\begin{table}%t3
\caption {\label{parametry-T90-ML-method}Parameters of the best fit
with two and three log-normal functions
done by the maximum likelihood method on the RHESSI data.
$\mu$ are the means, $\sigma$ are the standard deviations,
$w$ are the weights of the distribution and
$L_{{2}}, L_{{3}}$ are the likelihoods.
Given uncertainties are standard deviations of the parameters
obtained by ten different fittings of data sets, in which the durations
were randomly changed by their uncertainties.}
%\centering
\par
\begin{tabular}{lrr}
\hline
\hline
%\\[-2ex]
Parameter                    & 2 log-normal        & 3 log-normal \\[0.3ex]
\hline 
%\\[-2ex]
$\mu_{{\rm short}}$       &    --0.60~$\pm$~0.07   &   --0.64~$\pm$~0.02 \\[0.3ex]
$\sigma_{{\rm short}}$    &    0.25~$\pm$~0.05    &    0.20~$\pm$~0.02 \\[0.3ex]
$w_{{\rm short}}[\%]$     &    10.2~$\pm$~1.3     &   9.4~$\pm$~0.4   \\[0.3ex]
%\\[-2ex]
$\mu_{{\rm long}}$        &    1.20~$\pm$~0.01    &    1.26~$\pm$~0.01 \\[0.3ex]
$\sigma_{{\rm long}}$     &    0.47~$\pm$~0.01    &    0.41~$\pm$~0.01 \\[0.3ex]
$w_{{\rm long}}[\%]$      &    89.8~$\pm$~1.3     &    84.4~$\pm$~1.0  \\[0.3ex]
%\\[-2ex]
$\mu_{{\rm middle}}$      &                  &   0.17~$\pm$~0.04 \\[0.3ex]
$\sigma_{{\rm middle}}$   &                  &   0.22~$\pm$~0.06 \\[0.3ex]
$w_{{\rm middle}}[\%]$    &                  &    6.2~$\pm$~1.4  \\[0.3ex]
%\\[-2ex]
$\ln L_{{\rm 2}}$         &    --389.17   &          \\[0.3ex]
$\ln L_{{\rm 3}}$         &              & --379.95  \\
\hline
\end{tabular}
\end{table}