\begin{table}%t1
%\centering
\par
\caption {\label{table-eos}Thermodynamic conditions of the
PNSs in Fig.~\ref{fig-hydroplot-eos-comparison},
comparing the central data {(a)} with the maximum
temperature {(b)}.}
%\centering
\par
%\begin{tabular}{|p{12mm}|p{12mm}|p{20mm}|p{10mm}|}
\begin{tabular}{c c c c}
\hline \hline
EoS & $T$  & $\rho$ & $Y$$_{\rm e}$ \\
 & [MeV] & 10$^{14}$ [g/cm$^3$]  & \\
\hline 
{\it eos1} (a) & 29.78 & 12.0 & 0.299 \\
{\it eos1} (b) & 96.05 & 5.86 & 0.270 \\
{\it eos2} (a) & 50.27 & 9.16 & 0.297 \\
{\it eos2} (b) & 92.04 & 4.37 & 0.271 \\
\hline
\end{tabular}
\end{table}