\begin{table}%t2
\caption {\label{Tab:sampleII}The first five lines of the list of stars from sample~II. The full
table is only available electronically at the CDS. 
}                             
%\tabcolsep 2pt                                                                                  
%\centerline
 $${         
\begin{tabular}{lccr@{.}lcccc}
\hline
\hline
HD    & $N_{\rm tot}$ & $N_{\rm ELO}$ & \multicolumn{2}{c}{$V_r$} & $\sigma(Vr)$ & $\epsilon(Vr)$ & ${\it Sb}^a$ & Flag$^b$\\
       &     &  & \multicolumn{2}{c}{(km s$^{-1}$)} & (km s$^{-1}$) & (km s$^{-1}$) &(km s$^{-1}$) \\
\hline 
1013  &5   &1  &$-$46&67&   0.18&  0.26&  2.80& --\\
1255  &5   &1  &   14&57&   0.32&  0.27&  3.95& -- \\                               
2313  &5   &1  &   24&15&   0.18&  0.28&  3.15& --\\                         
2411  &6   &2  &    4&67&   1.06&  0.25&  4.58& ORB       \\
2637  &5   &1  &   11&25&   0.19&  0.25&  1.33& --\\
...\\
\hline                                
\end{tabular}}$$
\par
\smallskip
$^a$ The average sigma of a Gaussian fitted
to the cross-correlation profile, corrected for the instrumental width
(7~km~s$^{-1}$ for CORAVEL at the Haute-Provence Observatory);
$^b$ The flag in this column is the same as in Table~4.  
\end{table}