\begin{table}%t2
     \caption{\label{tbl:nonstd}Overview of L99 asteroid observations in our catalogue. All observations               are L01-like scans covering the full wavelength range.}
               %\centering
\par
  \small
\begin{tabular}{ll l l l l l l }
    \hline\hline
      \multicolumn{2}{l}{Object} & TDT & {Mid-observation UTC}& $\Delta$ $[$AU$]$ & $r$ $[$AU$]$ & $\alpha$ $[\degr]$& {Remarks}\\
       \hline
(1) & Ceres & 07500601 & 1996-01-31 ~ 07:52:11 & 2.891 & 2.682 & 19.9 & CII background emission\\
    &	    & 07500701 & 1996-01-31 ~ 10:10:56&  2.890 & 2.682 & 19.9 & CII background emission\\ 
    &	    & 07501301 & 1996-01-31 ~ 16:08:13 &  2.887 & 2.682 & 19.9 & CII background emission,\\
    &	    &	       &	    &	    &&&non-standard bias voltages \\     
    &	    & 07501401 & 1996-01-31 ~ 18:32:03 &  2.886 & 2.682 & 20.0 & CII background emission,\\        
    &	    &	       &	    &	   & &&non-standard bias voltages \\
     \noalign{\smallskip}   
(4) & Vesta & 05500201 & 1996-01-11 ~ 07:10:35 &  2.313 & 2.250 & 24.8 &non-standard bias voltages\\      
    &	    & 05500301 & 1996-01-11 ~ 08:54:29 & 2.312 & 2.250 & 24.9 & non-standard bias voltages \\
    &	    & 05500401 & 1996-01-11 ~ 10:39:34  & 2.311 & 2.250 & 24.9 &non-standard bias voltages \\
    \hline
  \end{tabular}
  \end{table}