\begin{table}%t8
\caption{\label{table:statis}Comparison between the classification of YSOs using $\alpha_{\rm{IR}}$ by \citet{Evans08} and our method using molecular emission.}
\small%\centerline
 {
\begin{tabular}{l l l l l}
\hline \hline 
     & Class I & Flat Spectrum & Class II & Total\\ 
\hline
Stage 1  & 11 & 6 & 0 & 17 \\
Confused$^a$ & 1 & 3 & 1 & 5 \\
Stage 2 & 10 & 4 & 9 & 23  \\ 
\hline
Total & 22 & 13 & 10 & 45 \\ 
\hline
\end{tabular}}
\medskip
$^a$ Note that although it is possible for Flat Spectrum sources to be embedded, confused sources are ruled out to be embedded.
\end{table}