.91~$\pm$~0.60 (0)      &3.47~$\pm$~0.93 (0)  &1    &279.9~$\pm$~27.6&\\
1018467-1211527      &$-1.73\pm0.21$ (0)    &3.27~$\pm$~0.44 (0)       &0.98~$\pm$~0.24 (0)      &3.03~$\pm$~0.38 (0)  &1    &211.1~$\pm$~14.8\\
1018401-1214013      &$-0.29\pm0.45$ (0)    &1.77~$\pm$~1.06 (0)       &0.71~$\pm$~0.57 (0)      &1.37~$\pm$~0.91 (0)  &1    &129.2~$\pm$~21.0\\
\hline
\end{tabular}}
\end{table}