\begin{table}%t6
%\centering
\par
\caption {\label{tableresoELSL11}Variation of parameters used modeling lightcurves and decelerations for ELSL11 in the second stage search.
The mass column does not give the variation of grain sizes, but the actual grain distribution used in every model.} 
\begin{tabular}{cccccccc}
\hline\hline
Mass & Density & Heat of Abl & $T_{\rm lim}$ & $T_{\rm boil}$ & Specific heat & Molar mass & Thermal conduc \\
(kg) & (kg~m$^{-3}$) & (J~kg$^{-1}$) & (K) & (K) & (J/kg K) & (au) & (W/m K) \\
\hline\\[-3mm]
\par
$450\times 1.10 \times 10^{-11}$	&	3500	&	$5 \times 10^{6}$	&	900	&	1800	&	700	&	20	&	0.2\\
$430\times 1.35\times  10^{-10}$	&	4000	&	$6 \times 10^{6}$	&	1000	&	1900	&	800	&	30	&	0.3\\
$30\times 1.93 \times 10^{-09}$	&	4500	&	$7\times 10^{6}$	&	1100	&	2000	&	900	&	36	&	0.5\\
	&	5000	&	$8\times  10^{6}$	&	1200	&	2100	&	1000	&	56	&	0.7\\
	&	5500	&	$9 \times 10^{6}$	&	1400	&	2200	&	1100	&		&	0.9\\
	&	6000	&		&	1450	&	2300	&	1200	&		&	\\
	&	6500	&		&	1500	&		&		&		&	\\
	&	7000	&		&	1550	&		&		&		&	\\
	&	7500	&		&	1600	&		&		&		&	\\
	&	8000	&		&	1800	&		&		&		&	\\
	&	8500	&		&		&		&		&		&	\\
	&	9000	&		&		&		&		&		&	\\
\hline
\end{tabular}
\end{table}