\begin{table}%t11
\begin{table}%t11
\par
\caption{\label{tab:CP}Closure-phase measurements  for one  independent triangle, for  Chip~2
with spectral dispersion,  as well as amplitude of  the variation over the $H$~band range. Statistical errors are of~2.5$^\circ$.} 
%\centering
\small
\begin{tabular}{c|c c c c}
\hline
\hline
%&&&& \\[-8pt]
Triangle [134] & $\Phi_{134}^{1}$ ($^\circ$)& $\Phi_{134}^{2}$ ($^\circ$)& $\Phi_{134}^{3}$ ($^\circ$)& $\Phi_{134}^{4}$ ($^\circ$)\\
%&&&& \\[-8pt]
\hline
avg/$\Delta\lambda$ & 114.6/22.8 & --68.2/18.1 & --1.9/22.2 & 179.0/30.1\\
\hline
\end{tabular}
\end{table}